SCHEDULE 7 Requirements for metering and monitoring agreements

9 Requirements for provision of information and advice to participants
The requirements referred to in paragraph 1(c) are that the agreement requires the metering and monitoring installer to provide to the participant, on request,—
(a) at least once every three months, an explanation about the meaning of the information collected under the metering and monitoring agreement;
(b) all of the information collected under the metering and monitoring agreement over the 12 month period ending on the date on which the information is requested; and
(c) any other information relating to the participant or the metering and monitoring agreement which is held by the metering and monitoring installer.