ELECTION OF SAFETY REPRESENTATIVES ETC.

9 Candidates
1 A person shall be eligible to be a candidate for election as the safety representative for a constituency if the installation manager is satisfied that he is a member of that constituency, that he is willing to stand as a candidate for the constituency, that he has been nominated by a second member of the constituency, and that his nomination has been seconded by a third member.
2 The installation manager shall provide every person who is eligible to be a candidate with reasonable facilities to enable him to promote his election campaign.