SCHEDULE 2 LENGTHS OF TRUNK ROAD CEASING TO BE TRUNK ROAD
1 The length labelled “A” on the deposited plan from a point about 345 metres east of the existing Trunk Road junction with the private access road to Ballington Manor for a distance of about 1.37 km to a point about 210 metres east of the Trunk Road junction with Berwick Lane (U/C 5097).