SCHEDULE 1 RELEVANT COMMUNITY DIRECTIVES
Regulation 10
1 Council Directive 73/23/EEC on the harmonization of the laws of Member States relating to electrical equipment designed for use within certain voltage limits (OJ No. L77, 26.3.1973, p.29).
2 Council Directive 79/113/EEC on the approximation of the laws of the Member States relating to the determination of the noise emission of construction plant and equipment (OJ No. L33, 8.2.1979, p.15).
3 Council Directive 81/1051/EEC amending Directive 79/113/EEC on the approximation of the laws of the Member States relating to the determination of the noise emission of construction plant and equipment (OJ No. L376, 30.12.1981, p.49).
4 Council Directive 84/532/EEC on the approximation of the laws of the Member States relating to common provisions for construction plant and equipment (OJ No. L300, 19.11.1984, p.111).
5 Council Directive 84/533/EEC on the approximation of the laws of the Member States relating to the permissible sound power level of compressors (OJ No. L300, 19.11.1984, p.123).
6 Council Directive 84/534/EEC on the approximation of the laws of the Member States relating to the permissible sound power level of tower cranes (OJ No. L300, 19.11.1984, p.130).
7 Council Directive 84/535/EEC on the approximation of the laws of the Member States relating to the permissible sound power level of welding generators (OJ No. L300, 19.11.1984, p.142).
8 Council Directive 84/536/EEC on the approximation of the laws of the Member States relating to the permissible sound power level of power generators (OJ No. L300, 19.11.1984, p.149).
9 Council Directive 84/537/EEC on the approximation of the laws of the Member States relating to the permissible sound power level of powered hand-held concrete-breakers and picks (OJ No. L300, 19.11.1984, p.156).
10 Council Directive 84/538/EEC on the approximation of the laws of the Member States relating to the permissible sound power level of lawn mowers (OJ No. L300, 19.11.1984, p.171).
11 Commission Directive 85/405/EEC adapting to technical progress Council Directive 79/113/EEC on the approximation of the laws of the Member States relating to the determination of the noise emission of construction plant and equipment (OJ No. L233, 30.8.1985, p.9).
12 Commission Directive 85/406/EEC adapting to technical progress Council Directive 84/533/EEC on the approximation of the laws of the Member States relating to the permissible sound power level of compressors (OJ No. L233, 30.8.1985, p.11).
13 Commission Directive 85/407/EEC adapting to technical progress Council Directive 84/535/EEC on the approximation of the laws of the Member States relating to the permissible sound power level of welding generators (OJ No. L233, 30.8.1985, p.16).
14 Commission Directive 85/408/EEC adapting to technical progress Council Directive 84/536/EEC on the approximation of the laws of the Member States relating to the permissible sound power level of power generators (OJ No. L233, 30.8.1985, p.18).
15 Commission Directive 85/409/EEC adapting to technical progress Council Directive 84/537/EEC on the approximation of the laws of the Member States relating to the permissible sound power level of powered hand-held concrete-breakers and picks (OJ No. L233, 30.8.1985, p.20).
16 Commission Directive 87/252/EEC adapting to technical progress Council Directive 84/538/EEC on the approximation of the laws of the Member States relating to the permissible sound power level of lawn mowers (OJ No. L117, 5.5.1987, p.22 with corrigenda at OJ No. L158, 18.6.1987, p.31).
17 Council Directive 87/405/EEC amending Council Directive 84/534/EEC on the approximation of the laws of the Member States relating to the permissible sound power level of tower cranes (OJ No. L220, 8.8.1987, p.60).
18 Council Directive 88/180/EEC amending Council Directive 84/538/EEC on the approximation of the laws of the Member States relating to the permissible sound power level of lawnmowers (OJ No. L81, 26.3.1988, p.69).
19 Council Directive 88/181/EEC amending Council Directive 84/538/EEC on the approximation of the laws of the Member States relating to the permissible sound power level of lawnmowers (OJ No. L81, 26.3.1988, p.71).
20 Council Directive 84/539/EEC on the approximation of the laws of the Member States relating to electro-medical equipment used in human or veterinary medicine (OJ No. L300, 19.11.1984, p.179).
21 Council Directive 86/295/EEC on the approximation of the laws of the Member States relating to roll-over protective structures (ROPS) for certain construction plant (OJ No. L186, 8.7.1986, p.1).
22 Council Directive 86/296/EEC on the approximation of the laws of the Member States relating to falling-object protective structures (FOPS) for certain construction plant (OJ No. L186, 8.7.1986, p.10).
23 Council Directive 86/662/EEC on the limitation of noise emitted by hydraulic excavators, rope-operated excavators, dozers, loaders and excavator-loaders (OJ No. L384, 31.12.1986, p.1).
24 Council Directive 86/663/EEC on the approximation of the laws of the Member States relating to self-propelled industrial trucks (OJ No. L384, 31.12.1986, p.12).
25 Council Directive 87/404/EEC on the harmonization of the laws of the Member States relating to simple pressure vessels (OJ No. L220, 8.8.1987, p.48).
26 Council Directive 89/106/EEC on the approximation of laws, regulations and administrative provisions of the Member States relating to construction products OJ No. L40, dated 11.2.1989 p.12).
27 Commission Directive 89/240/EEC adapting to technical progress Council Directive 86/663/EEC on the approximation of the laws of the Member States relating to self-propelled industrial trucks (OJ No. L100, 12.4.1989, p.1).
28 Council Directive 89/336/EEC on the approximation of the laws of the Member States relating to electromagnetic compatibility (OJ No. L139, 23.5.1989, p.19).
29 Council Directive 89/392/EEC on the approximation of the laws of the Member States relating to machinery (OJ No. L183, 29.6.1989, p.9).
30 Commission Directive 89/514/EEC adapting to technical progress Council Directive 86/662/EEC on the limitation of noise emitted by hydraulic excavators, rope-operated excavators, dozers, loaders and excavator-loaders (OJ No. L253, 30.8.1989, p.35).
31 Council Directive 89/686/EEC on the approximation of the laws of the Member States relating to personal protective equipment (OJ No. L399, 30.12.1989, p.18).
32 Council Directive 90/385/EEC on the approximation of the laws of the Member States relating to active implantable medical devices (OJ No. L189, 20.7.1990, p.17).
33 Council Directive 90/396/EEC on the approximation of the laws of the Member States relating to appliances burning gaseous fuels (OJ No. L196, 26.7.1990, p.15).
34 Council Directive 91/368/EEC amending Directive 89/392/EEC on the approximation of the laws of the Member States relating to machinery (OJ No. L198, 22.7.1991, p.16).
35 Council Directive 92/31/EEC amending Directive 89/336/EEC on the approximation of the laws of the Member States relating to electromagnetic compatibility (OJ No. L126, 12.5.92, p.11).
SCHEDULE 2
Regulation 27

PART I REPEALS
(1)	(2)	(3)
Chapter	Short title	Extent of repeal
1954 c. 70.	The Mines and Quarries Act 1954.	Sections 81(1) and 82.
1961 c. 34.	The Factories Act 1961.	Sections 12 to 16, 17 and 19.
1963 c. 41.	The Offices, Shops and Railway Premises Act 1963.	Section 17.

PART II REVOCATIONS
(1)	(2)	(3)
Title	Reference	Extent of revocation
Regulations dated 17th October 1905 (The Spinning by Self-Acting Mules Regulations 1905).	S.R. & O. 1905/1103, amended by the Employment Act 1989 (c. 38), section 29(5), Schedule 8.	The whole Regulations.
The Aerated Water Regulations 1921.	S.R. & O. 1921/1932, amended by S.I. 1981/686.	Regulations 1, 2 and 8.
The Horizontal Milling Machines Regulations 1928.	S.R. & O. 1928/548, amended by S.R. & O. 1934/207.	The exemptions and regulations 2 to 7.
The Operations at Unfenced Machinery Regulations 1938.	S.R. & O. 1938/641, amended by S.R. & O. 1946/156 and S.I. 1976/955.	The whole Regulations.
The Jute (Safety, Health and Welfare) Regulations 1948.	S.I. 1948/1696, to which there are amendments not relevant to these Regulations.	Regulations 15, 27 and 28 and the First Schedule.
The Iron and Steel Foundries Regulations 1953.	S.I. 1953/1464, amended by S.I. 1974/1681 and S.I. 1981/1332.	Regulation 5.
The Agriculture (Power Take-Off) Regulations 1957.	S.I. 1957/1386, amended by S.I. 1976/1247, S.I. 1981/1414 and S.I. 1991/1913.	The whole Regulations.
The Agriculture (Circular Saws) Regulations 1959.	S.I. 1959/427, amended by S.I. 1981/1414.	(i) In regulation 1, in sub-paragraph (b), from the beginning to “and” where it first occurs; and sub-paragraph (c); (ii) regulations 3 and 4; (iii) in regulation 5(1), the words from “unless” to “or”; and (iv) Schedule 1.
The Agriculture (Stationary Machinery) Regulations 1959.	S.I. 1959/1216, amended by S.I. 1976/1247 and S.I. 1981/1414.	The whole Regulations.
The Agriculture (Threshers and Balers) Regulations 1960.	S.I. 1960/1199, amended by S.I. 1976/1247 and S.I. 1981/1414.	In the Schedule, paragraphs 2, 3, 6, 7, 8, 9, 10, 11, 12, 16 and 17.
The Shipbuilding and Ship-Repairing Regulations 1960.	S.I. 1960/1932, to which there are amendments not relevant to these Regulations.	Regulation 67.
The Construction (General Provisions) Regulations 1961.	S.I. 1961/1580, to which there are amendments not relevant to these Regulations.	Regulations 42, 43 and 57.
The Agriculture (Field Machinery) Regulations 1962.	S.I. 1962/1472, amended by S.I. 1976/1247 and S.I. 1981/1414.	In the Schedule, paragraphs 2 to 6 and 15 to 19.
The Abrasive Wheels Regulations 1970.	S.I. 1970/535.	In regulation 3, paragraphs (2), (3) and (4); and regulations 4, 6 to 8, 10 to 16, 18 and 19.
The Woodworking Machines Regulations 1974.	S.I. 1974/903, amended by S.I. 1978/1126.	In regulation 1, paragraphs (2) and (3); in regulation 2, the definitions of “cutters”, “machine table”, “narrow band sawing machine”, “sawmill” and “squared stock”; in regulation 3, paragraph (2); regulations 5 to 9, 14 to 19, 21 to 38, and 40 to 43.
The Offshore Installations (Operational Safety, Health and Welfare) Regulations 1976.	S.I. 1976/1019, which has effect as an existing statutory provision under the 1974 Act by virtue of section 1(1) of the Offshore Safety Act 1992 (c. 15).	Regulations 10 and 12.
The Agriculture (Power Take-off) (Amendment) Regulations 1991.	S.I. 1991/1913.	The whole Regulations.