PART III PROVISIONS RELATING TO ACTIVE CLASSIFIED TIPS

15 Notification of change in design or specification of tips
Where such a change in the design of an active classified tip or in the nature or location of the types of refuse deposited or such a variation to or departure from its specification, as might affect its security, has been made, it shall be the duty of the manager of the mine or of the owner of the quarry with which the tip is associated to give notice forthwith of the change, variation or departure to the inspector for the district.