1 Title and commencement
1 This Order may be cited as the Licensing (Indoor Arenas) (Northern Ireland) Order 2004.
2 This Article and Article 2 shall come into operation on the expiration of 7 days from the day on which this Order is made.
3 The other provisions of this Order shall come into operation on such day as the Department may by order appoint.