SCHEDULE 2 GREENHOUSE GAS CRITERIA FOR SOLID AND GASEOUS BIOMASS

PART 2 Actual value method
6 Where the greenhouse gas emissions from the use of biomass are calculated using the actual value method the greenhouse gas emissions from the use of the biomass are equal to—
(a) in the case of biomass used by a CHP station,
Eηel(ηelηel+Ch×ηh)
,
(b) in any other case,
Eηel
.