1. The Employment Medical Advisory Service Act 1972 shall come into operation on 1st February 1973.
2. This Order may be cited as the Employment Medical Advisory Service Act 1972 (Commencement) Order 1973.
Maurice Macmillan
Secretary of State for Employment
9th January 1973