4 Prescribed minimum size for carriage of whiting on a British fishing boat
1 For the purpose of section 1(3) of the Act (which prohibits the carriage on a British fishing boat of sea fish of any description which are of less than the minimum size prescribed in relation to sea fish of that description), a length of 27 centimetres is hereby prescribed as the minimum size in relation to whiting.
2 The carriage on a British fishing boat of whiting which have not been sorted is exempted from the prohibition imposed by section 1(3) of the Act as read with paragraph (1) above.