Amendments to the Greater Manchester Act 1981
7. (1) The Greater Manchester Act 1981 is amended as follows.
1981 c. ix.
(2) In section 2(1) (interpretation) after the definition of “the Act of 1980” insert—

““application for building control approval” means an application in accordance with building regulations for building control approval (as defined in paragraph 1B of Schedule 1 to the Building Act 1984);”.

(3) In section 58(1)(a) (safety of stands) for “of which plans, sections, specifications or written particulars must be deposited” substitute “for which an application for building control approval must be made”.
(4) In section 63 (access for fire brigade)—
(a) in subsection (1)—
(i) for “plans for the erection or extension of a building are deposited with” substitute “an application for building control approval for the erection or extension of a building is made to”;
(ii) for “reject the plans” substitute “reject the application”;
(iii) for “plans show” substitute “application shows”;
(b) for subsection (4) substitute—

“(4) A person aggrieved by the action of the district council in rejecting an application for building control approval under this section may appeal to the First-tier Tribunal.”.

(5) In section 103(7) (order for insulating new buildings)—
(a) for “Where plans” substitute “Where an application for building control approval”;
(b) for “are, in accordance with building regulations, deposited with” substitute “is, in accordance with building regulations, made to”;
(c) for “reject the plans” substitute “reject the application”.