1990 No. 1965
WATER, ENGLAND AND WALES
The East Anglian, Essex and York (Pipelaying and Other Works) (Codes of Practice) Order 1990
Made 25th September 1990

Whereas East Anglian Water Company, Essex Water Company and The York Waterworks Plc each hold an appointment under Chapter I of Part II of the Water Act 1989 as a water undertaker (“the Companies”):
1989 c. 15.
And whereas each company has, pursuant to section 162(6)(a) of that Act, submitted to the Secretary of State for his approval a Code of Practice with respect to the exercise by the Companies of powers conferred by or by virtue of paragraph 4 of Schedule 19 to that Act (“the Codes of Practice”):
Copies of the Codes of Practice may be inspected at the Department of the Environment, Romney House, 43 Marsham Street, London, SW1P 3PY, and may be obtained free of charge from the appropriate company: East Anglian Water Company, 163 High Street, Lowestoft, Suffolk NR32 1HT; Essex Water Company, Hall Street, Chelmsford, Essex CM2 0HH; The York Waterworks Plc, Lendal Tower, York YO1 2DL.
And whereas the Secretary of State considers it appropriate to approve the Codes of Practice for the purpose of promoting what appear to him to be desirable practices with regard to the exercise by the Companies of those powers:
Now, therefore, the Secretary of State, in exercise of the powers under section 162(7) of the Water Act 1989, and of all other powers enabling him in that behalf, after consulting all such persons as he considers it appropriate to consult, hereby makes the following Order:

1 Citation
This Order may be cited as the East Anglian, Essex and York (Pipelaying and Other Works) (Codes of Practice) Order 1990.

2 Codes of Practice
The Codes of Practice prepared by the Companies and certified as such by the Secretary of State are hereby approved.
Signed by authority of the Secretary of State for the Environment
Dinah Nichols An Under Secretary in the Department of the Environment 25th September 1990