1991 No. 1318
ROAD TRAFFIC
The Motor Vehicles (Type Approval and Approval Marks) (Fees) Regulations 1991
Made 4th June 1991
Laid before Parliament 10th June 1991
Coming into force 1st July 1991

The Secretary of State for Transport, in exercise of the powers conferred by sections 61(1) and (2) of the Road Traffic Act 1988, and of the powers conferred by section 56(1) and (2) of the Finance Act 1973 with the consent of the Treasury, and of the powers conferred by the Department of Transport (Fees) Order 1988 and section 128 of the Finance Act 1990 and of all other enabling powers, and in relation to the exercise of the powers conferred by sections 61(1) and (2) of the Road Traffic Act 1988, after consultation with representative organisations in accordance with section 195(2) of that Act, hereby makes the following Regulations:—
1988 c. 52.
1973 c. 51.
S.I.1988/643, which was made under section 102 of the Finance (No. 2) Act 1987 (c. 51). The relevant reference in S.I.1988/643 is Table II of Schedule 1.
1990 c. 29.

1 Commencement and citation
These Regulations shall come into force on 1st July 1991 and be cited as the Motor Vehicles (Type Approval and Approval Marks) (Fees) Regulations 1991.

2 Revocation
The Motor Vehicles (Type Approval and Approval Marks) (Fees) Regulations 1990 are hereby revoked.
S.I.1990/461.

3 Interpretation
1 Unless the context otherwise requires, any reference in these Regulations to—
(a) a numbered regulation or Schedule is a reference to the regulation of or Schedule to these Regulations bearing that number;
(b) a numbered paragraph is a reference to the paragraph bearing that number in the regulation or Schedule in which that number appears; and
(c) a numbered section is a reference to the section bearing that number in the Road Traffic Act 1988.
2 In these Regulations, except where the context otherwise requires—
“applicant” means an applicant for the issue of a type approval certificate or authorisation for a vehicle or vehicle part for the purpose of a Community Instrument or ECE Regulation, an applicant for the issue of a type approval certificate or Minister’s approval certificate for a vehicle or vehicle part for the purpose of the national type approval scheme, or an applicant for the issue of a sound level measurement certificate;
“approval mark” means a marking designated as an approval mark by Regulations made under section 80;
“approval requirements” means—
(a) the requirements for examination and approval as regards the type approval requirements specified in—
(i) a Community Instrument;
(ii) Schedule 1 to the Great Britain Regulations;
(iii) Schedule 1 to the Great Britain Regulations for Goods Vehicles; and
(iv) an ECE Regulation; or
(b) the requirements for examination and marking authorisation relating to a marking designated as an approval mark by the Motor Vehicles (Designation of Approval Marks) Regulations 1979;
S.I.1979/1088, as amended by S.I.1980/582 and 2027, 1981/126 and 1732, 1982/1479, 1983/1602, 1985/113, 1986/369, 1989/1014 and 1990/1838.
“authorisation” means an authorisation in writing given by the Secretary of State for the application of an approval mark to a vehicle or vehicle part;
“Community Instrument” means a Council Regulation, a Council Directive or a Commission Directive;
“ECE Regulation” means a Regulation annexed to the Agreement concerning the adoption of uniform conditions of approval for motor vehicle equipment and parts and reciprocal recognition thereof concluded at Geneva on 20th March 1958 as amended to which the United Kingdom is a party;
“examination” means any examination or test, or series of examinations or tests carried out on a vehicle or vehicle part to ascertain that in respect of that vehicle or vehicle part approval requirements have been satisfied;
“Great Britain Regulations” means the Motor Vehicles (Type Approval) (Great Britain) Regulations 1984;
“Great Britain Regulations for Goods Vehicles” means the Motor Vehicles (Type Approval for Goods Vehicles) (Great Britain) Regulations 1982;
“Government or approved premises” means premises established or approved by the Secretary of State for Transport for the examination of vehicles or vehicle parts for the purposes of the national type approval scheme, or for the purpose of a Community Instrument or an ECE Regulation;
“motorcycle” has the same meaning as in the Motorcycles (Sound Level Measurement Certificates) Regulations 1980;
“national type approval scheme” means the scheme for the type approval of vehicles and vehicle parts provided for in the Great Britain Regulations and the Great Britain Regulations for Goods Vehicles;
“sound level measurement certificate” has the same meaning as in the Motorcyles (Sound Level Measurement Certificates) Regulations 1980;
“type approval certificate”, “Minister’s approval certificate” and “authorisation” include a modified or duplicate type approval certificate, Minister’s approval certificate or authorisation as the case may be;
“Type Approval Regulations” means the Motor Vehicles (Type Approval) Regulations 1980;
Cmnd 2535.
Cmnd 3562.
By an instrument of accession dated 14th January 1963 deposited with the Secretary General of the United Nations on 15th January 1963.
S.I.1984/981, as amended by S.I.1984/1401 and 1761, 1985/1651, 1986/739, 1987/1509, 1988/1522, 1989/1580, 1990/94 and 1990/1839.
S.I.1982/1271, as amended by S.I.1984/697 and 1402, 1985/46, 1986/427 and 1089, 1987/1508, 1988/1523 and 1989/1579.
S.I.1980/765, as amended by S.I.1988/1640, 1989/713 and 1591.
S.I.1980/1182; the relevant amending instruments are S.I.1982/7, 1986/1501, 1987/524, 1988/1103 and 1669, 1989/1578 and 2262.
3 A reference in these Regulations to a vehicle in category L2 or L5 is a reference to a vehicle described respectively as L2 or L5 in ECE Regulation 13 of 29th May 1969 and a reference to a vehicle in category M1, M2, M3, N1, N2 or N3 is a reference to a vehicle described respectively as M1, M2, M3, N1, N2 or N3 in Council Directive 70/156/EEC of 6th February 1970.
O.J. L42, 23.2.70, p.1.

4 Fees—basic scale for examinations of vehicles or parts of vehicles
1 In this regulation any reference to a numbered column is a reference to the column bearing that number in Part II of Schedule 1.
2 Subject to the subsequent provisions of these Regulations, the fee prescribed as regards an approval requirement specified in relation to a fee number in column 1 is the fee specified in relation to that fee number in column 4.
3 Part I of Schedule 1 contains an index to Part II of that Schedule.
4 Where, in relation to an approval requirement specified in column 2, more than one type of examination or more than one type of vehicle or vehicle part is specified in column 3 in connection with that approval requirement, the fee prescribed as regards that approval requirement is that specified in column 4 opposite the examination, vehicle or vehicle part in question.
5 The fees specified in column 4(a) are hereby prescribed in a case where the examination is to be carried out on Government or approved premises by an officer of the Department of Transport or a person appointed by the Secretary of State to act on his behalf.
6 The fees specified in column 4(b) are hereby prescribed in a case where the examination is to be carried out at other premises under the supervision of an officer of the Department of Transport or a person appointed by the Secretary of State to act on his behalf.
7 Schedule 6 shall have effect for the interpretation of—
(a) certain expressions relating to Community Instruments and ECE Regulations, and
(b) certain abbreviations,
used in Schedule 1.

5 Fees—consecutive examinations
Where more than one vehicle or vehicle part of the same type but embodying minor variations are submitted by an applicant with a view to carrying out the examinations consecutively on each item, and the case is one where all the examinations can be carried out without setting up the examination apparatus again, the fee to be paid for the carrying out of each examination after the first one is such proportion of the fee prescribed in regulation 4 as the Secretary of State considers to be appropriate in view of the work involved in carrying out such examination.

6 Fees—partial examinations
1 Where a certificate to which this paragraph applies has been issued in relation to a vehicle or vehicle part and in consequence of an alteration in the design specification of the vehicle or vehicle part, either—
(a) a further examination of the vehicle or vehicle part is needed with a view to the issue of a modified or further certificate but the alteration is not so extensive as to require that the further examination shall be as complete and exhaustive as the original examination; or
(b) an applicant requires a modification of a certificate but the alteration is not so extensive as to require a further examination of the vehicle or vehicle part and can be carried out on an examination of data supplied by the applicant,
the fee for such an examination is such proportion of the fee prescribed in regulation 4 as the Secretary of State considers to be appropriate.
2 Paragraph (1) applies to—
(a) a sound level measurement certificate; or
(b) a type approval certificate, or an authorisation, in relation to—
(i) a Community Instrument; or
(ii) an ECE Regulation; or
(c) a type approval certificate, or a Minister’s approval certificate, in relation to the national type approval scheme.
3 Where, in the case of any examination as is mentioned in regulation 4 or 5 or in paragraph (1)—
(a) it has been found impossible to complete the examination satisfactorily; or
(b) the vehicle or vehicle part submitted for the examination does not satisfy completely the requirements of the examination,
and in consequence a further, but partial, examination of the vehicle or vehicle part is required, the fee to be paid for such further examination is such proportion of the fee prescribed in regulation 4 as the Secretary of State considers to be appropriate in view of the nature and extent of the further, but partial, examination.
4 Where more than one vehicle or vehicle part of the same type but embodying minor variations is submitted by an applicant and it is unnecessary to submit each individual vehicle or vehicle part to a complete examination, the fee to be paid for the carrying out of the partial examination on a particular vehicle or vehicle part is such proportion of the fee prescribed in regulation 4 as the Secretary of State considers to be appropriate in view of the nature and extent of the partial examination.

7 Fees—final examination of complete vehicle
1 The fee for the final examination of a vehicle to which the Great Britain Regulations apply with a view to the issue in respect of that vehicle of a document specified in column 1 of Schedule 2 where, before the examination takes place, type approval procedures have been carried out (whether in Great Britain or elsewhere) to ascertain that in respect of that vehicle all the approval requirements which—
(a) are referred to in Schedule 1 to those Regulations;
(b) relate to particular parts or aspects of a vehicle; and
(c) are applicable to the vehicle,
have been satisfied, is of the amount specified in column 3 of Schedule 2.
2 The fee for the final examination of a vehicle to which the Great Britain Regulations for Goods Vehicles apply with a view to the issue in respect of that vehicle of a document specified in column 1 of Schedule 3 where, before the examination takes place, type approval procedures have been carried out (whether in Great Britain or elsewhere) to ascertain that in respect of that vehicle all the approval requirements which—
(a) are referred to in Schedule 1 to those Regulations;
(b) relate to particular parts or aspects of a vehicle; and
(c) are applicable to the vehicle,
have been satisfied, is of the amount specified in paragraph (3).
3 The amount referred to in paragraph (2) is the amount shown in—
(a) column 2(a) of Schedule 3 if the vehicle is in category L2, L5 or N1;
(b) column 2(b) of Schedule 3 if the vehicle is in category N2; and
(c) column 2(c) of Schedule 3 if the vehicle is in category N3.
4 Where in the case of an examination of a complete vehicle mentioned in paragraphs (1) or (2) above—
(a) it has been found impossible to complete that examination satisfactorily; or
(b) the vehicle has been found not to comply in all aspects with the relevant approval requirements; or
(c) the vehicle is one which has been assembled in more than one stage by more than one manufacturer; or
(d) a type approval certificate or Minister’s approval certificate has previously been issued in respect of the model of the vehicle but the vehicle incorporates certain changes in detail not covered by that certificate,
and in consequence a further, but partial, examination of the vehicle is required before the relevant document can properly be issued in respect of it, the fee for that partial examination shall be such proportion of the relevant sum specified in Schedule 2 or, as the case may be, Schedule 3 as the Secretary of State considers to be appropriate in view of the nature and extent of that partial examination.

8 Fees—avoidance of duplication
Where the examination of a vehicle or vehicle part for the purposes of a Community Instrument or ECE Regulation is carried out at the same time as the examination of that vehicle or vehicle part for the purposes of the national type approval scheme, then in so far as one and the same operation or series of operations serves for both examinations, the fee payable under these Regulations shall be the fee for only one examination.

9 Fees—issue of documents
1 The fee for the issue of a document of a type specified in column 1 of Schedule 4 (being a document relating to a vehicle part) is the fee of the amount specified in relation thereto in column 3 of Schedule 4.
2 The fee for the issue of a document specified in column 1 of Part I of Schedule 5 (being a document relating to a vehicle to which the Great Britain Regulations apply) is the amount specified in relation thereto in column 3 of Part I of Schedule 5.
3 The fee for the issue of a document specified in column 1 of Part II of Schedule 5 (being a document relating to a vehicle to which the Great Britain Regulations for Goods Vehicles apply) is the amount specified in relation thereto in column 3 of Part II of Schedule 5.
4 The fee for the issue of a sound level measurement certificate is £45.

10 Fees—visits outside the United Kingdom
1 Where, in connection with an application for or the performance of, the carrying out, or supervision by or on behalf of the Secretary of State, of an examination of a vehicle or vehicle part in relation to the issue of a type approval certificate or authorisation for the purpose of a Community Instrument, or ECE Regulation, or in relation to a type approval certificate or Minister’s approval certificate for the purpose of the national type approval scheme, a visit to a place outside the United Kingdom is made, or is arranged to be made, by one or more persons acting for or on behalf of the Secretary of State, then in addition to the fee or fees prescribed by the regulations above, there shall be paid by the applicant on demand by or on behalf of the Secretary of State a further fee equal to the total of—
(a) the travelling and subsistence expenses reasonably incurred or expected to be incurred by each person so acting in relation to the application or examination (including expenses outstanding after the cancellation of any travelling or subsistence arrangements which result from the withdrawal of any such application); and
(b) the whole, or such proportion as the Secretary of State may determine is reasonably attributable to the application or examination, of a sum of £50 for each hour spent or expected to be spent by each person so acting whilst travelling otherwise than on land in the United Kingdom, wholly or partly in relation to the application or examination.
2 The reference to expenses in paragraph 1(a) does not include any expenses relating to—
(a) travelling on land in the United Kingdom, or
(b) any flight which both begins and ends within the United Kingdom.
3 If—
(a) payments have been made in accordance with paragraph (1) in respect of travelling and subsistence expenses expected to be incurred, or in respect of time expected to be spent in travelling; and
(b) the amount of travelling and subsistence expenses actually incurred or the time actually spent travelling in consequence of the application is greater or less than was estimated,
the fee payable under paragraph (1) shall be re-calculated in accordance with that paragraph by reference to the actual travelling and subsistence expenses incurred and the actual time spent in travelling, and the difference shall be paid by, or as the case may be, refunded, to the applicant.

11 Payment of fees
1 The fee for the carrying out or supervision of an examination of a vehicle or vehicle part in connection with the issue of a type approval certificate or authorisation, for the purpose of a Community Instrument, or ECE Regulation or in connection with the issue of a sound level measurement certificate shall be paid when the application is made for the issue of the type approval certificate, authorisation or sound level measurement certificate for the vehicle or vehicle part in question.
2 The fee for the carrying out or supervision of an examination of a vehicle or vehicle part in connection with the issue of a type approval certificate or a Minister’s approval certificate shall be paid when the applicant is notified by the Secretary of State in accordance with the provisions of the Great Britain Regulations, or the Great Britain Regulations for Goods Vehicles of the fee payable.
3 The fee for the issue of a document specified in Schedule 4 or 5 shall be paid—
(a) in a case where the examination of a vehicle or vehicle part for which a fee is payable under these Regulations is required before the document is issued, when the applicant is notified of the result of the examination; and
(b) in any other case, when the application is made for the issue of the document.

12 Fees on withdrawals and cancellations
1 Subject to the provisions of regulation 13, if an applicant—
(a) after he has been notified of the time and place for the examination withdraws his application; or
(b) does not submit the vehicle or vehicle part for the examination at the time and place fixed therefor,
he shall be liable to pay a cancellation fee to cover the abortive work involved in dealing with the application and making arrangements for the examination.
2 In the case of an examination of a vehicle or vehicle part to which a fee specified in Schedule 1 applies—
(a) if the Secretary of State is, not less than 7 days before the date fixed for the examination, notified of the withdrawal or of the intention not to submit the vehicle or vehicle part for the examination, the cancellation fee shall be £90;
(b) if the Secretary of State is not so notified within that period—
(i) where the fee is specified in column (a) of Schedule 1, the cancellation fee shall be a quarter of that fee plus any wasted expenses reasonably incurred by the Secretary of State in the provision of any facility for the particular examination; or
(ii) where the fee is specified in column (b) of Schedule 1, the cancellation fee shall be half of that fee or £200 whichever is the less.
3 In the case of a further or partial examination of a vehicle or vehicle part in the circumstances described in regulation 6, the cancellation fee shall be such proportion of the fee as the Secretary of State considers to be appropriate.
4 In the case of an examination of a vehicle to which a fee specified in Schedule 2 or Schedule 3 applies—
(a) if the Secretary of State is, not less than 14 days before the date fixed for the examination, notified of the withdrawal or of the intention not to submit the vehicle for examination, the cancellation fee shall be £90;
(b) if the Secretary of State is not so notified within that period, the cancellation fee shall be £265.
5 Any cancellation fee for which an applicant is liable in accordance with the foregoing provisions of this regulation shall be provided—
(a) in a case where the applicant has paid the fee prescribed by these Regulations for the examination in question, by the Secretary of State retaining the cancellation fee from the fee which has been paid; or
(b) in any other case by the applicant paying the cancellation fee to the Secretary of State within 14 days of the issue by the Secretary of State of a request for such payment.
6 An applicant who is liable for a cancellation fee under this regulation in respect of an application shall also be liable for any fee payable under regulation 10, but all other fees under these Regulations in respect of the application shall be reduced to nil (the balance of any sums paid in respect of the application being refundable).

13 Submission of alternative vehicle or vehicle part for examination
Where an applicant does not wish, or is unable, to submit the vehicle or vehicle part in respect of which the application was made, for examination at the time and place appointed, but is able to submit for examination at that time and place some other vehicle or vehicle part which can conveniently be fitted into the programme of examinations being carried out at that place and in respect of which he has made an application he shall be entitled, subject to any adjustment by way of refund or additional payment so as to secure that the appropriate fee is paid for the examination which actually takes place, to have the sum which he orginally paid applied in payment of the fee for that examination without being liable to pay a cancellation fee under regulation 12(1), but in that event he shall pay the appropriate fee prescribed by these Regulations when applying for a new appointment for the examination which he originally sought.

14 Fees to be paid in relation to prescribed and notifiable alterations
1 The fee prescribed in the event of particulars of a prescribed alteration being sent to the Secretary of State in accordance with regulation 10 of the Great Britain Regulations for Goods Vehicles is—
(a) if the vehicle is one in respect of which a certificate of conformity has been issued—
(i) £30 if the vehicle is in category L2, L5, or N1;
(ii) £35 if the vehicle is in category N2 or N3; or
(b) if the vehicle is one in respect of which a Minister’s approval certificate has been issued—
(i) £30 if the vehicle is in category L2, L5, or N1;
(ii) £35 if the vehicle is in category N2 or N3.
2 The fee prescribed in respect of a notification made in accordance with a condition attached to a type approval certificate pursuant to section 56(1)(b) issued in respect of a vehicle to which the Great Britain Regulations for Goods Vehicles apply is—
(a) £5 if the vehicle is in category L2, L5 or N1; or
(b) £10 if the vehicle is in category N2 or N3.
3 The fee prescribed in respect of a notification which is evidence of a kind mentioned in section 58(4) and (5) in respect of a vehicle to which the Great Britain Regulations for Goods Vehicles apply is—
(a) £5 if the vehicle is in category L2, L5 or N1; or
(b) £10 if the vehicle is in category N2 or N3.
Signed by authority of the Secretary of State for Transport
Christopher Chope Parliamentary Under Secretary of State, Department of Transport 13th May 1991
We consent to the making of these Regulations to the extent that they are made in exercise of the powers conferred by section 56(1) and (2) of the Finance Act 1973.
Thomas Sackville Sydney Chapman Two of the Lords Commissioners of Her Majesty’s Treasury 4th June 1991
SCHEDULE 1
Regulation 4

PART I Index to the table of fees for the examination of vehicles or parts of vehicles set out in Part II.
Section A—Component Tests
Fee Series	Subject Matter
01000	Headlamps
03000	Signal lamps
05000	Other lamps
07000	Filament lamps
09000	Seat belts
11000	Child restraints
13000	Glass
15000	Mirrors
17000	Other components
Section B—Vehicle Tests
Fee Series	Subject Matter
20000	Electronic systems
22000	Engine related tests Emissions—light vehicles Emissions—heavy vehicles Power and fuel consumption
24000	Sound levels
26000	Dynamic tests Brakes—trailers Brakes—other vehicle types Motorcycle brakes
27000	Steering Temporary spare wheel Speedometers
28000	Body structure Latches and hinges Protective steering Other impacts (ie rear impact, head-on impact) Fire risks Seat belts and anchorages
29000	Seat tests Body and trim (ie interior fittings, exterior projections) Rear and side protection (incl. fuel tanks)
30000	Visibility Rear-view mirrors Forward field of vision Defrost and demist systems Wiper and washer systems
31000	Heating systems
32000	Lighting installation Installation of lighting Headlamp cleaners
34000	Tyres
36000	Controls Anti-theft devices Foot controls Identification of controls, tell-tales and indicators
38000	PSV tests
40000	Other vehicle tests Statutory plates Space for mounting and fitting of rear registration plates Towing hooks

PART II TABLE OF FEES FOR THE EXAMINATION OF VEHICLES OR PARTS OF VEHICLES
1	2		3	4	
	Approval requirements		Particulars of type of examination, vehicle or vehicle part where not uniform in relation to each approval requirement	Amount of fee for examination	
Fee No.	(a)	(b)		(a)	(b)
	Subject matter	Document in which requirement is specified		£	£
SECTION A COMPONENTS					
01—HEADLAMPS					
01001 01002 01003	Headlamps emitting an asymmetrical passing beam or driving beam or both	Directive 76/761/EEC or ECE Regulation 1 or Item 6 in Schedule 1 to the G.B. Regs	Type C Type R Type CR	630 570 730	— — —
01004 01005 01006	Headlamps emitting an asymmetrical passing beam or driving beam or both	Directive 89/517/EEC or ECE Regulation 1.01	Type C Type R Type CR	1430 1380 1530	— — —
01201 01202 01203	Sealed-beam headlamps emitting a European asymmetrical passing beam or a driving beam or both	ECE Regulations 5 and 5.01 or Item 6 in Schedule 1 to the G.B. Regs	Type SR Type SC Type SCR	880 920 1060	— — —
01204 01205 01206	Sealed-beam headlamps emitting a European asymmetrical passing beam or a driving beam or both	ECE Regulations 5.02 or Item 6 in Schedule 1 to the G.B. Regs	Type SR Type SC Type SCR	1690 1730 1870	— — —
01401 01402 01403	Headlamps emitting an asymmetrical passing beam or a driving beam or both equipped with halogen H1, H2 or H3 filament lamps	ECE Regulation 8 or Item 6 in Schedule 1 to the G.B. Regs	Type HC Type HR Type HCR	630 570 730	— — —
01406 01407 01408	Headlamps emitting an asymmetrical passing beam or a driving beam or both equipped with halogen H1, H2 or H3 filaments lamps	ECE Regulation 8.04 or Item 6 in Schedule 1 to the G.B. Regs	Type HC Type HR Type HCR	1430 1380 1530	— — —
01601 01602 01603	Headlamps emitting an asymmetrical passing beam or a driving beam or both and equipped with halogen filament lamps (H4 lamps)	ECE Regulations 20 and 20.01 or Item 6A in Schedule 1 to the G.B. Regs	Type HC Type HR Type HCR	680 630 790	— — —
01604 01605 01606	Headlamps emitting an asymmetrical passing beam or a driving beam or both and equipped with halogen filament lamps (H4 lamps)	ECE Regulation 20.02 or Item 6A to Schedule 1 to the G.B. Regs	Type HC Type HR Type HCR	1480 1440 1590	— — —
01801 01802 01803	Halogen sealed-beam (H4SB) headlamps emitting an asymmetrical passing beam or a driving beam or both	ECE Regulations 31 and 31.01 or Item 6 in Schedule 1 to the G.B. Regs	Type HSR Type HSC Type HSCR	750 860 1000	— — —
01804 01805 01806	Halogen sealed-beam (H4SB) headlamps emitting an asymmetrical passing beam or a driving beam or both	ECE Regulations 31.02	Type HSR Type HSC Type HSCR	1550 1660 1810	— — —
02001 02002 02003	ADDITIONAL tests for headlamps, carried out at the same time as one of the respective tests specified above	Respective standards listed in column 2 above, included with the Regulation shown in column 3 of this item	Addition for COLOUR alternative for R5 or R31 Addition for COLOUR alternative for R8 or R20 Addition for STONEGUARD alternative for R1, R5, R8, R20, R31	390 180 320	—
03—SIGNAL LAMPS					
03001 03002	Reflex reflecting devices	Directive 76/757/EEC or ECE Regulation 3 or Item 8 in Schedule 1 to the G.B. Regs	Universal mounting Left and right version	660 790	— —
03004 03005 03006	Reflex reflecting devices	ECE Regulation 3.01 or 3.02 or Item 8A in Schedule 1 to the G.B. Regs	Universal mounting Left and right version Clear & amber extension	700 840 1020	— —
03201 03202	Direction indicators	Directive 76/759/EEC or ECE Regulation 6 or Item 9 in Schedule 1 to the G.B. Regs	Single function, single lamp two orientations Two orientations	630 880	— —
03203 03204	Direction indicators	Directive 89/277/EEC or ECE Regulation 6.01 or Item 9 in Schedule 1 to the G.B. Regs	Single function, single lamp Single function, assembly of two lamps	730 1110	— —
03401 03402	Lamps-side, rear or stop	Directive 76/758/EEC or ECE Regulation 7 or Item 7 in Schedule 1 to the G.B. Regs	Single function, side, rear or stop or two orientations	630 880	— —
03403 03404	Lamps-side, rear or stop	Directive 89/516/EEC or ECE Regulation 7.01 or Item 7A in Schedule 1 to the G.B. Regs	Single function, single lamp Single function, assembly of two lamps	730 1110	— —
03601 03602 03603	ADDITIONAL tests for signal lamps, carried out at the same time as one of the respective tests specified above	Relevant standards listed in column 2 above, included with a Regulation shown in column 3 of this item	EACH additional function as part of a rear group, to Regulations: 6 or 7 or 23 or 23.01 6.01 or 7.01 single lamp 6.01 or 7.01 assembly of two lamps	210 270 630	— — —
04001 04002	Signal lamps for motorcycles or mopeds	ECE Regulation 50	Any one function, position or stop or indicator Each additional function as part of same group	630 200	— —
04201	Advance warning triangles	ECE Regulation 27, 27.01 or 27.02	Full test	1580	—
04202	Advance warning triangles	ECE Regulation 27.03	Full test	1800	—
05—OTHER LAMPS					
05001 05002	Devices for the illumination of rear registration plates	Directive 76/760/EEC or ECE Regulations 4 and 4.01	First examination Each additional examination carried out as part of the same test process	630 180	— —
05201	Front fog lamps	Directive 76/762/EEC or ECE Regulations 19 and 19.01	Full test on standard lamp unit	660	—
05202	Front fog lamps	ECE Regulation 19.02	Full test on standard lamp unit	1460	—
05250 05251	ADDITIONAL tests for fog lamps, carried out at the same time as tests specified above	ECE Regulation 19 or 19.02	Addition of COLOUR alternative Addition of STONEGUARD alternative	300 300	— —
05401	Reversing lamps	Directive 77/539/EEC or ECE Regulations 23 and 23.01	Single function	630	—
05601	Rear fog lamps	Directives 77/538/EEC and 89/518/EEC or ECE Regulation 38 or Item 21 in Schedule 1 to the G.B. Regs	Single function	770	—
05801 05802	Parking lamps	Directive 77/540/EEC or ECE Regulation 77	Single function Two functions	630 810	— —
06001 06002	Special warning lights	ECE Regulation 65	Full test – Class A Full test – Class B	1820 2550	— —
07—FILAMENT LAMPS					
07001	Incandescent electric filament lamps for headlamps emitting an asymmetrical passing beam or driving beam or both	Directive 76/761/EEC or ECE Regulation 2 or Item 6 in Schedule 1 to the G.B. Regs	Single bulb type	1020	—
07201	Halogen H1, H2 or H3 filament lamps for headlamps emitting an asymmetrical passing beam or driving beam or both	ECE Regulation 8 or Item 6 in Schedule 1 to the G.B. Regs	Single bulb type	890	—
07401	Halogen H4 filament lamps for headlamps emitting an asymmetrical passing beam or driving beam or both	ECE Regulation 20 or Item 6A in Schedule 1 to the G.B. Regs	Single bulb type	1170	—
07601 07602 07603 07604 07605 07606	Filament lamps	ECE Regulation 37.01 or Item 6 or 6A in Schedule 1 to the G.B. Regs	Type R2 Type H4 Types H1, H2 and H3 Type P25-2 Types P25-1, R19, C11, C15, T8/4, W10/5, W10/3, F1, F2 and F3 Types S1 and S2	1020 1170 890 610 510 1020	— — — — — —
07607 07608 07609 07610 07611 07612 07613 07614 07615 07616	Filament lamps	ECE Regulations 37.02 and 37.03 or Item 6 or 6A in Schedule 1 to the G.B. Regs	Types R2 and S4 Types H4 and HS1 Types H1, H2, H3 and HS2 Type P21/5W Types P21/W, R5W, R10W, C5W, C21W, T4W, W5W, F1, F2 and F3 Types S1 and S2 Type S3 Type P21/4W Type PY21W Types H1, H2 and H3 selective yellow	1020 1170 890 610 510 1020 890 690 660 1050	— — — — — — — — — —
09—SEAT BELTS					
09001 09002 09003	Seat belts	ECE regulation 16.03 or Item 12A(ia) in Schedule 1 to the G.B. Regs or Directives 77/541/EEC and 81/576/EEC	Two or three point static belt assembly Two or three point belt with an emergency locking retractor Addition to above when tested as a restraint system	2340 2790 1770	— — —
09004 09005 09006 09007 09008	Seat belts	ECE Regulation 16.04 or Item 12A(ia) in Schedule 1 to the G.B. Regs or Directive 82/319/EEC	Two or three point static belt assembly Two or three point belt with an emergency locking retractor Addition to above when tested as a restraint system Four point harness belt Harness belt with retractor	2390 2840 1770 2390 2790	— — — — —
11—CHILD RESTRAINTS					
11010 11011 11012 11020 11050 11051	Child restraints	ECE Regulation 44.01 or 44.02	CHILD HARNESS—assembly without retractors CHILD SEATS—single Mass Group attachment system:— Forward facing with child harness and seat restraint Rearward facing with child harness and seat restraint BOOSTER seat/cushion with adult belt to restrain child ADDITIONAL tests to above for:— Automatically locking retractor Emergency locking retractor	1920 2620 3310 1280 370 460	— — — — — —
13—SAFETY GLASS					
13001	Safety glass	Item 15 or 15A in Schedule 1 to the G.B. Regs	Glass manufactured under licence issued by the British Standards Institution	140	—
13002	Safety glass	ECE Regulation 43 or Item 15B in Schedule 1 to the G.B. Regs	Conversion of a BSAU 178 approval to ECE Regulation 43	140	—
13003 13004 13010 13011 13020 13021 13050 13051	Safety glass	ECE Regulation 43 or Item 15B in Schedule 1 to the G.B. Regs	Windscreens: toughened toughened-slow moving vehicle laminated treated and laminated Windows other than windscreens: toughened laminated Additional test on: plastic coated glass double-glazed units	1630 1350 2120 2200 890 1080 120 220	— — — — — — — —
15—MIRROR COMPONENT TESTS					
15001	Rear-view mirrors	Directives 79/795/EEC, 85/205/EEC and 86/562/EEC	Component test, witnessed at manufacturers	—	430
15002 15003 15004 15005 15006	Rear-view mirrors	Directives 79/795/EEC, 85/205/EEC, 86/562/EEC and 88/321/EEC	Component test on single mirror of large dimensions or complex mounting involving two impact tests Component test on single mirror of moderate dimensions and simple mounting system involving two impact tests Modified mounting Additional type Reflectivity only	850 670 990 1090 390	— — — — —
15201	Rear-view mirrors for motorcycles	Directive 80/780/EEC	Component test (as 15003 above)	670	430
17—OTHER COMPONENTS					
17001 17002	Recording equipment for road transport vehicles	Community Regulations 1463/70, 1787/73, 2828/77 and 3821/85	Instrument and chart Chart only, instrument supplied by applicant	3580 1060	— —
17201 17202	Rear marking plates heavy vehicles	ECE Regulation 69	Rear marking plates additional model	2470 1650	— —
17204 17205	Rear marking plates slow vehicles	ECE Regulation 70	Rear marking plate additional model at same time	2470 1650	— —
SECTION B—VEHICLE RELATED					
20—ELECTRONIC					
20001 20002 20003 20004	Radio-interference supression	Directive 72/245/EEC or ECE Regulation 10 or Item 2A in Schedule 1 to the G.B. Regs or Item 5A in Schedule 1 to the G.B. Regs for Goods Vehicles	First examination (Government or approved test site) Each additional examination at the same time First examination (Manufacturer’s test site) Each additional examination at the same time	520 390 700 430	— — 410 290
22—ENGINE RELATED TESTS					
EMISSIONS—LIGHT VEHICLES					
22001 22002	Exhaust emissions—spark ignition	Directive 78/665/EEC or Item 4B in Schedule 1 to the G.B. Regs or Item 2 in Schedule 1 to the G.B. Regs for Goods Vehicles	Type I, II and III tests Each additional Type I test	— —	560 90
22003 22004	Exhaust emissions—petrol or diesel	Directives 83/351/EEC, 88/76/EEC (European cycle) and 89/491/EEC or ECE Regulation 83 or Items 4C or 4D in Schedule 1 to the G.B. Regs or Items 2B or 2C in Schedule 1 to the G.B. Regs for Goods Vehicles	European cycle Type I, II and III test Each additional Type I test	1850 720	560 90
22005 22006	Exhaust emissions—petrol or diesel	Directive 88/76/EEC, 89/458/EEC and 89/491/EEC	Alternative Annex IIIA cycle: Type I, II and III tests Each additional Type I test	2860 1490	770 160
22010 22011	Exhaust emissions—diesel	Directive 88/436/EEC, 89/458/EEC and 89/491/EEC or Item 27 in Schedule 1 to the G.B. Regs	Emissions and Particulates Type I test Each additional Type I test	— —	620 170
EMISSIONS—HEAVY VEHICLES					
22201	Emissions	Item 2A in Schedule 1 to the G.B. Regs for Goods Vehicles	Crankcase emissions	330	250
22202	Exhaust emissions—diesel	Item 3B in Schedule 1 to the G.B. Regs for Goods Vehicles	BSAU 141 certificate	240	180
22203	Smoke emissions—diesel engine	Directive 72/306/EEC and 89/491/EEC or ECE Regulation 24.02 or ECE Regulation 24.03	VEHICLE TEST of smoke emissions to the co-incident requirements of each Regulation or Directive	2510	470
22210 22211 22212	Diesel engine power and smoke emissions	Directive 72/306/EEC, 80/1269/EEC, 88/195/ EEC and 89/491/EEC or ECE Regulation 24.02 or ECE Regulation 24.03	BENCH TESTS carried out on a single engine to the co-incident requirements of respective Regulation or Directive Power and smoke Power only Smoke only	6340 5910 5900	660 550 470
22214	Installation of approved engine	ECE Regulation 24.03 Part II	Verification of installed conditions and check of intake and exhaust pressure	800	350
22401 22402	Diesel gaseous emissions	Directive 88/77/EEC or ECE Regulation 49.01 or Item 4E in Schedule 1 to the G.B. Regs or Item 2D in Schedule 1 to the G.B. Regs for Goods Vehicles	Full bench test Test as a CONTINUATION of an engine tested for power or smoke on the same bench (carry over power curve)	7900 2760	790 480
22501 22502	Unleaded fuel compatibility	Item 25 of G.B. Regs or Item 7 of G.B. Regs for Goods Vehicles	Full Test Full Test	— —	100 100
22503 22504	Unleaded fuel filler input orifice	Item 26 of G.B. Regs or Item 8 of G.B. Regs for Goods Vehicles	Full test and inspection Full test and inspection	140 140	130 130
POWER					
22601 22602	Power to weight ratio	Item 1A in Schedule 1 to the G.B. Regs for Goods Vehicles	Where power to weight ratio is less than 6 kilowatts per tonne Where power to weight ratio is 6 kilowatts per tonne or more	— —	170 160
22603 22604	Power to weight ratio	Item 1 in Schedule 1 to the G.B. Regs for Goods Vehicles	Where power to weight ratio is less than 6 kilowatts per tonne Where power to weight ratio is 6 kilowatts per tonne or more	— —	150 140
22610	Engine power	Directive 80/1269/EEC or 88/195/EEC and 89/491/EEC or (Equivalent draft ECE Regulation)	Full bench test on petrol or light diesel engine	5950	560
FUEL CONSUMPTION					
22801 22802 22803 22804 22805 22806	Fuel consumption	Directive 80/1268/EEC and 89/491/EEC or (Equivalent draft ECE Regulation)	WITNESS of measurements for urban cycle, plus 90 and 120 km/h constant speed condition, to determine: consumption—(90 and 120 km/h on TRACK) ROAD LOADS for dynamometer settings consumption on DYNAMOMETER (known loads) PERFORMANCE measurements as above: consumption (90 and 120 km/h on TRACK) ROAD LOAD measurements— all speeds consumption on DYNAMOMETER (known loads)	— — — 2580 780 1440	830 860 630 — — —
24—SOUND LEVELS					
24001 24002 24003	Sound levels	Directives 70/157/EEC, 75/350/EEC, 77/212/EEC, 81/334/EEC, 84/372/EEC and 84/424/EEC or Items 14B, 14C and 14D in Schedule 1 to the G.B. Regs or Items 4B, 4C, 4D and 4E in Schdule 1 to the G.B. Regs for Goods Vehicles	Drive by and static test on: category M1 and N1 vehicles other category vehicles Drive by measurements on M1 and N1 vehicles for comparison of: replacement silencers	820 1120 1310	380 470 490
24050 24051 24052	Silencer conditioning, in preparation for sound level by tests above	Standards in column 2 above for fee numbers 24001, 24002 and 24003	ADDITION to drive by test for silencer conditioning by: Dynamometer bench method Road method (driver supplied by applicant) Pulsation method—on vehicle or prepared engine on bench	— 190 990	260 160 180
24201 24202	Audible warning devices	Directive 70/388/EEC or Regulation 28.01	Laboratory test on pair of horns Vehicle-installed sound level	2870 430	660 260
24401 24403	Motorcycle sound levels	Directive 78/1015/EEC, 87/56/EEC or 89/235/EEC (S.I. 1980 No. 765 and 1988 No. 1640)	Drive by and static test Replacement silencer	610 —	340 440
26—DYNAMIC TESTS					
BRAKES—TRAILERS					
26001 26002 26003 26004 26005	Brakes—small trailers	Directives 71/320/EEC, 74/132/EEC, 75/524/EEC, 79/489/EEC, 85/647/EEC and 88/194/EEC (Excluding Annexes X, XI and XII) or ECE Regulations 13.03, 13.04 and 13.05 (Excluding Annexes 13, 14 and 15, except where stated in column 3)	Trailers of category 01 not fitted with brakes Inertia braked trailers up to category 02:— System compatibility Control device Foundation brake Electric braked trailers of category 02, to ECE Reg. 13.05 Annex 14 or Directive 85/ 647/EEC Annex XI	270 990 1230 890 2300	210 — 620 — —
26021	Brakes—larger air braked trailers	Directives 71/320/EEC, 74/132/EEC, 75/524/EEC and 79/489/EEC or ECE Regulations 13.03 and 13.04	Static and LADEN Dynamic tests on air braked trailers. Excluding anti-lock and Type I and II fade tests to Annex VII	2500	—
26022	Brakes—larger air braked trailers	Directives 85/647/EEC and 88/194/EEC or ECE Regulation 13.05	Static, laden and UNLADEN Dynamic tests on air braked trailers. Excluding anti-lock and Type I and II fade tests to Annex VII	2710	—
26024 26025	Brakes—larger air braked trailers	Directive 85/647/EEC or 88/194/EEC or ECE Regulation 13.05	Tests on the ANTI-LOCK requirements of Annex 13 of ECE Regulation 13.05 and Annex X of Directive 85/647/EEC. (Excl. EMI) CONTINUATION normal brake test	1500 1130	— —
26026 26027	Brakes—larger air braked trailers	Directives 71/320/EEC, 74/132/EEC, 75/524/EEC, 79/489/EEC, 85/647/EEC and 88/194/EEC or ECE Regulations 13.03, 1304 and 13.05	Type I and II FADE TESTS of an axle system leading to the issue of an Annex VII report to Directive and Annex II to Regulation … on TRACK on DYNAMOMETER	1700 680	— 590
BRAKES—OTHER VEHICLE TYPES					
26201	Brakes—other vehicle types	Item 6E in Schedule 1 to the G.B. Regs for Goods Vehicles	Tests for slow vehicles and public works vehicles	840	630
26202	Brakes—other vehicle types	ECE Regulations 13.03, 13.04 and 13.05 or Items 13D and 13F in Schedule 1 to the G.B. Regs	Tests for category L5 three wheel vehicles	1600	850
26203 26204 26205 26206 26207 26208 26209	Brakes—other vehicle types	Directives 71/320/EEC, 74/132/EEC, 75/524/EEC, 79/489/EEC, 85/647/EEC and 88/194/EEC (excluding Annexes X, XI and XII) or ECE Regulations 13.03, 13.04 and 13.05 (excluding Annexes 13, 14 and 15) or Items 13A, 13B, 13C, 13E and 13G in Schedule 1 to the G.B. Regs or Items 6, 6B, 6C, 6D, 6F, 6H, 6I and 6J in Schedule 1 to the G.B. Regs for Goods Vehicles	Brakes—hydraulic and hydraulic assisted, (excluding anti-lock) for: M1 passenger cars and other M1 or N1 vehicles ≤2500 kg Other M1 and N1 vehicles >2500 kg or M2 and N2 vehicles Brakes—full air and air over Hydraulic, (excluding anti-lock) for vehicles less than 50 tonnes: N3 and M3, 3–4 axle, designed to draw a trailer N3 and M3, 3–4 axle, NOT designed or 2 axle designed, to draw trailer N3 and M3, 2 axle, NOT designed to draw a trailer N2 and M2 vehicles Mobile cranes over 50 tonnes STATICS and LADEN dynamics	2710 2960 6390 6110 5580 4770 6790	1300 1450 2200 2010 1820 1620 —
26250 26251 26252 26253 26254 26255 26256 26257	Brakes—other vehicle types. Anti-lock tests	Directive 85/647/EEC or 88/194/EEC, Annex X or ECE Regulation 13.05, Annex 13	Test of anti-lock system only, where no assistant provided by applicant, (excluding electro-magnetic interference) for: M1 and N1 vehicle M1 and N1 as CONTINUATION of a normal brake test Other vehicles Other vehicles, as a CONTINUATION of a normal brake test Test of anti-lock brake system only, where assistant provided by applicant (excluding electro-magnetic interference) for: M1 and N1 vehicle M1 and N1 as CONTINUATION of a normal brake test Other vehicles Other vehicles, as a CONTINUATION of a normal brake test	4090 3570 5160 4420 3410 2810 4180 3430	— — — — 1600 1360 1930 1710
26270 26271 26272	Brakes (replacement linings)	Directives 85/647/EEC, Annex XII or ECE Regulation 13.05, Annex 15	Monitor dynamometer comparison test of replacement brake linings fitted to: Disc brakes M1 or N1 drum brakes Other category drum brakes	— — —	630 630 730
26280	Brakes (EMI)	Directive 85/647/EEC or 88/194/EEC, Annex X or ECE Regulation 13.05, Annex 13	Test on anti-lock control units and servo devices to check for electro-magnetic interference	1330	590
MOTORCYCLE BRAKES					
26401 26402 26403 26404	Brakes on motorcycles	ECE Regulations 13.03, 13.04 and 13.05	Tests to the requirements for motorcycle brakes: L1 and L2 machines L1 and L2 machines, rider supplied by applicant L3 and L4 machines L3 and L4 machines, rider/driver supplied by applicant	2020 1350 2370 1740	— 710 — 1010
STEERING					
27001 27002	Steering	Directive 70/311/EEC	Measurement of steering effort: With power assisted steering Without power assisted steering	1270 780	490 380
27201	Temporary spare wheel	ECE Regulation 64	Test of vehicle stability	720	350
SPEEDOMETER					
27401	Speedometers and reverse gear	Directive 75/443/EEC or ECE Regulation 39 or Item 20 in Schedule 1 to the G.B. Regs	Test of accuracy, marking and visibility	600	330
28—BODY STRUCTURE					
LATCHES AND HINGES					
28001	Door latches and hinges	Directive 70/387/EEC	Inspection to Annex 1 of the Directive only	280	200
28002 28003 28004	Door latches and hinges	Directive 70/387/EEC or Item 1 or Item 1A in Schedule 1 to the G.B. Regs or ECE Regulation 11.02	Laboratory and vehicle test on M1 and N1 4 door vehicles, including 30 g by calculation Laboratory and vehicle test on M1 and N1 4 door vehicles, including 30 g by additional DYNAMIC TEST ADDITION—each SLIDING DOOR system	4110 6810 2980	630 630 70
PROTECTIVE STEERING					
28201 28202	Protective steering	Directive 74/297/EEC or ECE Regulations 12.01 and 12.02 or Item 3 or 3A in Schedule 1 to the G.B. Regs	Forward BARRIER impact test On spoke, off spoke body block test to Directive, or original or non-original equipment to Annex 4 of Regulation	8680 4660	570 480
28203	Protective steering	ECE Regulation 12.02 or Item 3A in Schedule 1 to the G.B. Regs	Two HEADFORM impacts on steering control as original or non-original equipment, to Annex 5 of the Regulation	3790	510
OTHER IMPACTS					
28401	Rear impact	ECE Regulation 32	Moving barrier impact to rear of vehicle (R32 only)	8300	630
28410	Head on impact	ECE Regulation 33	Passenger space (R33 only)	8670	590
FIRE RISKS					
28601 28602	Fire risks	ECE Regulation 34.01	Front and rear impact (R34 only) —excluding Annex 5 test Tests to full requirements, Annex 5 only	15470 29970	930 1160
SEAT BELTS AND ANCHORAGES					
28801	Sealt belt anchorages	Directives 76/115/EEC, 81/575/EEC and 82/318/EEC or ECE Regulations 14.01 and 14.02	Dimensions and strength requirements for a five seat vehicle (Including lap only pulls— front and rear)	7780	850
28802	Installation of seat belts	Directives 77/541/EEC, 81/576/EEC and 82/319/EEC or ECE Regulations 16.03 and 16.04	Examination of seat belt installation requirements on front and rear seats of five seat vehicle	370	330
SEAT TESTS					
29001 29002 29003	Seat and anchorages	Directives 74/408/EEC and 81/577/EEC or ECE Regulation 17.02 or Item 16 in Schedule 1 to the G.B. Regs	Inspection of other vehicles in accordance with Annex III M1 vehicles—5 seats. Full test, STATIC method (Simple 20 g calculations GB 16) M1 vehicles—5 seats, DYNAMIC method. (Including “H” points, front and rear moment)	270 14320 13190	220 590 490
29010 29011	Head restraints	Directive 78/932/EEC or ECE Regulation 25.02 and 25.03	Test on head restraint on one seat (Including displacement and two impacts) FRONT REAR in car	6590 7600	460 460
29020	Seats and anchorages and head restraints	ECE Regulation 17.03	M1 vehicles—5 seats, full head rest front and rear, two DYNAMIC runs (seats set in adjustment positions)	19720	940
BODY AND TRIM					
29201 29202	Interior fittings	Directives 74/60/EEC and 78/632/EEC or ECE Regulation 21 or Item 18 in Schedule 1 to the G.B. Regs	Examination of M1 vehicle, including determination of “H” points, facia and seat zones and up to 6 impact tests Each additional impact test	9110 350	1310 40
29251 29252 29253	Exterior projections	Directives 74/483/EEC and 78/632/EEC or ECE Regulation 26.01 or Items 19 and 19A in Schedule 1 to the G.B. Regs	Examination, including radio aerial as original equipment Test on separate technical units: Luggage or ski racks Radio aerials	910 380 210	630 240 180
29301	Wheel guards	Directive 78/549/EEC	Examination—axle vehicle	380	320
REAR AND SIDE PROTECTION					
29401 29402 29403 29404	Rear protective devices	Directives 70/221/EEC, 79/490/EEC or 81/333/EEC	Inspection of M1, M2, M3, N1, O1 and O2 vehicles Installation of separate technical units FORCE TEST, on technical units or on N2, N3, O3 and O4 vehicles Assessment by CALCULATION	330 330 4990 640	230 230 460 480
29450	Side guards	ECE Regulation 73	Examination and load-2 points	3820	390
29501 29502	Fuel tanks	Directives 70/221/EEC and 81/333/EEC	Other than M1 and N1 vehicles M1 and N1 vehicles	3550 3210	480 460
30—VISIBILITY					
30001 30002	Rear-view mirrors	Directives 71/127/EEC, 79/795/EEC, 85/205/EEC, 86/562/EEC and 88/321/EEC or Items 10, 10A and 10B in Schedule 1 to the G.B. Regs	Field of vision, any 2 mirrors of appropriate class EACH additional mirror on the same vehicle	1700 560	460 80
30401	Forward field of vision	Directives 77/649/EEC, 81/643/EEC and 88/366/EEC	Full determination of “H” and “V” points vision zones and pillar angles	2020	540
30601	Defrost and demisting systems	Directive 78/317/EEC or Item 23 in Schedule 1 to the G.B. Regs	Full determination of “H” and “V” points, zones A and B and defrost/demist cleared area	4560	1080
30801 30802	Wiper and washer systems	Directive 78/318/EEC or Item 22 in Schedule 1 to the G.B. Regs	Vehicle test of WIPER system with APPROVED washer system (including full determination of “H” and “V” points and zones A and B) WASHER system as a separate technical unit	3950 2830	760 670
31001 31002	Heating systems	Directive 78/548/EEC	Vehicles fitted with a system for heating the passenger compartment using heat from the engine COOLING system Vehicles fitted with a system for using heat from the EXHAUST gases or the engine cooling air	230 720	200 460
32—LIGHTING INSTALLATIONS					
32001 32002	Installation of lighting and signalling equipment	Item 24 in Schedule 1 to the G.B. Regs or Item 24A in Schedule 1 to the G.B. Regs	Examination Examination	760 980	470 540
32003 32004 32005 32006 32007	Installation of lighting and signalling devices	Directives 76/756/EE, 80/233/EEC, 82/244/EEC, 83/276/EEC, 84/8/EEC and 89/278/EEC or ECE Regulation 48	M1 vehicles up to 5 seats and N1 > 2600 Kg, M2 and N2 M3 vehicles, N3 and M1 > 5 seats N1 vehicles ≤ 2600 Kg M1 vehicles with concealed headlamp (including environmental tests) Trailers	1550 1720 1350 2540 740	920 1020 790 1070 420
32401 32402 32403	Headlamp cleaners	ECE Regulation 45 or 45.01	CLEANING test, M1 vehicles (excluding environmental checks in paragraphs 6.2.3, 4, 5 and 6.2.7 and full lamp photometric measurements) Witness if required, all tests to check ENVIRONMENTAL requirements in paragraphs 6.2.3, 4, 5 and 6.2.7 INSTALLATION of technical unit	2090 4070 270	520 490 230
34—TYRES					
34001 34002	Tyres	ECE Regulations 30, 30.01 and 30.02 or Items 17 and 17A in Schedule 1 to the G.B. Regs	Witness of test and check of dimensions Report Examination	— —	340 150
34201 34202 34203	Tyres for commercial vehicles	ECE Regulation 54	Examination of a test report and initial documentation from authorised laboratory for issue of initial certificate Examination of documents submitted when the same application as initial documentation for issue of certificates covered by the same report Test witnessed at non-authorised laboratory	— — —	180 60 1010
34301	Tyres for Motor Cycles	ECE Regulation 75	Examination of report	—	160
36—CONTROLS					
36001	Anti-theft devices	Directive 74/61/EEC or ECE Regulation 18 or Item 11 in Schedule 1 to the G.B. Regs	Torque test on steering column lock and check of requirements	580	340
36002	Anti-theft devices	ECE Regulation 18.01 or Item 11A in Schedule 1 to the G.B. Regs	Torque test on lock and key 2500 cycle test and check of requirements	1080	490
36201 36202	Foot controls	ECE Regulation 35	Check including “H” point and detailed geometric measurements By obvious direct measurement	560 350	390 280
36401	Identification of controls, tell-tales and indicators	Directive 78/316/EEC	Full check of requirements	410	330
38—PSV TESTS					
38001 38002 38003 38004 38005	Public service vehicles	ECE Regulations 36, 36.01 and 36.02	Examination (excluding fuel tank and strength of superstructure) on: Rigid vehicles Articulated vehicles Addition, fuel tank test Addition, strength of superstructure Addition, retractable steps	— — — — —	1150 1460 300 590 110
38201 38202 38203 38204	Public service vehicles	ECE Regulation 66	Examination and test, leading to the approval of a SINGLE vehicle type, by: ROLLOVER of vehicle SECTION ROLLOVER of complete vehicle PENDULUM impact of vehicle SECTION or EXAMINATION of results produced by an approved CALCULATION method including: verification of data used, witness of two HINGE tests and evaluation of data on up to a further six unwitnessed HINGE tests	10140 9850 11210 —	1150 1070 1120 1420
40—OTHER VEHICLE TESTS					
40001	Statutory plates	Directives 76/114/EEC and 78/507/EEC	Full examination	320	260
40201	Space for mounting and fitting of rear registration plates	Directive 70/222/EEC	Full examination	310	240
40401	Towing hooks	Directive 77/389/EEC	Front and rear, pull and push (excluding ISO)	3330	380

SCHEDULE 2 FEES FOR THE FINAL EXAMINATION OF A COMPLETE VEHICLE TO WHICH THE GREAT BRITAIN REGULATIONS APPLY WITH A VIEW TO THE ISSUE OF CERTAIN DOCUMENTS
Regulation 7(1)
(1)	(2)	(3)
Description of Examination	Fee number	Amount of fee for examination (£)
Complete examination of a type vehicle with a view to the issue of a type approval certificate	60000	1340
Complete examination of a vehicle with a view to the issue of a Minister’s approval certificate under section 53(1) and (2)	60001	1340
Complete examination of a vehicle with a view to the issue of a Minister’s approval certificate under section 58(4) and (5)	60002	1310

SCHEDULE 3 FEES FOR THE FINAL EXAMINATION OF A COMPLETE VEHICLE TO WHICH THE GREAT BRITAIN REGULATIONS FOR GOODS VEHICLES APPLY WITH A VIEW TO THE ISSUE OF CERTAIN DOCUMENTS
Regulation 7(2) and (3)
(1)	(2)									
Description of examination	Amount of fee for examination Vehicle category									
	(a) L2, L5, N1		(b) N2		(c) N3					
					2 Axle Fee No		3 Axle Fee No		4 Axle Fee No	
	Fee No	Fee £	Fee No	Fee £	Fee No	Fee £	Fee No	Fee £	Fee No	Fee £
Complete examination of a type vehicle consisting of 50 or less variants with a view to the issue of a type approval certificate	60003	660	60004	1200	60005	1880	60006	2080	60007	2180
Complete examination of a type vehicle consisting of more than 50 variants with a view to the issue of a type approval certificate	60008	660	60009	1200	60010	2300	60011	2740	60012	2850
Complete examination of a vehicle with a view to the issue of a Minister’s approval certificate under section 58(1) and (2)	60013	660	60014	880	60015	1070	60016	1100	60017	1200
Complete examination of a vehicle with a view to the issue of a Minister’s approval certificate under section 58(4) and (5)	60018	630	60019	860	60020	1050	60021	1050	60022	1170

SCHEDULE 4 FEES FOR THE ISSUE OF DOCUMENTS IN RESPECT OF VEHICLE PARTS
Regulation 9(1)
(1)	(2)	(3)
Description of Document	Fee number	Amount of fee for document (£)
(A) COMMUNITY INSTRUMENT OR ECE REGULATION		
ECE or EEC type approval certificate	80000	30
ECE or EEC type approval certificate modifying an ECE or EEC type approval certificate	80001	64
(B) NATIONAL TYPE APPROVAL SCHEME		
Type approval certificate	80002	30
Type approval certificate modifying a type approval certificate	80003	65
Minister’s approval certificate under section 58(1) and (2)	80004	30
Minister’s approval certificate modifying a Minister’s approval certificate	80005	65
(C) DUPLICATE		
Duplicate type approval, Minister’s approval, EEC or ECE type approval certificate or duplicate certificate of conformity	80006	40
NB Where both EEC and ECE certificates are issued concurrently in respect of the same vehicle part, the total fee for the two certificates shall be one and a half times Nos 80000 or 80001 above as appropriate.		

SCHEDULE 5 FEES FOR THE ISSUE OF DOCUMENTS IN RESPECT OF VEHICLES
Regulation 9(2) and (3)

PART I VEHICLES TO WHICH THE GREAT BRITAIN REGULATIONS APPLY
(1)	(2)	(3)
Description of documents	Fee number	Amount of fee for document (£)
(A) TYPE APPROVAL CERTIFICATES		
Type approval certificate in respect of a type vehicle or an updated type approval certificate in respect of a type vehicle	80010	440
Type approval certificate in respect of a type vehicle issued in replacement of one or more Minister’s approval certificates	80011	65
Duplicate type approval certificate	80012	40
(B) MINISTER'S APPROVAL CERTIFICATES		
Minister’s approval certificate under section 58(1) and (2) when issued after a complete examination of a vehicle or an updated Minister’s approval certificate in respect of a vehicle.	80013	250
Minister’s approval certificate under secton 58(4) and (5) in respect of a vehicle	80014	0.40
Duplicate Minister’s approval certificate	80015	40
(C) CERTIFICATES OF CONFORMITY		
Duplicate certificate of conformity	80016	40

PART II VEHICLES TO WHICH THE GREAT BRITAIN REGULATIONS FOR GOODS VEHICLES APPLY
(1)	(2)	(3)
Description of documents	Fee number	Amount of fee for document (£)
(A) TYPE APPROVAL CERTIFICATES		
Type approval certificate in respect of a type vehicle or an updated type approval certificate in respect of a type vehicle consisting of 50 or less variants	80030	160
Type approval certificate in respect of a type vehicle or an updated type approval certificate in respect of a type vehicle consisting of more than 50 variants	80031	190
Type approval certificate in respect of a type vehicle issued in replacement of one or more Minister’s approval certificates	80032	65
Further type approval certificate in respect of a vehicle issued under section 55(4) and (5)	80033	65
Duplicate type approval certificate	80034	40
(B) MINISTER'S APPROVAL CERTIFICATES		
Minister’s approval certificate under section 58(1) and (2) when issued after a complete examination of a vehicle or an updated Minister’s approval certificate	80035	95
Minister’s approval certificate under section 58(1) and (2) when issued after a partial examination of a vehicle	80036	65
Minister’s approval certificate under section 58(4) and (5) in respect of a vehicle	80037	0.70
Duplicate Minister’s approval certificate	80038	40
(C) CERTIFICATE OF CONFORMITY		
Duplicate certificate of conformity	80039	40

SCHEDULE 6 DEFINITIONS OF EXPRESSIONS USED IN SCHEDULE 1
Regulation 4(6)
PART I

References to Community Instruments
1 (1) A reference in Schedule 1 to an expression shown in column 1 of Part II of this Schedule (all of which begin with the word “Directive”) shall be read as follows.
(2) If a single Council or Commission Directive is shown in column 2 of that Part against the expression, the reference shall be read as a reference to that Directive, details of which are shown in columns 3 and 4.
(3) If more than one Council or Commission Directive is shown in column 2 of that Part against the expression, the reference shall be read as a reference to the first Directive as amended by the other Directive or Directives so shown.
(4) “(CL)” after a Directive shown in column 2 indicates that the Directive is a Council Directive and “(CM)” after a Directive indicates that the Directive is a Commission Directive.
2 A reference in Schedule 1 to the expression shown in column 1 of Part III of this Schedule shall be read as a reference to the first Council Regulation shown in column 2, as amended by the other Council Regulations details of which are shown in columns 3 and 4.

3 References to ECE Regulations
(1) A reference in Schedule 1 to an ECE Regulation followed by a number shall be read as follows.
(2) In a case where the number comprised in the reference consists of one or two digits, the reference shall be read as a reference to the ECE Regulation of that number.
(3) In the case of the reference “ECE Regulation 8.04”, the reference shall be read as a reference to ECE Regulation 8 as amended by Amending Series 8.01, 8.02, 8.03 and 8.04; and all other references to an ECE Regulation comprising a number in the form “x.yz” or “wx.yz” shall be construed accordingly.
(4) Column (1) of Part IV of this Schedule lists the relevant ECE Regulations and their Amending Series and column (2) gives the dates of those instruments.
(5) “ECE Regulation” is defined in regulation 3(2).

4 Other Expressions
In Schedule 1—
“G.B. Regs” is an abbreviation for the Great Britain Regulations as defined in regulation 3;
“G.B. Regs for Goods Vehicles” is an abbreviation for Great Britain Regulations for Goods Vehicles as defined in regulation 3.

PART II REFERENCES TO COUNCIL AND COMMUNITY INSTRUMENTS
(1)	(2)	(3)	(4)
Expression	Directives	Date	Official Journal Reference
70/157/EEC	{	see … 84/424/EEC	}
70/221/EEC	{	see … 81/333/EEC	}
70/222/EEC	70/222/EEC (CL)	20.3.1970	L76, 6.4.70, p.25.
70/311/EEC	70/311/EEC (CL)	8.6.1970	L133, 18.6.70, p.10.
70/387/EEC	70/387/EEC (CL)	27.7.1970	L176, 10.8.70, p.5.
70/388/EEC	70/388/EEC (CL)	27.7.1970	L176, 10.8.70, p.12.
71/127/EEC	{	see … 86/562/EEC	}
71/320/EEC	{	see … 88/194/EEC	}
72/245/EEC	72/245/EEC (CL)	20.6.1972	L152, 6.7.72, p.15.
72/306/EEC	72/306/EEC (CL)	2.8.1972	L190, 20.8.72, p.1.
73/350/EEC	{	see … 84/424/EEC	}
74/60/EEC	{	see … 76/632/EEC	}
74/61/EEC	74/61/EEC (CL)	17.12.1973	L38, 11.2.74, p.22.
74/132/EEC	{	see … 88/194/EEC	}
74/297/EEC	74.297/EEC (CL)	4.6.1974	L165, 20.6.74, p.16.
74/408/EEC	{	see … 81/577/EEC	}
74/483/EEC	{	see … 79/488/EEC	}
75/443/EEC	75/443/EEC (CL)	26.6.1975	L196, 26.7.75, p.1.
75/524/EEC	{	see … 88/194/EEC	}
76/114/EEC	{	see … 78/507/EEC	}
76/115/EEC	{	see … 82/318/EEC	}
76/756/EEC	{	see … 84/8/EEC	}
76/757/EEC	76/757/EEC (CL)	27.7.1976	L262, 27.9.76, p.32.
76/758/EEC	{	see … 89/516/EEC	}
76/759/EEC	{	see … 89/277/EEC	}
76/760/EEC	76/760/EEC (CL)	27.7.1976	L262, 27.9.76, p.85.
76/761/EEC	{	see … 89/517/EEC	}
76/762/EEC	76/762/EEC (CL)	27.7.1976	L262, 27.9.76, p.122.
77/212/EEC	{	see … 84/424/EEC	}
77/389/EEC	77/389/EEC (CL)	17.5.1977	L154, 13.6.77, p.41.
77/538/EEC	{	see … 89/518/EEC	}
77/539/EEC	77/539/EEC (CL)	28.6.1977	L220, 29.8.77, p.72.
77/540/EEC	77/540/EEC (CL)	28.6.1977	L220, 29.8.77, p.83.
77/541/EEC	{	see … 82/319/EEC	}
77/649/EEC	{	see … 81/643/EEC	}
78/316/EEC	78/316/EEC (CL)	21.12.1977	L81, 28.3.78, p.3.
78/317/EEC	78/317/EEC (CL)	21.12.1977	L81, 28.3.78, p.27.
78/318/EEC	78/318/EEC (CL)	21.12.1977	L81, 28.3.78, p.49
78/507/EEC	76/114/EEC (CL)	18.12.1975	L24, 30.1.76, p.1.
	78/507/EEC (CM)	19.5.1978	L155, 13.6.78, p.31.
78/548/EEC	78/548/EEC (CL)	12.6.1978	L168, 26.6.78, p.40.
78/549/EEC	78/549/EEC (CL)	12.6.1978	L168, 26.6.78, p.45.
78/632/EEC	74/60/EEC (CL)	17.12.1973	L38, 11.2.74, p.2.
	78/632/EEC (CM)	19.5.1978	L206, 29.7.78, p.26.
78/665/EEC	{	see … 88/76/EEC	}
78/932/EEC	78/932/EEC (CL)	16.10.1978	L325, 20.11.78, p.1.
78/1015/EEC	{	see … 87/56/EEC	}
79/488/EEC	74/483/EEC (CL)	17.9.1974	L266, 2.10.74, p.4.
	79/488/EEC (CM)	18.4.1979	L128, 26.5.79, p.1.
79/489/EEC	{	see … 88.194/EEC	}
79/490/EEC	{	see … 81/333/EEC	}
79/795/EEC	{	see … 86/562/EEC	}
80/233/EEC	{	see … 84/8/EEC	}
80/780/EEC	80/780/EEC (CL)	22.7.1980	L229, 30.8.80, p.49.
80/1268/EEC	80/1268/EEC (CL)	16.12.1980	L375, 31.12.80, p.36.
80/1269/EEC	{	see … 88/195/EEC	}
81/333/EEC	70/221/EEC (CL)	20.3.1970	L76, 6.4.70, p.23.
	79/490/EEC (CM)	18.4.1979	L128, 26.5.79, p.22.
	81/333/EEC (CM)	13.4.1981	L131, 18.5.81, p.4.
81/334/EEC	{	see … 84/424/EEC	}
81/575/EEC	{	see … 82/318/EEC	}
81/576/EEC	{	see … 82/319/EEC	}
81/577/EEC	74/408/EEC (CL)	22.7.1974	L221, 12.8.74, p.1.
	81/557/EEC (CL)	20.7.1981	L209, 29.7.81, p.34.
81/643/EEC	{	see … 88.366/EEC	}
	{	see … 84/8/EEC	}
82/318/EEC	76/115/EEC (CL)	18.12.1975	L24, 30.1.76, p.6.
	81/575/EEC (CL)	20.7.1981	L209, 29.7.81, p.30.
	82/318/EEC (CM)	2.4.1982	L139, 19.5.82, p.9.
82/319/EEC	77/541/EEC (CL)	28.6.1977	L220, 29.8.77, p.95.
	81/576/EEC (CL)	20.7.1981	L209, 29.7.81, p.32.
	82/319/EEC (CM)	2.4.1982	L139, 19.5.82, p.17.
83/276/EEC	{	see … 84/8/EEC	}
83/351/EEC	{	see … 88/76/EEC	}
84/8/EEC	{	see … 89/278/EEC	}
84/372/EEC	{	see … 84/424/EEC	}
84/424/EEC	70/157/EEC (CL)	6.2.1970	L42, 23.2.70, p.16.
	73/350/EEC (CM)	7.11.1973	L321, 22.11.73, p.33.
	77/212/EEC (CL)	8.3.1977	L66, 12.3.77, p.33.
	81/334/EEC (CM)	13.4.1981	L131, 18.5.81, p.6.
	84/372/EEC (CM)	3.7.1984	L196, 26.7.84, p.47.
	84/424/EEC (CL)	3.9.1984	L238, 6.9.84, p.31.
85/205/EEC	{	see … 86/562/EEC	}
85/647/EEC	{	see … 88/194/EEC	}
86/562/EEC	{	see … 88/321/EEC	}
87/56/EEC	78/1015/EEC (CL)	23.11.1978	L349, 13.12.78, p.21.
	87/56/EEC (CL)	18.12.1987	L24, 27.1.87, p.42.
88/76/EEC	{	see … 88/436/EEC	}
88/77/EEC	88/77/EEC (CL)	3.12.1987	L36, 9.2.88, p.33.
88/194/EEC	71/320/EEC (CL)	26.7.1971	L202, 6.9.71, p.37.
	74/132/EEC (CM)	11.2.1974	L74, 19.3.74, p.7.
	75/524/EEC (CM)	25.7.1975	L236, 8.9.75, p.3.
	79/489/EEC (CM)	18.4.1979	L128, 26.5.79, p.12.
	85/647/EEC (CM)	23.12.1985	L380, 31.12.85, p.1.
	88/194/EEC (CM)	24.3.1988	L92, 9.4.88, p.47.
88/195/EEC	80/1269/EEC (CL)	16.12.1980	L375, 31.12.88, p.46
	88/195/EEC (CL)	24.3.1988	L92, 9.4.88, p.50.
88/336/EEC	77/649/EEC (CL)	27.9.1977	L267, 19.10.77, p.1.
	81/643/EEC (CM)	29.7.1981	L231, 15.8.81, p.41.
	88/366/EEC (CM)	17.5.1988	L181, 12.7.88, p.40.
88/436/EEC	{	see … 89/458/EEC	}
88/321/EEC	71/127/EEC (CL)	1.3.1971	L68, 22.3.71, p.1.
	79/795/EEC (CM)	20.7.1979	L239, 22.9.79, p.1.
	85/205/EEC (CM)	18.2.1985	L90, 29.3.85, p.1.
	86/562/EEC (CM)	6.11.1986	L327, 22.11.86, p.49.
	88/321/EEC (CM)	16.5.1988	L147, 14.6.88, p.77.
89/235/EEC	78/1015//EEC (CL)	23.11.1978	L349, 13.12.78, p.21.
	87/56/EEC (CL)	18.12.1987	L24, 27.1.87, p.42.
	89/235/EEC (CL)	13.3.1989	L98, 11.4.89, p.1.
89/277/EEC	76/759/EEC (CL)	27.7.1976	L262, 27.9.76, p.71.
	89/277/EEC (CM)	28.3.1989	L109, 27.4.89, p.25.
89/278/EEC	76/756/EEC (CL)	27.7.1976	L262, 27.9.76, p.1.
	80/233/EEC (CM)	21.11.1979	L51, 25.2.80, p.8.
	82/244/EEC (CM)	17.3.1982	L109, 22.4.82, p.31.
	83/276/EEC (CL)	26.5.1983	L151, 9.6.83, p.47
	84/8/EEC (CM)	14.12.1983	L9, 12.1.84, p.24.
	89/278/EEC (CM)	28.3.1989	L109, 20.4.89, p.38.
89/458/EEC	70/220/EEC (CL)	20.3.1970	L76, 6.4.70, p.1.
	74/290/EEC (CL)	28.5.1974	L159, 15.6.74, p.61.
	77/120/EEC (CM)	30.11.1976	L32, 3.2.77, p.32.
	78/665/EEC (CM)	14.7.1978	L223, 14.8.78, p.48.
	83/351/EEC (CL)	16.6.1983	L197, 20.7.83, p.1.
	88/76/EEC (CL)	3.12.1987	L36, 9.2.88, p.1.
	88/436/EEC (CL)	16.6.1988	L214, 6.8.88, p.1.
	89/458/EEC (CL)	18.8.1989	L226, 3.8.89, p.1.
89/491/EEC	89/491/EEC (CM)	17.8.1989	L238, 15.8.89, p.43.
89/516/EEC	76/758/EEC (CL)	27.7.1976	L262, 27.9.76, p.54.
	89/516/EEC (CM)	1.8.1989	L265, 12.9.89, p.1.
89/517/EEC	76/761/EEC (CL)	27.7.1976	L262, 27.9.76, p.96.
	89/517/EEC (CM)	1.8.1989	L265, 12.9.89, p.15.
89/518/EEC	77/538/EEC (CL)	28.6.1977	L220, 29.8.77, p.60.
	89/518/EEC (CM)	1.8.1989	L265, 12.9.89, p.24.

PART III REFERENCES TO COMMUNITY REGULATIONS
EEC REGULATION
(1)	(2)	(3)	(4)
Expression	Council Regulations	Date	Official Journal Reference
Community Regulation 3821/85	1463/70 1787/73 2828/77 3821/85	20.7.1970 25.6.1973 12.12.1977 20.12.1985	L164, 27.7.70, p.1. L181, 4.7.73, p.1. L334, 24.12.77, p.5. L370, 31.12.85, p.8.

PART IV REFERENCES TO ECE REGULATIONS
(1)	(2)
ECE Regulation and Amending Series	Date
1	24 Mar 60
1.10	28 Apr 86
2	24 Mar 60
2.02	27 Nov 78
2.03	28 Apr 86
3	1 Nov 63
3.01	18 Aug 82
3.02	11 Jul 85
4	23 Sep 64
4.01	29 Oct 75
5	22 May 67
5.01	2 Mar 83
5.02	2 Jun 89
6	22 May 67
6.01	7 Oct 87
7	22 May 67
7.01	18 Sep 85
8	12 Jun 67
8.01	28 May 71
8.02	23 Apr 75
8.03	21 Jun 78
8.04	23 Jun 86
10	17 Dec 68
10.01	23 Jun 78
11	8 Jan 69
11.01	29 Oct 75
11.02	7 May 81
12	14 Apr 69
12.01	3 Nov 75
12.02	23 Mar 83
13	29 May 69
13.01	5 Dec 73
13.02	5 Dec 73
13.03	5 Feb 79
13.04	24 Aug 81
13.05	15 Feb 85
14	30 Jan 70
14.01	19 Aug 76
14.02	25 Feb 85
15	11 Mar 70
15.01	11 Mar 70
15.02	8 Mar 77
15.03	20 Feb 78
15.04	31 Dec 85
16	14 Aug 70
16.01	7 May 73
16.02	7 May 73
16.03	25 Jan 80
16.04	31 Dec 85
17	14 Aug 70
17.01	2 Jan 76
17.02	7 Apr 81
17.03	12 May 86
18	14 Sep 70
18.01	8 Dec 80
19	14 Sep 70
19.01	22 Aug 74
19.02	15 Sep 88
20	1 Mar 71
20.01	1 Sep 76
20.02	14 Aug 86
21	2 Jun 71
21.01	24 Oct 80
23	20 Aug 71
23.01	11 Mar 77
24	23 Aug 71
24.01	12 Mar 74
24.02	27 May 80
24.03	25 Apr 86
25	30 Dec 71
25.01	30 Jul 81
25.02	2 Jun 86
25.03	26 Apr 90
26	28 Apr 72
26.01	12 Mar 74
27	7 Jun 72
27.01	12 Mar 74
27.02	20 Jun 77
27.03	30 Apr 85
30	1 Apr 75
30.01	10 Oct 77
30.02	21 Apr 81
31	2 Jun 75
31.01	18 Apr 83
31.02	17 May 89
32	14 Jul 75
33	25 Jul 75
34	25 Jul 75
34.01	29 Jan 79
35	18 Sep 75
36	12 Nov 75
36.01	19 Apr 82
36.02	3 Sep 86
37	4 Oct 77
37.01	27 Apr 82
37.02	20 Jun 84
37.03	20 Jun 84
38	7 Jul 78
39	11 Jul 78
43	24 Oct 80
44	22 Jan 81
44.01	16 Nov 82
44.02	18 Apr 86
45	15 May 81
45.01	16 May 88
48	23 Nov 81
49	10 May 83
49.01	5 Oct 90
50	11 Jan 83
54	13 Jun 83
64	1 Aug 85
65	4 Sep 86
66	30 Jan 87
69	27 Jul 87
70	27 Jul 87
75	19 May 88
77	6 Oct 88
83	5 Nov 89

(This note is not part of the Regulations)
1 These Regulations re-enact with modifications the provisions of the Motor Vehicles (Type Approval and Approval Marks) (Fees) Regulations 1990.
2 The Regulations prescribe the fees payable for the examination of vehicle and vehicle parts, the examination of complete vehicles and the issue of documents in connection with—
(1) the type approval of vehicles and vehicle parts and the authorisation of the application of approval marks to vehicles and vehicle parts for the purposes of Community Instruments or ECE Regulations; and
(2) the national scheme for the type approval of vehicles and vehicle parts established under sections 54 to 66 of the Road Traffic Act 1988, the Motor Vehicles (Type Approval) (Great Britain) Regulations 1984 (S.I.1984/981) and the Motor Vehicles (Type Approval for Goods Vehicles) (Great Britain) Regulations 1982 (S.I.1982/1271).
3 In addition to minor drafting changes, the Regulations make the following changes of substance.
4 The principal changes relate to the fee amounts. The overall change to the fees contained in these Regulations is an increase of approximately 15%, but this is applied in different ways with the result that some fees are increased, some are reduced and some remain the same.
5 In addition to changes to fee amounts, the introduction of new or amended ECE Regulations and new Community Instruments means that—
(1) certain new fees relating to reflex reflecting devices, directional indicators, special warning lights, rear view mirrors, rear registration plates, unleaded fuel capability, fuel input orifice, motorcycle sound levels, tyres and motorcycle tyres have been added to Schedule 1; and,
(2) reference to those, as alternatives to existing ECE Regulations or Community Instruments – in relation to headlamps, directional indicators, side, rear, or stop lamps, reversing lamps, parking lamps, rear view mirrors, petrol engine exhaust emissions, diesel engine gaseous emissions, engine power, fuel consumption, and head restraints – appear for the first time.
6 Copies of the ECE Regulations and Community Instruments referred to in these Regulations may be obtained from Her Majesty’s Stationery Office.