SCHEDULES

SCHEDULE 24 Transitional Provisions and Savings

PART II Central and Local Administration

Delegation of functions: compensation in respect of tree preservation orders
9 The terms of any delegation of functions by a local planning authority effected in pursuance of section 3 of the Act of 1962 before 4th August 1968 may be varied, so as to take account of any liability under section 175 of this Act of a local authority to whom functions have been so delegated, in such manner as the local planning authority and the other local authority may agree, or, if they fail to agree, as may be determined by the Secretary of State.