SCHEDULE 1 PRESCRIBED LIMITS OF ERROR UPON THE TESTING OF MEASURES AND WEIGHTS

PART I LINEAR MEASURES
2 Imperial system
End measures		Line measures	
Measures made of metal: purported value	Error in excess	Error in deficiency	Error in excess	Error in deficiency
inches	inches	inches	inches
Under 1 foot	0.01	0.01	0.005	0.002
1 foot to 1 yard inclusive	0.03	0.015	0.02	0.01
Above 1 yard and under 10 feet	—	—	0.05	0.05
10 feet and under 50 feet	—	—	0.2	0.2
50 feet to 100 feet inclusive	—	—	0.3	0.3
In the case of measures made of material other than metal, the foregoing amounts of error shall be increased to double the said amounts.