Citation and commencement
1. (1) These Regulations may be cited as the National Health Service (General Ophthalmic Services) (Scotland) Amendment Regulations 2018.
(2) Subject to paragraph (3), these Regulations come into force on 1st October 2018.
(3) Regulations 3(b), 5, 7(1)(c), (e) and (g), 9 and 10(5) come into force on 1st April 2019.