4 The Alcoholometers and Alcohol Hydrometers (EEC Requirements) Regulations 1977 are hereby amended in Regulation 17 as follows:—
(a) for “14(2)” there shall be substituted “14”;
(b) for “£200” there shall be substituted “£2000”; and
(c) for “£50” there shall be substituted “£400”.
, to which there are amendments not relevant to these Regulations.