Citation, commencement and interpretation
1. (1) These Regulations may be cited as the National Health Service (General Ophthalmic Services) (Scotland) Amendment Regulations 1989 and shall come into force on 1st April 1989.
(2) In these Regulations, the “principal Regulations” means the National Health Service (General Ophthalmic Services) (Scotland) Regulations 1986( ).
S.I. 1986/965, amended by S.I. 1988/543