SCHEDULE REQUIREMENTS RELATING TO THE COLLECTION AND HANDLING OF EGGS FROM LAYING FLOCKS
3 Where eggs are collected by an automatic system, any broken, leaking or dented eggs must be removed from the system as soon as practicable. Where eggs are collected by hand, any broken, leaking or dented eggs should be separated from other eggs and subsequently stored and disposed of separately from other eggs.