SCHEDULES

SCHEDULE 5 Transitional and Saving Provisions

Charges for fire certification work
3 Section 8B of the 1971 Act which is inserted by section 3 of this Act does not apply as respects an application for a fire certificate made before the said section 3 comes into force.