2 In relation to the year 1990, the period of summer time for the purposes of the Act shall be the period beginning at one o'clock, Greenwich mean time, in the morning of 25th March 1990 and ending at one o'clock, Greenwich mean time, in the morning of 28th October 1990 instead of the period specified in section 1 of the Act.