9 Fees for approval or reassessment of approval of dosimetry services and for type approval of radiation generators or apparatus containing radioactive substances under the Ionising Radiations Regulations 1985
1 A fee shall be payable by the applicant to the Health and Safety Executive on each application for an approval of dosimetry services or for the reassessment of an approval of dosimetry services previously granted for the purposes of the Ionising Radiations Regulations 1985().
S.I. 1985/1333.
2 A fee shall be payable by the applicant to the Executive on each application for the type approval of a radiation generator or an apparatus containing a radioactive substance.
3 The fee payable for approval or reassessment or type approval in respect of each matter described in column 1 of Schedule 8 shall be that specified in the corresponding entry in column 2 of that Schedule, together with any fee determined under paragraph (4), where applicable.
4 Where the Executive requires an inspection to be carried out to determine whether an approval mentioned in paragraph (1) should be granted and it is necessary for any member of the Executive’s staff to travel outside Great Britain for the purpose of the inspection, a fee shall be payable by the applicant to the Executive of an amount equal to the reasonable cost of travelling and subsistence of the member of the Executive’s staff in connection with the inspection.