SCHEDULE 8 Data quality objectives

PART 3 Ozone and related nitrogen oxide and nitrogen dioxide assessed at ozone sampling points
16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (11.6.2010) by The Air Quality Standards (Scotland) Regulations 2010 (S.S.I. 2010/204), regs. 1(1), 29