1 1 The provisions set out in the first schedule hereto, being provisions of regulations, the order and enactments specified in the second schedule hereto subject to such modifications as aforesaid, are hereby re-enacted and shall have effect as if they were regulations made under section one hundred and forty-one of the Act coming into operation at the commencement of the Act.
2 The provisions set out in the first schedule hereto may be cited as the Coal and Other Mines (Ventilation) Regulations, 1956.
2 Any exemption, consent, approval, permission, direction or requirement granted or imposed by the Minister or any inspector for the purposes of a provision specified in the second schedule hereto shall, if in force at the commencement of the Act and so far as it could have been granted or imposed under the Coal and Other Mines (Ventilation) Regulations, 1956, have effect as if it had been so granted or imposed.
3 This order shall come into operation at the commencement of the Act and may be cited as the Coal and Other Mines (Ventilation) Order, 1956.
Aubrey Jones Minister of Fuel and Power Dated this seventh day of November, nineteen hundred and fifty-six