SCHEDULE 2

PART 1 DEVELOPMENT WITHIN THE CURTILAGE OF A DWELLINGHOUSE
Class D

D Permitted development
The erection or construction of a porch outside any external door of a dwellinghouse.

D.1 Development not permitted
Development is not permitted by Class D if—
(a) the ground area (measured externally) of the structure would exceed 3 square metres;
(b) any part of the structure would be more than 3 metres above ground level; or
(c) any part of the structure would be within 2 metres of any boundary of the curtilage of the dwellinghouse with a highway.