10 Schedule 5 to the 1988 Regulations shall be amended by—
(a) the substitution of the side heading “Regulation 8 and 9” for the side heading of that Schedule;
(b) the substitution of the number “9” for the number “4” in paragraph 4 of Part I of that Schedule; and
(c) the addition of the following at the end of that Schedule:—

“PART III THE MATCH TEST FOR INVISIBLE PARTS OF COVERS
1 The test shall be carried out in accordance with those provisions of BS 5852: Part 1 which relate to butane flame ignition source 1. The filling material for this test shall be a foam which passes the ignitability test in Part 1 of Schedule 1 and which has a density of 24—26 kg per m3.
2 The criteria of failure shall be those specified in clause 9 of BS 5852: Part 1.”

.