Statutory Instruments
1992 No. 489
ROAD TRAFFIC
The Motor Vehicles (Type Approval and Approval Marks) (Fees) Regulations 1992
Made 4th March 1992
Laid before Parliament 9th March 1992
Coming into force 1st April 1992

The secretary of state for Transport, in exercise of the powers conferred by sections 61(1) and (2) of the Road Traffic Act 1988, and of the powers conferred by section 56(1) and (2) of the Finance Act 1973 with the consent of the Treasury, and of the powers conferred by the Department of Transport (Fees) Order 1988 and section 128 of the Finance Act 1990 and of all other enabling powers, and in relation to the exercise of the powers conferred by sections 61(1) and (2) of the Road Traffic Act 1988, after consultation with representative organisations in accordance with section 195(2) of that Act, hereby makes the following Regulations;
1988 c. 52.
1973 c. 51.
S.I. 1988/643, which was made under section 102 of the Finance (No. 2) Act 1987 (c. 51). The relevant reference in S.I. 1988/643 is Table II of Schedule 1.
1990 c. 29.

Commencement and citation
1. These Regulations shall come into force on 1st April 1992 and be cited as the Motor Vehicles (Type Approval and Approval Marks) (Fees) Regulations 1992.

Revocation
2. The Motor Vehicles (Type Approval and Approval Marks) (Fees) Regulations 1991 and the Agricultural or Forestry Tractors and Tractor Components (Type Approval) (Fees) Regulations 1992 are hereby revoked.
S.I. 1991/1318.
S.I. 1992/83.

Interpretation
3. (1) Unless the context otherwise requires, any reference in these Regulations to—
(a) a numbered regulation or Schedule is a reference to the regulation of or Schedule to these Regulations bearing that number;
(b) a numbered paragraph is a reference to the paragraph bearing that number in the regulation or Schedule in which that number appears; and
(c) a numbered section is a reference to the section bearing that number in the Road Traffic Act 1988.
(2) In these Regulations, except where the context otherwise requires—
“applicant” means an applicant for the issue of a type approval certificate or authorisation for a vehicle or vehicle part for the purpose of a Community Instrument or ECE Regulation, an applicant for the issue of a type approval certificate or Minister’s approval certificate for a vehicle or vehicle part for the purpose of the national type approval scheme, or an applicant for the issue of a sound level measurement certificate;
“approval mark” means a marking designated as an approval mark by Regulations made under section 80;
“approval requirements” means—
(a) the requirements for examination and approval as regards the type approval requirements specified in—
(i) a Community Instrument;
(ii) Schedule 1 to the Great Britain Regulations;
(iii) Schedule 1 to the Great Britain Regulations for Goods Vehicles; and
(iv) an ECE Regulation; or
(b) the requirements for examination and marking authorisation relating to a marking designated as an approval mark by the Motor Vehicles (Designa tion of Approval Marks) Regulations 1979;
S.I. 1979/1088, as amended by S.I. 1980/582 and 2027, 1981/126 and 1732, 1982/1479, 1983/1602, 1985/113, 1986/369, 1989/1014, 1990/1838 and 1991/1979.
“authorisation” means an authorisation in writing given by the Secretary of State for the application of an approval mark to a vehicle or vehicle part;
“Community Instrument” means a Council Regulation, a Council Directive or a Commission Directive;
“ECE Regulation” means a Regulation annexed to the Agreement concerning the adoption of uniform conditions of approval for motor vehicle equipment and parts and reciprocal recognition thereof concluded at Geneva on 20th March 1958 as amended to which the United Kingdom is a party;
Cmnd 2535.
Cmnd 3562.
By an instrument of accession dated 14th January 1963 deposited with the Secretary General of the United Nations on 15th January 1963.
“examination” means any examination or test, or series of examinations or tests carried out on a vehicle or vehicle part to ascertain that in respect of that vehicle or vehicle part approval requirements have been satisfied;
“Great Britain Regulations” means the Motor Vehicles (Type Approval) (Great Britain) Regulations 1984;
S.I. 1984/981, as amended by S.I. 1984/1401 and 1761, 1985/1651, 1986/739, 1987/1509, 1988/1522, 1989/1580, 1990/94 and 1839 and 1991/1022 and 1971.
“Great Britain Regulations for Goods Vehicles” means the Motor Vehicles (Type Approval for Goods Vehicles) (Great Britain) Regulations 1982;
S.I. 1982/1271, as amended by S.I. 1984/697 and 1402, 1985/46, 1986/427 and 1089, 1987/1508, 1988/1523, 1989/1579 and 1991/1021 and 1970.
“Government or approved premises” means premises established or approved by the Secretary of State for Transport for the examination of vehicles or vehicle parts for the purposes of the national type approval scheme, or for the purpose of a Community Instrument or an ECE Regulation;
“national type approval scheme” means the scheme for the type approval of vehicles and vehicle parts provided for in Great Britain Regulations and the Great Britain Regulations for Goods Vehicles;
“sound level measurement certificate” has the same meaning as in the Motorcycles (Sound Level Measurement Certificates) Regulations 1980;
S.I. 1980/765, as amended by S.I. 1988/1640, 1989/713 and 1591.
“type approval certificate”, “Minister’s approval certificate” and “authorisation” include a modified or duplicate type approval certificate, Minister’s approval certificate or authorisation as the case may be;
“Type Approval Regulations” means the Motor Vehicles (Type Approval) Regulations 1980.
S.I. 1980/1182; the relevant amending instruments are S.I. 1982/7, 1986/1501, 1987/524, 1988/1103 and 1669, 1989/1578 and 2262, and 1991/820.
(3) A reference in these Regulations to a vehicle in category L1, L2, L3, L4 or L5 is a reference to a vehicle described respectively as L1, L2, L3, L4 or L5 in ECE Regulation 13 of 29th May 1969 with the amendments in force on 1st April 1987.
(4) A reference to a vehicle in category M1, M2, M3, N1, N2 or N3 is a reference to a vehicle described respectively as M1, M2, M3, N1, N2 or N3 in Council Directive 70/156/EEC of 6th February 1970.
O.J. L42, 23.2.70, p. 1.

Fees—basic scale for examinations of vehicles or parts of vehicles
4. (1) In this regulation any reference to a numbered column is a reference to the column bearing that number in Part II of Schedule 1.
(2) Subject to the subsequent provisions of these Regulations, the fee prescribed as regards the approval requirements specified in relation to a fee number in column 1 is the fee specified in relation to that fee number in column 4.
(3) Part I of Schedule 1 contains an index to Part II of that Schedule.
(4) Where, in relation to an approval requirement specified in column 2, more than one type of examination or more than one type of vehicle or vehicle part is specified in column 3 in connection with that approval requirement, the fee prescribed as regards that approval requirement is that specified in column 4 opposite the examination, vehicle or vehicle part in question.
(5) The fees specified in column 4(a) are hereby prescribed in a case where the examination is to be carried out on government or approved premises by an officer of the department of transport or a person appointed by the secretary of state to act on his behalf.
(6) The fees specified in column 4(b) are hereby prescribed in a case where the examination is to be carried out at other premises under the supervision of an officer of the Department of Transport or a person appointed by the Secretary of State to act on his behalf.
(7) Schedule 6 shall have effect for the interpretation of—
(a) certain expressions relating to Community Instruments and ECE Regulations, and
(b) certain abbreviations,
used in Schedule 1.

Fees—consecutive examinations
5. Where more than one vehicle or vehicle part of the same type but embodying minor variations are submitted by an applicant with a view to carrying out the examinations consecutively on each item, and the case is one where all the examinations can be carried out without setting up the examination apparatus again, the fee to be paid for the carrying out of each examination after the first one is such proportion of the fee prescribed in regulation 4 as the Secretary of State considers to be appropriate in view of the work involved in carrying out such examination.

Fees—partial examinations
6. (1) Where a certificate to which this paragraph applies has been issued in relation to a vehicle or vehicle part and in consequence of an alteration in the design specification of the vehicle or vehicle part, either—
(a) a further examination of the vehicle or vehicle part is needed with a view to the issue of a modified or further certificate but the alteration is not so extensive as to require that the further examination shall be as complete and exhaustive as the original examination; or
(b) an applicant requires a modification of a certificate but the alteration is not so extensive as to require a further examination of the vehicle or vehicle part and can be carried out on an examination of data supplied by the applicant,
the fee for such an examination is such proportion of the fee prescribed in regulation 4 as the Secretary of State considers to be appropriate.
(2) Paragraph (1) applies to—
(a) a sound level measurement certificate; or
(b) a type approval certificate, or an authorisation, in relation to—
(i) a Community Instrument; or
(ii) an ECE Regulation; or
(c) a type approval certificate, or a Minister’s approval certificate, in relation to the national type approval scheme.
(3) Where, in the case of any examination as is mentioned in regulation 4 or 5 or in paragraph (1)—
(a) it has been found impossible to complete the examination satisfactorily; or
(b) the vehicle or vehicle part submitted for the examination does not satisfy completely the requirements of the examination,
and in consequence a further, but partial, examination of the vehicle or vehicle part is required, the fee to be paid for such further examination is such proportion of the fee prescribed in regulation 4 as the Secretary of State considers to be appropriate in view of the nature and extent of the further, but partial, examination.
(4) Where more than one vehicle or vehicle part of the same type but embodying minor variations is submitted by an applicant and it is unnecessary to submit each individual vehicle or vehicle part to a complete examination, the fee to be paid for the carrying out of the partial examination on a particular vehicle or vehicle part is such proportion of the fee prescribed in regulation 4 as the Secretary of State considers to be appropriate in view of the nature and extent of the partial examination.

Fees—final examination of complete vehicle
7. (1) The fee for the final examination of a vehicle to which the Great Britain Regulations apply with a view to the issue in respect of that vehicle of a document specified in column 1 of Schedule 2 where, before the examination takes place, type approval procedures have been carried out (whether in Great Britain or elsewhere) to ascertain that in respect of that vehicle all the approval requirements which—
(a) are referred to in Schedule 1 to those Regulations;
(b) relate to particular parts or aspects of a vehicle; and
(c) are applicable to the vehicle,
have been satisfied, is of the amount specified in column 3 of Schedule 2.
(2) The fee for the final examination of a vehicle to which the Great Britain Regulations for Goods Vehicles apply with a view to the issue in respect of that vehicle of a document specified in column 1 of Schedule 3 where, before the examination takes place, type approval procedures have been carried out (whether in Great Britain or elsewhere) to ascertain that in respect of that vehicle all the approval requirements which—
(a) are referred to in Schedule 1 to those Regulations;
(b) relate to particular parts or aspects of a vehicle; and
(c) are applicable to the vehicle,
have been satisfied, is of the amount specified in paragraph (3).
(3) The amount referred to in paragraph (2) is the amount shown in—
(a) column 2(a) of Schedule 3 if the vehicle is in category L2, L5 or N1;
(b) column 2(b) of Schedule 3 if the vehicle is in category N2; and
(c) column 2(c) of Schedule 3 if the vehicle is in category N3.
(4) Where in the case of an examination of a complete vehicle mentioned in paragraphs (1) or (2) above—
(a) it has been found impossible to complete that examination satisfactorily; or
(b) the vehicle has been found not to comply in all aspects with the relevant approval requirements; or
(c) the vehicle is one which has been assembled in more than one stage by more than one manufacturer; or
(d) a type approval certificate or Minister’s approval certificate has previously been issued in respect of the model of the vehicle but the vehicle incorporates certain changes in detail not covered by the certificate,
and in consequence a further, but partial, examination of the vehicle is required before the relevant document can properly be issued in respect of it, the fee for that partial examination shall be such proportion of the relevant sum specified in Schedule 2 or, as the case may be, Schedule 3 as the Secretary of State considers to be appropriate in view of the nature and extent of that partial examination.

Fees—avoidance of duplication
8. Where the examination of a vehicle or vehicle part for the purposes of a Community Instrument or ECE Regulation is carried out at the same time as the examination of that vehicle or vehicle part for the purposes of the national type approval scheme, then in so far as one and the same operation or series of operations serves for both examinations, the fee payable under these Regulations shall be the fee for only one examination.

Fees—issue of documents
9. (1) The fee for the issue of a document of a type specified in column 1 of Schedule 4 (being a document relating to a vehicle part) is the fee of the amount specified in relation thereto in column 3 of Schedule 4.
(2) The fee for the issue of a document specified in column 1 of Part I of Schedule 5 (being a document relating to a vehicle to which the Great Britain Regulations apply) is the amount specified in relation thereto in column 3 of Part I of Schedule 5.
(3) The fee for the issue of a document specified in column 1 of Part II of Schedule 5 (being a document relating to a vehicle to which the Great Britain Regulations for Goods Vehicles apply) is the amount specified in relation thereto in column 3 of Part II of Schedule 5.
(4) The fee for the issue of a sound level measurement certificate is £45.

Fees—visits outside the United Kingdom
10. (1) Where, in connection with an application for or the performance of, the carrying out, or supervision by or on behalf of the Secretary of State, of an examination of a vehicle or vehicle part in relation to the issue of a type approval certificate or authorisation for the purpose of a Community Instrument, or ECE Regulation, or in relation to a type approval certificate or Minister’s approval certificate for the purpose of the national type approval scheme, a visit to a place outside the United Kingdom is made, or is arranged to be made, by one or more persons acting for or on behalf of the Secretary of State, then in addition to the fee or fees prescribed by the regulations above, there shall be paid by the applicant on demand by or on behalf of the Secretary of State a further fee equal to the total of—
(a) the travelling and subsistence expenses reasonably incurred or expected to be incurred by each person so acting in relation to the application or examination (including expenses outstanding after the cancellation of any travelling or subsistence arrangements which result from the withdrawal of any such application); and
(b) the whole, or such proportion as the Secretary of State may determine is reasonably attributable to the application or examination, of a sum of £54 for each hour spent or expected to be spent by each person so acting whilst travelling otherwise than on land in the United Kingdom, wholly or partly in relation to the application or examination.
(2) The reference to expenses in paragraph 1(a) does not include any expenses relating to—
(a) travelling on land in the United Kingdom, or
(b) any flight which both begins and ends within the United Kingdom.
(3) If—
(a) payments have been made in accordance with paragraph (1) in respect of travelling and subsistence expenses expected to be incurred, or in respect of time expected to be spent in travelling; and
(b) the amount of travelling and subsistence expenses actually incurred or the time actually spent travelling in consequence of the application is greater or less than was estimated,
the fee payable under paragraph (1) shall be re-calculated in accordance with that paragraph by reference to the actual travelling and subsistence expenses incurred and the actual time spent in travelling, and the difference shall be paid by, or as the case may be, refunded to, the applicant.

Payment of fees
11. (1) The fee for the carrying out or supervision of an examination of a vehicle or vehicle part in connection with the issue of a type approval certificate or authorisation, for the purpose of a Community Instrument, or ECE Regulation or in connection with the issue of a sound level measurement certificate shall be paid when the application is made for the issue of the type approval certificate, authorisation or sound level measurement certificate for the vehicle or vehicle part in question.
(2) The fee for the carrying out or supervision of an examination of a vehicle or vehicle part in connection with the issue of a type approval certificate or a Minister’s approval certificate shall be paid when the applicant is notified by the Secretary of State in accordance with the provisions of the Great Britain Regulations, or the Great Britain Regulations for Goods Vehicles of the fee payable.
(3) The fee for the issue of a document specified in Schedule 4 or 5 shall be paid—
(a) in a case where the examination of a vehicle or vehicle part for which a fee is payable under these Regulations is required before the document is issued, when the applicant is notified of the result of the examination; and
(b) in any other case, when the application is made for the issue of the document.

Fees on withdrawals and cancellations
12. (1) Subject to the provisions of regulation 13, if an applicant—
(a) after he has been notified of the time and place for the examination withdraws his application; or
(b) does not submit the vehicle or vehicle part for the examination at the time and place fixed therefore,
he shall be liable to pay a cancellation fee to cover the abortive work involved in dealing with the application and making arrangements for the examination.
(2) In the case of an examination of a vehicle or vehicle part to which a fee specified in Schedule 1 applies—
(a) if the Secretary of State is, not less than 7 days before the date fixed for the examination, notified of the withdawal or of the intention not to submit the vehicle or vehicle part for the examination, the cancellation fee shall be £97;
(b) if the Secretary of State is not so notified within that period—
(i) where the fee is specified in column (a) of Schedule 1, the cancellation fee shall be a quarter of that fee plus any wasted expenses reasonably incurred by the Secretary of State in the provision of any facility for the particular examination; or
(ii) where the fee is specified in column (b) of Schedule 1, the cancellation fee shall be half of that fee or £215 whichever is the less.
(3) In the case of a further or partial examination of a vehicle or vehicle part in the circumstances described in regulation 6, the cancellation fee shall be such proportion of the fee as the Secretary of State considers to be appropriate.
(4) In the case of an examination of a vehicle to which a fee specified in Schedule 2 or Schedule 3 applies—
(a) if the Secretary of State is, not less than 14 days before the date fixed for the examination, notified of the withdrawal or of the intention not to submit the vehicle for examination, the cancellation fee shall be £95;
(b) if the Secretary of State is not so notified within that period, the cancellation fee shall be £280.
(5) Any cancellation fee for which an applicant is liable in accordance with the foregoing provisions of this regulation shall be provided—
(a) in a case where the applicant has paid the fee prescribed by these Regulations for the examination in question, by the Secretary of State retaining the cancellation fee from the fee which has been paid; or
(b) in any other case by the applicant paying the cancellation fee to the Secretary of State within 14 days of the issue by the Secretary of State of a request for such payment.
(6) An applicant who is liable for a cancellation fee under this regulation in respect of an application shall also be liable for any fee payable under regulation 10, but all other fees under these Regulations in respect of the application shall be reduced to nil (the balance of any sums paid in respect of the application being refundable).

Submission of alternative vehicle or vehicle part for examination
13. Where an applicant does not wish, or is unable, to submit the vehicle or vehicle part in respect of which the application was made, for examination at the time and place appointed, but is able to submit for examination at that time and place some other vehicle or vehicle part which can conveniently be fitted into the programme of examinations being carried out at that place and in respect of which he has made an application he shall be entitled, subject to any adjustment by way of refund or additional payment so as to secure that the appropriate fee is paid for the examination which actually takes place, to have the sum which he originally paid applied in payment of the fee for that examination without being liable to pay a cancellation fee under regulation 12(1), but in that event he shall pay the appropriate fee prescribed by these regulations when applying for a new appointment for the examination which he originally sought.

Fees to be paid in relation to prescribed and notifiable alterations
14. (1) The fee prescribed in the event of particulars of a prescribed alteration being sent to the Secretary of State in accordance with regulation 10 of the Great Britain Regulations for Goods Vehicles is—
(a) if the vehicle is one in respect of which a certificate of conformity has been issued—
(i) £30 if the vehicle is in category L2, L5, or N1;
(ii) £35 if the vehicle is in category N2 or N3; or
(b) if the vehicle is one in respect of which a Minister’s approval certificate has been issued—
(i) £30 if the vehicle is in category L2, L5, or N1;
(ii) £35 if the vehicle is in category N2 or N3
(2) The fee prescribed in respect of a notification made in accordance with a condition attached to a type approval certificate pursuant to section 56(1)(b) issued in respect of a vehicle to which the Great Britain Regulations for Goods Vehicles apply is £10 if the vehicle is in category N2 or N3.
(3) The fee prescribed in respect of a notification which is evidence of a kind mentioned in section 58(4) and (5) in respect of a vehicle to which the Great Britain Regulations for Goods Vehicles apply is £10 if the vehicle is in category N2 or N3.
Signed by authority of the Secretary of State for Transport
Christopher Chope
Parliamentary Under Secretary of State,
Department of Transport
2nd March 1992
We consent to the making of these Regulations to the extent that they are made in exercise of the powers conferred by section 56(1) and (2) of the Finance Act 1973.
Irvine Patnick
Nicholas Baker
Two of the Lords Commissioners of Her Majesty’s Treasury
4th March 1992
SCHEDULE 1
Regulation 4

PART I Index to the table of fees for the examination of vehicles or parts of vehicles set out in Part II.

Section A— Component Tests
Fee Series	Subject matter
01000	Headlamps
03000	Signal lamps
05000	Other lamps
07000	Filament lamps
09000	Seat belts
11000	Child restraints
13000	Glass
15000	Mirrors
17000	Other components

Section B— Vehicle Tests
Fee series	Subject matter
20000	Electronic systems
22000	Engine related tests Emissions—light vehicles Emissions—heavy vehicles Power and fuel consumption
24000	Sound levels
26000	Dynamic tests Brakes—trailers Brakes—other vehicle types Motorcycle brakes
27000	Steering Temporary spare wheel Speedometers
28000	Body structure Latches and hinges Protective steering Other impacts (ie rear impact, head-on impact) Fire risks Seat belts and anchorages
29000	Seat tests Body and trim (ie interior fittings, exterior projections) Rear and side protection (incl. fuel tanks)
30000	Visibility Rear-view mirrors Forward field of vision Defrost and demist systems
31000	Wiper and washer systems Heating systems
32000	Lighting installation Installation of lighting Headlamp cleaners
34000	Tyres
36000	Controls Anti-theft devices Foot controls Identification of controls, tell-tales and indicators
38000	PSV tests
40000	Other vehicle tests Statutory plates Space for mounting and fitting of rear registration plates Towing hooks Mechanical couplings
50000	Tests for agricultural and forestry tractors

PART II Table of Fees for the Examination of Vehicles or Parts of Vehicles
1	2		3	4	
	Approval requirements		Particulars of type of examination, or vehicle part where not uniform in relation to each approval requirement	Amount of fee for examination	
Fee No.	(a) Subject matter	(b) Document in which requirement is specified		(a) £	(b) £
SECTION A COMPONENTS					
01 – HEADLAMPS					
01001 01002 01003	Headlamp emitting an asymmetrical passing beam or driving beam or both	Directive 76/761/EEC or ECE Regulation 1 or Item 6 in Schedule to the 1 G.B. Regs	Type C Type R Type CR	800 730 900	
01004 01005 01006	Headlamps emitting an asymmetrical passing beam or driving beam or both	Directive 89/517/EEC or ECE Regulation 1.01	Type C Type R Type CR	1780 1710 1870	
01201 01202 01203	Sealed-beam headlamps emitting a European asymmetrical passing beam or a driving beam or both	ECE Regulations 5 and 5.01 or Item 6 in Schedule 1 to the G.B. Regs.	Type SR Type SC Type SCR	1570 1710 1970	
01204 01205 01206	Sealed beam headlamps emitting a European asymmetrical passing beam or a driving beam or both	ECE Regulation 5.02 or Item 6 in Schedule 1 to the G.B. Regs.	Type SR Type SC Type SCR	2540 2680 2930	
01401 01402 01403	Headlamps emitting an asymmetrical passing beam or a driving beam or both equipped with halogen H1, H2 or H3 filament lamps	ECE Regulation 8 or Item 6 in Schedule 1 to the G.B. Regs	Type HC Type HR Type HCR	870 810 980	
01406 01407 01408	Headlamps emitting an asymmetrical passing beam or a driving beam or both equipped with halogen H1, H2 or H3 filament lamps	ECE Regulation 8.04 or Item 6 in Schedule 1 to the G.B. Regs	Type HC Type HR Type HCR	1840 1780 1960	
01601 01602 01603	Headlamps emitting an asymmetrical passing beam or a driving beam or both and equipped with halogen filament lamps (H4 lamps)	ECE Regulation 20.01 or Items 6A in Schedule 1 to the G.B. Regs	Type HC Type HR Type HCR	870 810 980	
01604 01605 01606	Headlamps emitting an asymmetrical passing beam or a driving beam or both and equipped with halogen filament lamps (H4 lamps)	ECE Regulation 20.02 or Item 6A in Schedule 1 to the G.B. Regs	Type HC Type HR Type HCR	1840 1780 1960	
01801 01802 01803	Halogen sealed-beam (H4SB) headlamps emitting an asymmetrical passing beam or driving beam or both	ECE Regulations 31 and 31.01 or Item 6 in Schedule 1 to the G.B. Regs	Type HSR Type HSC Type HSCR	1330 1590 1860	
01804 01805 01806	Halogen sealed-beam (H4SB) headlamps emitting an asymmetrical passing beam or driving beam or both	ECE Regulations 31.02	Type HSR Type HSC Type HSCR	2310 2570 2820	
01901	Headlamps for mopeds	ECE Regulation 56		870	
01902	Headlamps for motorcycles	ECE Regulation 57.01		1960	
01903	Headlamps for motorcycles emitting an asymmetrical passing beam and a driving beam and equipped with halogen lamps (HSI)	ECE Regulation 72		1960	
01904	Headlamps for mopeds emitting a driving beam and passing beam	ECE Regulation 72		1960	
02001 02002 02003	ADDITIONAL tests for headlamps, carried out at the same time as one of the respective tests specified above	Respective standards listed in column 2 above, included with the Regulation shown in column 3 of this item	Addition for COLOUR alternative for R5 or R31 Addition for COLOUR alternative for R8 or R20 Addition for STONEGUARD alternative for R1, R5, R8, R20, R31	590 240 410	
03 – SIGNAL LAMPS					
03001 03002	Reflex reflecting devices	Directive 76/757/EEC or ECE Regulation 3 or Item 8 in Schedule 1 to the G.B. Regs	Universal mounting left and right version	850 1010	
03004 03005 03006	Reflex reflecting devices	ECE Regulation 3.01 or 3.02 or Item 8A in Schedule 1 to the G.B. Regs	Universal mounting left and right version Clear and amber extension	900 1250 1160	
03201 03202	Direction indicators	Directive 76/759/EEC or ECE Regulation 6 or Item 9 in Schedule 1 to the G.B. Regs	Single function, single lamp Two orientations	1110 1070	
03203 03204	Direction indicators	Directive 89/277/EEC or ECE Regulation 6.01 or Item 9 in Schedule 1 to the G.B. Regs	Single function, single lamp Single function, assembly of two lamps	930 1380	
03401 03402	Lamps—side, rear or stop	Directive 76/758/EEC or ECE Regulation 7 or Item 7 in Schedule 1 to the G.B. Regs	Single function, side, rear or stop Two orientations	800 1110	
03403 03404	Lamps—side, rear or stop	Directive 89/516/EEC or EEC Regulation 7.01 or Item 7A in Schedule 1 to the G.B. Regs	Single function, single lamp Single function, assembly of two lamps	930 1300	
03601 03602 03603	ADDITIONAL tests for signal lamps, carried out at the same time as one of the respective tests specified above	Relevant standards listed in column 2 above, included with a Regulation shown in column 3 of this item.	EACH additional function as part of a rear group, to Regulations: 6 or 7 or 23 or 23.01 6.01 or 7.01 single lamp 6.01 or 7.01 assembly of two lamps	270 340 790	
04001 04002	Signal lamps for motorcycle or mopeds	EEC Regulation 50	Any one function, position or stop or indicator Each additional function as part of same group	800 270	
04201	Advance warning triangles	ECE Regulation 27, 27.01 or 27.02	Full test	1970	
04202	Advance warning triangles	ECE Regulation 27.03	Full test	2240	
05 – OTHER LAMPS					
05001 05002	Devices for the illumination of rear registration plates	Directive 76/760/EEC or ECE Regulations 4 and 4.01	First examination Each additional examination carried out at the same time	800 230	
05201	Front fog lamps	Directive 76/762/EEC or ECE Regulations 19 and 19.01	Full test on standard lamp unit	840	
05202	Front fog lamps	ECE Regulations 19.02	Full test on standard lamp unit	1810	
05250 05251	ADDITIONAL tests for fog lamps, carried out at the same time as tests specified above	ECE Regulations 19 and 19.02	Addition of COLOUR alternative Addition of STONEGUARD alternative	380 380	
05401	Reversing lamps	Directive 77/539/EEC or ECE Regulations 23 and 23.01	Single function	800	
05601	Rear fog lamps	Directive 77/538/EEC and 89/518/EEC or ECE Regulation 38 or Item 21 in Schedule 1 to the G.B. Regs	Single function	980	
05801 05802	Parking lamps	Directive 77/540/EEC or ECE Regulation 77	Single function Two functions	800 1000	
06001 06002	Special warning lights	ECE Regulation 65	Full test—Class A Full test—Class B	2260 3150	
07 – FILAMENT LAMPS					
07001	Incandescent electric filament lamps for headlamps emitting an asymmetrical passing beam or driving beam or both	Directive 76/761/EEC or ECE Regulation 2 or Item 6 in Schedule 1 to the G.B. Regs	Single bulb type	1290	
07201	Halogen H1, H2 or H3 filament lamps for headlamps emitting an asymmetrical passing beam or driving beam or both	ECE Regulation 8 or Item 6 in Schedule 1 to the G.B. Regs	Single bulb type	1140	
07401	Halogen H4 filament lamps for headlamps emitting an asymmetrical passing beam or driving beam or both	ECE Regulation 20 or Items 6A in Schedule 1 to the G.B. Regs	Single bulb type	1480	
07601 07602 07603 07604 07605 07606	Filament lamps	ECE Regulation 37.01 or Item 6 in Schedule 1 to the G.B. Regs	Type R2 Type H4 Types H1, H2 and H3 Types P25-1, R19, C11, C15, T8-4, W10/5, W10/3, F1, F2 and F3 Types S1 and S2	1290 1480 1140 790 660 1290	
07607 07608 07609 07610 07611	Filament lamps	ECE Regulations 37.02 and 37.03 or Item 6 and 6A Schedule 1 G.B. Regs	Types R2 and SA Types H4 and HS1 Types H1, H2, H3 and HS2 Type P21/5W Types P21/W, R5W, R10W, C5W, C21W, T4W, W5W, F1, F2 and F3	1290 1480 1140 790 660	
07612 07613 07614 07615 07616			Types S1 and S2 Type S3 Type P21/4W Type PY21W Types H1, H2, and H3 selective yellow	1290 1140 890 850 1330	
09 – SEAT BELTS					
09001 09002 09003	Seat belts	ECE Regulation 16.03 or Item 12(ia) Schedule 1 G.B. Regs or Directives 77/541/EEC, 81/576/EEC and 90/628/EEC	Two or three point static belt assembly Two or three point belts with an emergency locking retractor Addition to above when tested as a restraint system	2880 3430 2150	
09004 09005 09006 09007 09008	Seat belts	ECE Regulation 16.04 or Item 12A(ia) in Schedule 1 to the G.B. Regs or Directives 82/319/EEC and 90/628/EEC	Two or three point static belt assembly Two or three point belt with an emergency locking retractor Addition to above when tested as a restraint systems Fourth point harness belt Harness belt with retractor	2940 3490 2150 2940 3450	
11 – CHILD RESTRAINTS					
11010 11011 11012 11020 11050 11051	Child restraints	ECE Regulation 44.01 or 44.02	CHILD HARNESS, Assembly without retractors CHILD SEATS—single Mass Group and attachment system: Forward facing with child harness and seat restraint Rearward facing with child harness and seat restraint BOOSTER seat/cushion with adult belt to restrain child ADDITIONAL tests to above for: Automatically locking retractor Emergency locking retractor	2370 3220 4060 1590 500 590	
13 – SAFETY GLASS					
13001	Safety glass	Item 15 or 15A in Schedule 1 to the G.B. Regs	Glass manufactured under licence issued by the British Standards Institution	250	
13002	Safety glass	ECE Regulation 43 or Item 15B in Schedule 1 to the G.B. Regs	Conversion of a BSAU 178 approval to ECE Regulation 43	250	
13003 13004 13010 13011 13020 13021 13050 13051	Safety glass	ECE Regulation 43 or Items 15B in Schedule 1 to the G.B. Regs	Windscreens: toughened toughened—slow moving vehicle laminated treated and laminated Windows other than windscreens: toughened laminated Additional test on: plastic coated glass double-glazed units	2010 1620 2530 2620 1090 1310 210 330	820 530
15 MIRROR COMPONENT TESTS					
15001	Rear-view mirrors	Directives 79/795/EEC, 85/205/EEC, 86/562/EEC and 88/321/EEC or ECE Regulation 46	Component test, witnessed at manufacturers		430
15002 15003 15004 15005 15006	Rear-view mirrors	Directives 79/795/EEC, 85/205/EEC, 86/562/EEC and 88/321/EEC or ECE Regulation 46	Component test on single mirror of large dimensions or complex mounting involving two impact tests Component test on single mirror of moderate dimensions and simple mounting system involving two impact tests Modified mounting Additional type Reflectivity only	1070 850 1150 1290 500	
15201	Rear-view mirrors for motorcycles	Directive 80/780/EEC	Component test (as 15003 above)	850	430
17 – OTHER COMPONENTS					
17001 17002	Recording equipment for road transport vehicles	Community Regulations 1463/70, 1787/83, 2828/77 and 3821/85	Instrument and chart Chart only, instrument supplied by applicant	4240 1290	
17201 17202	Rear marking plates heavy vehicles	ECE Regulation 69	Rear marking plates Additional model	3580 1660	
17204 17205	Rear marking plates slow vehicles	ECE Regulation 70	Rear marking plate Additional model	3580 1660	
SECTION B – VEHICLE RELATED					
20 – ELECTRONIC					
20001 20002 20003 20004	Radio-interference suppression	Directive 72/245/EEC or ECE Regulation 10.01 or Item 2A in Schedule 1 to the G.B. Regs or Item 5A in Schedule 1 to the G.B. Regs for Goods Vehicles	First examination (DTp test site) Each additional examination at the same time First examination (Manufacturers test site) Each additional examination at the same time	620 460 840 500	410 290
22 – ENGINE RELATED TESTS					
EMISSIONS – LIGHT VEHICLES					
22001 22002	Exhaust emissions—spark ignition	Directive 78/665/EEC or Item 4B in Schedule 1 to the G.B. Regs or Item 2 in Schedule 1 to the G.B. Regs for Goods Vehicles	Type I, II and III test Each additional Type I test	850 160	600 100
22003 22004	Exhaust emissions—petrol or diesel	Directives 83/351/EEC 88/76/EEC (European cycle) and 89/491/EEC or ECE Regulation 83 or Item 4C or 4D in Schedule 1 to the G.B. Regs or Item 2B or 2C in Schedule 1 to the G.B. Regs for Goods Vehicles	European cycle Type I, II and III test Each additional Type I test	2010 830	600 100
22005 22006	Exhaust emissions— Petrol or diesel	Directives 88/76/EEC, 89/485/EEC and 89/491/EEC	Alternative Annex IIIA cycle: Type I, II & III tests Each additional type I test	3190 1750	820 170
22010 22011	Exhaust Emissions—diesel	Directives 88/436/EEC, 89/458/EEC and 89/491/EEC or Item 27 in Schedule 1 of G.B. Regs	Emissions and Particulates Type I test Each additional Type 1 test		660 180
22020 22022 22024 22026 22028	Exhaust emissions—petrol or diesel	Directive 91/441/EEC	Type I, III and IV test Petrol engine to US Federal Regs Petrol engine to transitional provision 8.2 to 99/436/EEC Petrol engine Type V test—Durability Diesel engine Type V test—Durability	5710 3020 5800 81790 82200	780 860 860 1300 1710
EMISSIONS – HEAVY VEHICLES					
22201	Emissions	Items 2A in Schedule 1 to the G.B. Regs for Goods Vehicles	Crankcase emissions	310	260
22202	Exhaust emissions—diesel	Item 3B in Schedule 1 to the G.B. Regs for Goods Vehicle	BSAU 141 certificate	220	180
22203	Smoke emissions—diesel engines	Directives 72/306/EEC and 89/491/EEC or ECE Regulation 24.02 or ECE Regulation 24.03	VEHICLE TEST of smoke emissions to the co-incident requirements of each Regulation or Directive	2910	500
22210 22211 22212	Diesel engine power and smoke emissions	Directives 72/306/EEC, 80/1269/EEC, 88/195/EEC and 89/491/EEC or ECE Regulation 24.02 or ECE Regulation 24.03	BENCH TESTS carried out on a single engine to the co-incident requirements of respective Regulation or Directive Power and smoke Power only Smoke only	7570 7200 6970	700 580 500
22214	Installation of approved engine	ECE Regulation 24.03 Part II	Verification of installed conditions and check of intake and exhaust pressure	860	370
22401 22402	Diesel gaseous emissions	Directive 88/77/EEC and 91/542/EEC or ECE Regulation 49.01 or Item 4E in Schedule 1 to the G.B. Regs or Item 2D in Schedule i to the G.B. Regs for Goods Vehicles	Full bench test Test as a CONTINUATION of an engine tested for power or smoke on the same bench (carry over power curve)	9470 3200	840 510
22501 22502	Unleaded fuel compatibility	Item 25 in Schedule 1 to the G.B. Regs or Item 7 in Schedule 1 to the G.B. Regs for Goods Vehicles	Full Test Full Test		110 110
22503 22504	Unleaded fuel filler input orifice	Item 26 in Schedule 1 to the G.B. Regs or Item 8 in Schedule 1 to the G.B. Regs for Goods Vehicles	Full test and inspection Full test and inspection	140 140	130 130
POWER					
22601 22602	Power to weight ratio	Item 1A in Schedule 1 to the G.B. Regs for Goods Vehicles	Where power to weight ratio is less than 6 kilowatts per tonne Where power to weight ratio is 6 kilowatts per tonne or more	230 210	180 160
22603 22604	Power to weight ratio	Item 1 in Schedule 1 to the G.B. Regs for goods vehicles	Where power to weight ratio in less than 6 kilowatts per tonne Where power to weight ratio is 6 kilowatts per tonne or more	210 170	160 150
22610	Engine power	Directives 80/1269/EEC, 88/195/EEC and 89/491/EEC or ECE Regulation 85	Full bench test on petrol or light diesel engine	7110	600
FUEL CONSUMPTION					
22801 22802 22803 22804 22805 22806	Fuel consumption	Directives 80/1268/EEC and 89/491/EEC or ECE Regulation 84	WITNESS of measurements for urban cycle, plus 90 and 120 km/h constant speed condition, to determine: consumption — (90 and 120 km/h on TRACK) ROAD LOADS for dynamometer settings consumption on DYNAMOMETER (known loads) PERFORMANCE measurements as above: consumption (90 and 120 km/h on TRACK) ROAD LOAD measurements—all speeds. Consumption on DYNAMOMETER (known loads).	3130 900 1740	890 920 670
24 – SOUND LEVELS					
24001 24002 24003	Sound levels	Directives 70/157/EEC, 73/350/EEC, 77/212/EEC, 81/334/EEC, 84/372/EEC and 84/424/EEC or Item 14B, 14C and 14D in Schedule 1 to the G.B. Regs or Item 4B, 4C, 4D and 4E in Schedule 1 to the G.B. Regs for Goods Vehicles	Drive by and static test on: category M1 and N1 vehicles other category vehicles Drive by measurements on M1 and N1 vehicles for comparison of replacement silencers	790 1070 1240	400 510 520
24050 24051 24052	Silencer conditioning in preparation for sound level by tests above	Standards in column 2 above for fee numbers 24001, 24002, and 24003	ADDITION to drive by test for silencer conditioning by: Dynamometer bench method Road method (drivers supplied by applicant) Pulsation method—on vehicle or prepared engine on bench	170 1150	280 170 200
24201 24202	Audible warning devices	Directive 70/388/EEC or Regulation 28.01	Laboratory test on pair of horns Vehicle—installed sound level	3200 430	700 280
24001 24403	Motor cycle sound levels	Directive 78/1015/EEC or 87/56/EEC (S.I. 1980 No 765 and S.I. 1988 No 1640) Directive 89/235/EEC	Drive by and Static test Replacement silencer	590	360 460
26 – DYNAMIC TESTS					
BRAKES – TRAILERS					
26001 26002 26003 26004 26005	Brakes—small trailers	Directives 71/320/EEC, 74/132/EEC, 75/524/EEC, 79/489/EEC, 85/647/EEC and 88/194/EEC (Excluding Annexes X, XI & XII). or ECE Regulations 13.03, 13.04, 13.05 and 13.06 (Excluding Annexes 13, 14 & 15, except where stated in column 3).	Trailers of category 01 not fitted with brakes Inertia braked trailers up to category 02:— System compatibility Control device Foundation brake Electric braked trailers of category 02, to ECE Reg 13.05 Annex 14 or 85/647 Annex XI	260 940 1140 830 2180	230 660
26021	Brakes—larger air braked trailers	Directives 71/320/EEC, 74/132/EEC, 75/524/EEC and 79/489/EEC or ECE Regulation 13.03 and 13.04	Static and LADEN Dynamic tests on air braked trailers. Excluding antilock and type I and II fade tests to Annex VII	2330	
26022	Brakes—larger air braked trailers	Directives 85/647/EEC and 88/194/EEC or ECE Regulation 13.05	Static, laden and UNLADEN Dynamic test on air braked trailers. Excluding antilock and type I and II fade tests to Annex VII	2540	
26024 26025	Brakes—larger air braked trailers	Directives 85/647/EEC or 88/194/EEC or ECE Regulation 13.05	Tests to the ANTI-LOCK requirements of Annex 13 of ECE Regulation 13.05 and Annex X of Directive 85/647 (excluding EMI) Normal brake test	1440 1100	
26026 26027	Brakes—larger air braked trailers	Directives 71/320/EEC, 84/132/EEC, 75/524/EEC, 79/489/EEC 85/647/EEC and 88/194/EEC or ECE Regulations 13.03, 13.04 and 13.05	Type I and II FADE TESTS on an axle system leading to the issue of an Annex VII report to Directive and Annex II to Regulation on TRACK —on DYNAMOMETERS	1630 630	630
BRAKES – OTHER VEHICLE TYPES					
26201	Brakes—other vehicle types	Item 6E in Schedule 1 to the G.B. Regs for Goods Vehicles	Tests of slow vehicles and public works vehicles	810	670
26202	Brakes—other vehicle types	ECE Regulation 13.03, 13.04 and 13.05 or Item 13D and 13F in Schedule 1 to the G.B. Regs	Tests for category L5 three wheel vehicles	1520	910
26203 26204 26205 26206 26207 26208 26209	Brakes—other vehicle types	Directive 71/320/EEC, 74/132/EEC, 75/524/EEC, 79/489/EEC, 85/647/EEC and 88/194/EEC (excluding Annexes X, XI and XII) or ECE Regulations 13.03, 13.04 and 13.05 (excluding Annexes 13, 14 and 15) or Items 13A, 13B, 13C, 13E and 13G in Schedule 1 to the G.B. Regs or	Brakes—hydraulic and hydraulic assisted, (excl anti-lock) for: M1 passenger cars and other M1 and N1 vehicles >=2500kg Other M1 and N1 vehicles <2500 kg or M2 & N2 vehicles Brakes—full air and air over Hydraulic, (excluding antilock) for vehicles less than 50 tonnes: N3 and M3, 3-4 axle, designated to draw a trailer N3 and M3, 3-4 axle, NOT designed, or 2 axle designed to draw a trailer N3 and M3, 2 axle, NOT designed to draw a trailer N2 and M2 vehicles Mobile cranes over 50 tonnes, STATICS and LADEN Dynamics	2340 2810 6100 5840 5340 4540 6540	1390 1550 2360 2150 1950 1740
26250 26251 26252 26253 26254 26255 26256 26257	Brakes—other vehicle types. Anti-lock tests	Directive 85/647/EEC or 88/194/EEC Annex A or ECE Regulation 13.05 Annex 13	Tests of anti-lock brake system only, where no assistant provided by applicant (excluding electro-magnetic interference) for: M1 and N1 vehicle M1 and N2 as CONTINUATION of a normal brake test Other vehicles Other vehicles, as a CONTINUATION of a normal brake test Tests of anti-lock brake system only, where no assistant provided by applicant (excluding electro-magnetic interference) for: M1 and N1 vehicle M1 and N2 as CONTINUATION of a normal brake test Other vehicles Other vehicles, as a CONTINUATION of a normal brake test	4050 3570 5150 4470 3420 2870 4240 3560	1710 1460 2070 1840
26270 26271 26272	Brakes (replacement linings)	Directive 85/647/EEC, Annex XII or ECE Regulation 13.05, Annex 15	Monitor dynamometer comparison test of replacement brake linings fitted to: Disc brakes M1 or N1 Drum brakes Other category drum brakes		670 670 770
26280	Brakes (EMI)	Directives 85/647/EEC or 88/194/EEC, Annex X or ECE 13.05, Annex 13	Test on anti-lock control units and servo devices to check for electromagnetic interference	1420	630
MOTOR CYCLE BRAKES					
26401 26402 26403 26404 Brakes on motorcycles	ECE Regulation 13.03, 13.04 and 13.05	Tests to the requirements for motor cycle brakes: L1 and L2 machines L1 and L2 machines, rider supplied by applicant L3 and L4 machines L3 and L4 machines, rider/driver supplied by applicant	1900 1280 2230 1650	760 1080
STEERING					
27001 27002	Steering	Directive 70/311/EEC or ECE Regulation 79	Measurement of steering effort: with power assisted steering Without power assisted steering	1200 750	520 410
27201	Temporary spare wheel	ECE Regulation 64	Test of vehicle stability	690	370
SPEEDOMETER					
27401	Speedometer and reverse gear	Directive 75/443/EEC or ECE Regulation 39 or Item 20 in Schedule 1 to the G.B. Regs	Test of accuracy, marking and visibility	580	350
28 – BODY STRUCTURE					
LATCHES & HINGES					
28001	Door latches and hinges	Directive 70/387/EEC	Inspection to Annex 1 of the Directive only	260	210
28002 28003 28004	Door latches and hinges	Directive 70/387/EEC or Item 1 or Item 1A in Schedule 1 to the G.B. Regs or ECE Regulation 11.02	Laboratory and vehicle test on M1 and N1 4 door vehicles, including 30g by calculation Laboratory and vehicle test on M1 and N1 4 door vehicles, including 30g by additional DYNAMIC TEST ADDITION—each SLIDING DOOR system	4770 8090 3650	680 680 70
PROTECTIVE STEERING					
28201 28202	Protective steering	Directive 74/297/EEC or ECE Regulations 12.01 and 12.02 or Item 3 or 3A in Schedule 1 to the G.B. Regs	Forward BARRIER impact test On spoke, off spoke body block test to Directive, or original or non-original equipment to Annex 4 of the Regulation	10450 5520	600 510
28203	Protective steering	ECE Regulation 12.02 or Item 3A in Schedule 1 to the G.B. Regs	Two HEADFORM impacts on steering control as original or non-original equipment to Annex 5 of the Regulation	4440	540
OTHER IMPACTS					
28401	Rear Impact	ECE Regulation 32	Moving barrier impact to rear of vehicle (R32 only)	9970	670
28410	Head-on impact	ECE Regulation 33	Passenger space (R33 only)	10430	630
FIRE RISKS					
28601 28602	Fire risks	ECE Regulation 34.01	Front and rear impact (R34 only)—excluding Annex 5 test Test to full requirements Annex 5 only	18710 26420	990 1240
SEAT BELTS & ANCHORAGES					
28801	Seat belt anchorages	Directives 76/115/EEC, 81/575/EEC, 82/318/EEC and 90/629/EEC or ECE Regulations 14.01 and 14.02	Dimensions and strength requirements for a five seat vehicle (including lap only pulls—front and rear)	9210	910
28802	Installation of seat belts	Directives 77/541/EEC, 81/576/EEC, 82/319/EEC and 90/628/EEC or ECE Regulations 16.03 and 16.04	Examination of seat belt installation requirements on front and rear seats of five seat vehicle	350	350
SEAT BELTS					
29001 29002 29003	Seats and anchorages	Directives 74/408/EEC and 81/577/EEC or ECE Regulation 17.02 or Item 16 in Schedule 1 to the G.B. Regs	Inspection of other vehicles in accordance with Annex III M1 vehicle—5 seats. Full test, STATIC method (Simple 20g calcs—GB 16) M1 vehicle—5 seats, DYNAMIC methods (including “H” points, from and rear moment)	260 17380 15950	240 630 530
29010 29011	Head restraints	Directive 78/932/EEC or ECE Regulations 25.02 and 25.03	Test of head restraint on one seat (including displacement and two impacts) FRONT REAR in car	7940 9190	490 490
29020	Seats and anchorages and head restraints	ECE Regulation 17.03 and 17.04	M1 vehicles—5 seats, full head rest, front and rear, two DYNAMIC runs (seats set in adjustment positions)	23710	1010
BODY AND TRIM					
29201	Interior fittings	Directives 74/60/EEC and 78/632/EEC or ECE Regulation 21.01 or Item 18 in Schedule 1 to the G.B. Regs	Examination of M1 vehicle, including determination of “H” points facia and seat zones and up to 6 impact tests Each additional impact test	10690 410	1400 40
29251 29252 29253	Exterior projections	Directives 74/483/EEC and 79/488/EEC or ECE Regulation 26.01 or Item 19 and 19A in Schedule 1 to the G.B. Regs	Examination, including radio aerial as original equipment Test on separate technical units: Luggage or ski racks Radio aerials	850 350 200	670 260 190
29301	Wheel guards	Directive 78/549/EEC	Examination 2 axle vehicle	360	330
REAR & SIDE PROTECTION					
29401 29402 29403 29404	Rear protective devices	Directives 70/221/EEC, 79/490/EEC, and 91/333/EEC	Inspection of M1, M2, M3, N1, 01 and 02 vehicles Installation of separate technical units FORCE TEST, on tech units or on N2, N3, 03 and 04 vehicles Assessment by CALCULATION	310 310 5980 590	250 250 490 510
29450	Side guards	Directive 89/297/EEC or ECE Regulation 73	Examination and load—2 points	4570	420
29501 29502	Fuel tanks	Directives 70/221/EEC and 83/333/EEC	Other than M1 and N1 vehicles M1 and N1 vehicles	4180 3770	510 490
30 – VISIBILITY					
30001 30002	Rear-view mirrors	Directives 71/127/EEC, 79/795/EEC, 85/205/EEC, 86/562/EEC and 88/132/EEC or ECE Regulation 46 or Items 10, 10A and 10B in Schedule 1 to the G.B. Regs	Field of vision, any 2 mirrors of appropriate class EACH additional mirror on the same vehicle	1870 640	490 80
30401	Forward field of vision	Directives 77/649/EEC, 81/643/EEC, 88/366/EEC and 90/630/EEC	Full determination of “H” and “V” points vision zones and pillar angles	2260	570
30601	Defrost and demisting systems	Directive 78/317/EEC or Item 23 Schedule 1 to the G.B. Regs	Full determination of “H” and “V” points, zones A and B and defrost/demist cleared area	5140	1160
30801 30802 30804	Wiper and washer systems	Directive 78/318/EEC or Item 22 in Schedule 1 to the G.B. Regs	Vehicle test of WIPER system with APPROVED washer system (including full determination of “H” and “V” points and zones A and B) WASHER system as a separate technical unit WASHER system as a separate technical unit (Government test house)	4610 3240 940	810 720
31001 31002	Heating systems	Directive 78/548/EEC	Vehicles fitted with a system for heating the passenger compartment using heat from the engine COOLING system Vehicles fitted with a system for using heat from the EXHAUST gases or the engine cooling air	220 670	210 490
32 – LIGHTING INSTALLATIONS					
32001 32002	Installations of lighting and signalling equipment	Item 24 in Schedule 1 to the G.B. Regs or Item 24A in Schedule 1 to the G.B. Regs	Examination Examination	710 910	500 570
32003 32004 32005 32006 32007	Installation of lighting and signalling devices	Directives 76/756/EEC, 80/233/EEC, 82/244/EEC, 83/276/EEC, 84/8/EEC and 89/278/EEC or ECE Regulation 48	M1 vehicles up to 5 seat and N1 <2600 kg, M2 and N2 M3 vehicles, N3 and M1 <5 seats N1 vehicles >=2600 kg M1 vehicles with concealed headlamp (including environmental tests) Trailers	1440 1590 1250 2600 690	990 1090 840 1140 450
32401 32402 32043	Headlamps cleaners	ECE Regulation 45 or 45.01	CLEANING test, M1 vehicles (excluding environmental checks in paragraphs 6.2.3, 4, 5 and 6.2.7 and full lamp photometric measurements) Witness if required, all tests to check ENVIRONMENTAL requirements in paragraphs 6.2.3, 4, 5 and 6.2.7. INSTALLATION of technical unit.	2360 4770 260	550 530 240
34 – TYRES					
34001 34002	Tyres	ECE Regulations 30, 30.01 and 30.02 or Item 17 and 17A in Schedule 1 to the G.B. Regs	Witness of test and check of dimensions Report examination		360 160
34201 34202 34203	Tyres for commercial vehicles	ECE Regulation 54	Examination of a test report and initial documentation from authorised laboratory for issue of initial certificate Examination of documents submitted with the same application as initial documentation for issue of certs covered by the same report Test witnessed at non-authorised laboratory		190 60 1080
34301	Tyres for motor cycles	ECE Regulation 75	Examination of report		170
36 – CONTROLS					
36001	Anti-theft devices	Directive 74/61/EEC or ECE Regulation 18 or Item 11 in Schedule 1 to the G.B. Regs	Torque test on steering column lock and check of requirements	540	360
36002	Anti-theft devices	ECE Regulation 18.01 or Item 11A in Schedule 1 to the G.B. Regs	Torque test on lock and key 2500 cycle test and check of requirements	1000	520
36004	Anti-theft devices	ECE Regulation 62	For motor cycles	1030	550
36201 36202	Foot control	ECE Regulation 35	Check including “H” point and detailed geometric measurements By obvious direct measurement	520 320	420 300
36401	Identification of controls, tell-tales and indicators	Directive 78/316/EEC	Full check of requirements	380	350
38 – PSV TESTS					
38001 38002 38003 38004 38005	Public service vehicles	ECE Regulations 36, 36.01 and 36.02	Examination (excluding fuel tank and strength of superstructure) on: Rigid vehicles Articulated vehicles Addition, fuel tank test Addition, strength of superstructure Addition, retractable steps		1230 1570 310 630 120
38201 38202 38203 38204	Public service vehicles	ECE Regulation 66	Examination and test, leading to the approval of a SINGLE vehicle type by: ROLLOVER of vehicle SECTION ROLLOVER of complete vehicle PENDULUM impact of vehicle SECTION or EXAMINATION of results produced by an approved CALCULATION method including Verification of data used, witness of two HINGE tests and evaluation of data on up to a further six unwitnessed HINGE tests	12110 11270 13440	1230 1140 1200 1520
38301 38302 38310	Strength of the seats and of their anchorages for public service vehicles	ECE Regulation 80	Tests to Annex 4 Dynamic test (impact simulation) Static test (2 seat positions) Tests to Annex 5 Anchorages of a vehicle	4660 5870 3710	700 460 420
40 – OTHER VEHICLE TESTS					
40001	Statutory plates	Directives 76/114/EEC and 78/507/EEC	Full examination	300	260
40201	Space for mounting and fitting of rear registration plates	Directive 70/222/EEC	Full examination	290	250
40401	Towing hooks	Directive 77/389/EEC	Front and rear—pull and push (excluding ISO)	3930	400
40501 40502 40503 40504 40505	Mechanical coupling components of combinations of vehicles	ECE Regulation 55	Towing fork test Ring dynamic test 5th wheel dynamic test 5th wheel static test King pin dynamic test	7520 7490 8040 3310 7490	
50 – TESTS FOR AGRICULTURAL AND FORESTRY TRACTORS					
50001	Maximum permissable laden weight	Directives 74/151/EEC (Annex I) 82/890/EEC and 88/410/EEC	210	210
50011	Location and fitting of rear registration plate	Directives 74/151/EEC (Annex II) 82/890/EEC and 88/410/EEC		210	210
50021	Tank for liquid fuel	Directives 74/151/EEC (Annex III), 82/890/EEC and 88/410/EEC		210	210
50031	Ballast weights	Directives 74/151/EEC (Annex IV), 82/890/EEC and 88/410/EEC		210	210
50041	Audible warning devices	Directives 74/151/EEC (Annex V), 82/890/EEC and 88/410/EEC		330	210
50051 50052	Permissable sound level and maximum design speed	Directives 74/151/EEC (Annex VI), 82/890/EEC and 88/410/EEC or 74/152/EEC, 82/890/EEC and 88/412/EEC	Combined test Maximum speed test	440 360	360 360
50061	Load platform	Directives 74/152/EEC, 82/890/EEC and 88/412/EEC		210	210
50071	Rear view mirror	Directives 74/346/EEC and 82/890/EEC		210	210
50081 50082	Field of vision	Directives 74/347/EEC, 79/103/EEC and 82/890/EEC		1090 500	500 500
50091	Steering equipment	Directives 75/321/EEC, 82/890/EEC and 88/411/EEC		1850	870
50111	Braking device	Directives 76/432/EEC and 82/890/EEC		2210	1210
50121	Passenger seat	Directives 76/763/EEC and 82/890/EEC		210	210
50131 50132	Driver perceived noise level	Directives 77/311/EEC and 82/890/EEC	Annex I test Annex II test	2210 1240	1210 870
50141 50142 50143 50144	Roll over protection	Directives 77/536/EEC (Annex II) and 82/890/EEC or 79/622/EEC, 82/953/EEC, 87/534/EEC and 88/413/EEC or 86/298/EEC and 89/682/EEC or 87/402/EEC and 89/681/EEC	Dynamic test Static test Protective structure: “narrow track” rear mounted “narrow track” front mounted	2210 2210 2210 5380	870 1210 870 5030
50151	Emission of pollutants	Directive 77/537/EEC and 82/890/EEC		1320	870
50161	Driver’s seat	Directives 78/764/EEC, 82/890/EEC83/190/EEC, 87/354/EEC and 88/465/EEC		2210	870
50171	Lights and light signalling	78/933/EEC and 82/890/EEC	Installation	710	500
50172	Lights and light signalling	79/532/EEC and 82/890/EEC	Components	210	210
50181	Coupling devices	79/533/EEC (Annex I) and 82/890/EEC		210	210
50191	Reverse	79/533/EEC (Annex II) and 82/890/EEC		210	210
50201	Operating space, access to driving space etc	80/720/EEC, 82/890/EEC and 88/414/EEC		210	210
50211	Power take offs	86/297EEC (with the exception of item 5.2 of Annex I)		210	210
50221	Controls—installation, operation and identification	86/415/EEC		360	360
50231 50241	Dimensions and towable masses Speed governors and protection of drive components, projections and wheels	89/173/EEC (Annex I) 89/173/EEC (Annex II)		360 870	360 870
50251 50252 50253 50254 50255 50256 50257 50258	Windscreens	89/173/EEC (Annex III)	Toughened glass (I) Toughened glass (I/P) Ordinary laminated glass (II) Ordinary laminated glass (I/P) Treated laminated glass (III) Treated laminated glass (III/P) Glass plastic (IV) Universally heat treated glass	2020 2700 2550 3190 2640 3290 3040 1640	
50261 50262 50263 50271	Glass other than windscreens	89/173/EEC (Annex III)	Toughened glass Laminated glass Glass plastic Additional tests on double glazed units with approved glass	1100 1280 1950 340	
50281 50282	Coupling device	89/173/EEC (Annex IV)	Static test Dynamic test	3030 4200	1210 1970
50291 Statutory plates and inscriptions to the body of the tractor	89/173/EEC (Annex V)	210	210
50301	Brake control for towed vehicles	89/173/EEC (Annex VI)		210	210

SCHEDULE 2 FEES FOR THE FINAL EXAMINATION OF A COMPLETE VEHICLE TO WHICH THE GREAT BRITAIN REGULATIONS APPLY WITH A VIEW TO THE ISSUE OF CERTAIN DOCUMENTS
Regulation 7(1)
(1)	(2)	(3)
Description of Document	Fee number	Amount of fee for document (£)
Complete examination of a type of vehicle with view to the issue of a type approval certificate	60000	1420
Complete examination of a vehicle with a view to the issue of a Minister’s approval certificate under section 58(1) and (2)	60001	1420
Complete examination of a vehicle with a view to the issue of a Minister’s approval certificate under section 58(4) and (5)	60002	1380

SCHEDULE 3 FEES FOR THE FINAL EXAMINATION OF A COMPLETE VEHICLE TO WHICH THE GREAT BRITAIN REGULATIONS FOR GOODS VEHICLES APPLY WITH A VIEW TO THE ISSUE OF CERTAIN DOCUMENTS
Regulation 7(2) and (3)
(1)	(2)									
Description of examination	Amount of fee for examination Vehicle category									
	(a) L2, L5, N1		(b) N2		(c) N3					
					2 axle		3 axle		4 axle	
	Fee	Fee	Fee	Fee	Fee	Fee	Fee	Fee	Fee	Fee
	No	£	No	£	No	£	No	£	No	£
Complete examination of a type vehicle consisting of 50 or less variants with a view to the issue of a type approval certificate	60003	690	60004	1270	60005	1990	60006	2200	60007	2200
Complete examination of a type vehicle consisting of 50 variants with a view to the issue of a type approval certificate	60008	690	60009	1270	60010	2440	60011	2910	60012	2910
Complete examination of a vehicle with a view to the issue of a Minister’s approval certificate under section 58(1) and (2)	60013	690	60014	930	60015	1140	60016	1160	60017	1160
Complete examination of a vehicle with a view to the issue of a Minister’s approval certificate under section 58(4) and (5)	60018	670	60019	10	60020	1110	60021	1110	60022	1110

SCHEDULE 4 FEES FOR THE ISSUE OF DOCUMENTS IN RESPECT OF VEHICLE PARTS
Regulation 9(1)
(1)		(2)	(3)
Description of Document		Fee number	Amount of fee for document (£)
(A)	COMMUNITY INSTRUMENT OR ECE REGULATION ECE or EEC type approval certificate ECE or EEC type approval certificate modifying an ECE or EEC type approval certificate	80000 80001	30 64
(B)	NATIONAL TYPE APPROVAL SCHEME Type approval certificate Type approval certificate modifying a type approval certificate Minister’s approval certificate under section 58(1) and (2) Minister’s approval certificate modifying a Minister’s approval certificate	80002 80003 80004 80005	30 65 30 65
(C)	DUPLICATE Duplicate type approval, Minister’s approval, EEC or ECE type approval certificate or duplicate certificate of conformity	80006	40
NB Where both EEC and ECE certificates are issued concurrently in respect of the same vehicle part, the total fee for two certificates shall be one and a half times Nos 80000 or 80001 above as appropriate.			

SCHEDULE 5 FEES FOR THE ISSUE OF DOCUMENTS IN RESPECT OF VEHICLE PARTS
Regulation 9(2) and (3)

PART I VEHICLES TO WHICH THE GREAT BRITAIN REGULATIONS APPLY
(1)		(2)	(3)
Description of Document		Fee number	Amount of fee for document (£)
(A)	Type APPROVAL CERTIFICATES Type approval certificate in respect of a type vehicle or an updated type approval certificate in respect of a type vehicle Type approval certificate in respect of a type vehicle issued in replacement of one or more Minister’s approval certificates Duplicate type approval certificate	80010 80011 80012	440 65 40
(B)	MINISTER'S APPROVAL CERTIFICATES Minister’s approval certificate under section 58(1) and (2) when issued after a complete examination of a vehicle or an updated Minister’s approval certificate in respect of a vehicle Minister’s approval certificate under section 58(4) and (5) in respect of a vehicle Duplicate Minister’s approval certificate	80013 80014 80015	250 0.40 40
(C)	CERTIFICATES OF CONFORMITY Duplicate certificate of conformity	80016	40

PART II VEHICLES TO WHICH THE GREAT BRITAIN REGULATIONS APPLY
(1)		(2)	(3)
Description of Document		Fee number	Amount of fee for document (£)
(A)	Type APPROVAL CERTIFICATES Type approval certificate in respect of a type vehicle or an updated type approval certificate in respect of a type vehicle consisting of 50 or less variants Type approval certificate in respect of a type vehicle or an updated type approval certificate in respect of a type vehicle consisting of more than 50 variants Type approval certificate in respect of a type vehicle issued in replacement of one or more Minister’s approval certificates Further type approval certificate in respect of a vehicle issued under section 55(4) and (5) Duplicate type approval certificate	80030 80031 80032 80033 80034	160 190 65 65 40
(B)	MINISTER'S APPROVAL CERTIFICATES Minister’s approval certificate under section 58(1) and (2) when issued after a complete examination of a vehicle or an updated Minister’s approval certificate Minister’s approval certificate Minister’s approval certificate under section 58(1) and (2) when issued after a partial examination of a vehicle Minister’s approval certificate under section 58(4) and (5) in respect of a vehicle Duplicate Minister’s approval certificate	80035 80036 80037 80038	95 65 0.70 40
(C)	CERTIFICATE OF CONFORMITY Duplicate certificate of conformity	80039	40

SCHEDULE 6 DEFINITIONS OF EXPRESSIONS USED IN SCHEDULE 1
Regulation 4(6)
PART I

References to Community Instruments
1. (1) A reference in Schedule 1 to an expression shown in column 1 of Part II of this Schedule (all of which begin with the word “Directive”) shall be read as follows.
(2) If a single Council or Commission Directive is shown in column 2 of that Part against the expression, the reference shall be read as a reference to that Directive, details of which are shown in columns 3 and 4.
(3) If more than one Council or Commission Directive is shown in column 2 of that Part against the expression, the reference shall be read as a reference to the first Directive as amended by the other Directive or Directives so shown.
(4) “(CL)” after a Directive shown in column 2 indicates that the Directive is a Council Directive and “(CM)” after a Directive indicates that the Directive is a Commission Directive.
2. A reference in Schedule 1 to the expression shown in column 1 of Part III of this Schedule shall be read as a reference to the first Council Regulation shown in column 2, as amended by the other Council Regulations details of which are shown in columns 3 and 4.

References to ECE Regulations
3. (1) A reference in Schedule 1 to an EXE Regulation followed by a number which is not itself followed by a full stop and two digits (for example “EXE Regulation 8”) shall be read as a reference to the ECE Regulation of that Number.
(2) A reference in that Schedule to an ECE Regulation followed by a number which is itself followed by a full stop and two digits (for example “ECE Regulation 8.04”) shall be read as the ECE Regulation of that number with the amendments in force on the date shown against the number in column (2) of Part IV.

Other Expressions
4. In Schedule 1—
“G.B. Regs” is an abbreviation for the Great Britain Regulations as defined in regulation 3;
“G.B. Regs for Goods Vehicles” is an abbreviation for Great Britain for Goods Vehicles as defined in regulation 3.

PART II REFERENCES TO COUNCIL AND COMMUNITY INSTRUMENTS
(1)	(2)	(3)	(4)
Expression	Directives	Date	Official Journal Reference
70/157/EEC	{	see … 84/424/EEC	}
70/221/EEC	{	see … 81/333/EEC	}
70/222/EEC	70/222/EEC (CL)	20.3.1970	L76, 6.4.70, p.25.
70/311/EEC	70/311/EEC (CL)	8.6.1970	L133, 18.6.70, p.10.
70/387/EEC	70/387/EEC (CL)	27.7.1970	L176, 108.70, p.5.
70/388/EEC	70/388/EEC (CL)	27.7.1970	L176, 10.8.70, p.12.
71/127/EEC	{	see … 88/321/EEC	}
71/320/EEC	{	see … 88/194/EEC	}
72/245/EEC	72/245/EEC (CL)	20.6.1972	L152, 6.7.72, p.15.
72/306/EEC	72/306/EEC (CL)	2.8.1972	L190, 20.8.72, p.1.
73/350/EEC	{	see … 84/424/EEC	}
74/60/EEC	{	see … 78.632/EEC	}
74/61/EEC	74/61/EEC (CL)	17.12.1973	L38, 11.2.74, p.22.
74/132/EEC	{	see … 88/194/EEC	}
74/151/EEC	{	see … 88/410/EEC	}
74/152/EEC	{	see … 84/412/EEC	}
74/346/EEC	74/346/EEC (CL)	25.6.1974	L191, 15.7.74, p.1.
74/347/EEC	{	see … 79/1073/EEC	}
74/297/EEC	74/297/EEC (CL)	4.6.1974	L165, 20.6.74, p.16.
74/408/EEC	{	see … 81/577/EEC	}
74/483/EEC	{	see … 79/488/EEC	}
75/321/EEC	{	see … 88/411/EEC	}
75/443/EEC	75/443/EEC (CL)	26.6.1975	L196, 26.7.75, p.1.
75/524/EEC	{	see … 88/194/EEC	}
76/114/EEC	{	see … 78/507/EEC	}
76/115/EEC	{	see … 90/629/EEC	}
76/432/EEC	76/432/EEC (CL)	6.4.1976	L122, 8.5.76, p.1.
76/756/EEC	{	see … 89/278/EEC	}
76/757/EEC	76/757/EEC (CL)	27.7.1976	L262, 27.9.76, p.32.
76/758/EEC	{	see … 89/516/EEC	}
76/759/EEC	{	see … 89/277/EEC	}
76/760/EEC	76/760/EEC (CL)	27.7.1976	L262, 27.9.76, p.85.
76/761/EEC	{	see … 89/517/EEC	}
76/762/EEC	76/762/EEC (CL)	27.7.1976	L262, 27.9.76, p.122.
76/763/EEC	76/763/EEC	27.7.1976	L262, 27.9.76, p.135.
77/212/EEC	{	see … 84/424/EEC	}
77/311/EEC	77/311/EEC (CL)	29.3.1977	L105, 28.4.77, p.1.
77/389/EEC	77/389/EEC (CL)	17.5.1977	L154, 13.6.77, p.41.
77/536/EEC	77/536/EEC (CL)	28.6.1977	L220, 29.8.77, p.1.
77/537/EEC	77/537/EEC (CL)	28.6.1977	L220, 29.8.77, p.38.
77/538/EEC	{	see … 89/518/EEC	}
77/539/EEC	77/539/EEC (CL)	28.6.1977	L220, 29.8.77, p.72.
77/540/EEC	77/540/EEC (CL)	28.6.1977	L220, 29.8.77, p.83.
77/541/EEC	{	see … 90/628/EEC	}
77/649/EEC	{	see … 90/630/EEC	}
78/316/EEC	78/316/EEC (CL)	21.12.1977	L81, 28.3.78, p.3.
78/317/EEC	78/317/EEC (CL)	21.12.1977	L81, 28.3.78, p.27.
78/318/EEC	78/318/EEC (CL)	21.12.1977	L81, 28.3.78, p.49.
78/507/EEC	76/114/EEC (CL)	18.12.1975	L24, 30.1.76, p.1.
	78/507/EEC (CM)	19.5.1978	L155, 13.6.78, p.31.
78/548/EEC	78/548/EEC (CL)	12.6.1978	L168, 26.6.78, p.40.
78/549/EEC	78/549/EEC (CL)	12.6.1978	L168, 26.6.78, p.45.
78/632/EEC	74/60/EEC (CL)	17.12.1973	L38, 11.2.74, p.2.
	78/632/EEC (CM)	19.5.1978	L206, 29.7.78, p.26.
78/665/EEC	{	see … 91/441/EEC	}
78/764/EEC	{	see … 88/465/EEC	}
78/932/EEC	78/932/EEC (CL)	16.10.1978	L325, 20.11.78, p.1.
78/933/EEC	78/933/EEC (CL)	16.10.1978	L325, 20.11.78, p.16.
78/1015/EEC	{	see … 87/56/EEC	}
79/488/EEC	74/483/EEC (CL)	17.9.1974	L266, 2.10.74, p.4.
	79/488/EEC (CM)	18.4.1979	L128, 26.5.79, p.1.
79/489/EEC	{	see … 88/194/EEC	}
79/490/EEC	{	see … 81/333/EEC	}
79/532/EEC	79/532/EEC (CL)	17.5.1979	L145, 13.6.79, p.16.
79/533/EEC	79/533/EEC (CL)	17.5.1979	L145, 13.6.79, p.20.
79/622/EEC	{	see … 88/413/EEC	}
79/795/EEC	{	see … 88/321/EEC	}
79/1073/EEC	74/347/EEC (CL)	25.6.1974	L191, 15.7.74, p.1
	79/1073/EEC (CM)	22.11.1979	L331, 27.12.79, p.20.
80/233/EEC	{	see … 89/278/EEC	}
80/720/EEC	{	see … 88/414/EEC	}
80/780/EEC	80/780/EEC (CL)	22.7.1980	L229, 30.8.80, p.49.
80/1268/EEC	80/1268/EEC (CL)	16.12.1980	L375, 31.12.80, p.36.
80/1269/EEC	{	see … 88/195/EEC	}
81/333/EEC	70/221/EEC (CL)	20.3.1970	L76, 6.4.70, p.23.
	79/490/EEC (CM)	18.4.1979	L128, 26.5.79, p.22.
	81/333/EEC (CM)	13.4.1981	L131, 18.5.81, p.4.
81/334/EEC	{	see … 84/424/EEC	}
81/575/EEC	{	see … 90/629/EEC	}
81/576/EEC	{	see … 90/628/EEC	}
81/577/EEC	74/408/EEC (CL)	22.7.1974	L221, 12.8.74, p.1.
	81/557/EEC (CL)	20.7.1981	L209, 29.7.81, p.34.
81/643/EEC	{	see … 90/630/EEC	}
82/244/EEC	{	see … 89/278/EEC	}
82/318/EEC	{	see … 90/629/EEC	}
82/319/EEC	{	see … 90/628/EEC	}
82/890/EEC	82/890/EEC (CL)	17.12.1982	L378, 31.12.82, p.45.
82/953/EEC	{	see … 88/413/EEC	}
83/190/EEC	{	see … 88/465/EEC	}
83/276/EEC	{	see … 89/278/EEC	}
83/351/EEC	{	see … 91/441/EEC	}
84/8/EEC	{	see … 89/278/EEC	}
84/372/EEC	{	see … 84/424/EEC	}
84/424/EEC	70/157/EEC (CL)	6.2.1970	L42, 23.2.70, p.16.
	73/350/EEC (CM)	7.11.1973	L321, 22.11.73, p.33.
	77/212/EEC (CL)	8.3.1977	L66, 12.3.77, p.33.
	81/334/EEC (CM)	13.4.1981	L131, 18.5.81, p.6.
	84/372/EEC (CM)	3.7.1984	L196, 26.7.84, p.47.
	84/424/EEC (CL)	3.9.1984	L238, 6.9.84, p.31.
82/205/EEC	{	see … 88/321/EEC	}
85/647/EEC	{	see … 88/194/EEC	}
86/297/EEC	86/297/EEC (CL)	26.5.1986	L186, 8.7.86, p.19.
86/298/EEC	{	see … 89/682/EEC	}
86/415/EEC	86/415/EEC (CL)	24.7.1986	L240, 26.8.86, p.1.
86/562/EEC	{	see … 88/321/EEC	}
87/56/EEC	78/1015/EEC (CL)	23.11.1978	L349, 13.12.78, p.21.
	87/56/EEC (CL)	18.12.1987	L24, 27.1.87, p.42.
87/354/EEC	{	see … 88/465/EEC	}
87/402/EEC	{	see … 89/681/EEC	}
88/76/EEC	{	see … 91/441/EEC	}
88/77/EEC	{	see … 91/542/EEC	}
88/194/EEC	71/320/EEC (CL)	26.7.1971	L202, 6.9.71, p.37
	74/132/EEC (CM)	11.2.1974	L74, 19.3.74, p.7.
	75/524/EEC (CM)	25.7.1975	L236, 8.9.75, p.3.
	79/489/EEC (CM)	18.4.1979	L128, 26.5.79, p.12.
	85/647/EEC (CM)	23.12.1985	L380, 31.12.85, p.1.
	88/194/EEC (CM)	24.3.1988	L92, 9.4.88, p.47.
88/195/EEC	80/1269/EEC (CL)	16.12.1980	L375, 31.12.88, p.46.
	88/195/EEC (CL)	24.3.1988	L92, 9.4.88, p.50.
88/321/EEC	71/127/EEC (CL)	1.3.1971	L68, 22.3.71, p.1.
	79/795/EEC (CM)	20.7.1979	L239, 22.9.79, p.1.
	85/205/EEC (CM)	18.2.1985	L90, 29.3.85, p.1.
	86/562/EEC (CM)	6.11.1986	L327, 22.11.86, p.49
	88/321/EEC (CM)	16.5.1988	L147, 14.6.88, p.77.
88/366/EEC	{	see … 90/630/EEC	}
88/410/EEC	74/151/EEC (CL)	4.3.1974	L84, 28.3.74, p.25.
	88/410/EEC (CM)	21.6.1988	L200, 26.7.88, p.27.
88/411/EEC	75/321/EEC (CL)	20.5.1975	L147, 9.6.75, p.24.
	88/411/EEC (CM)	21.6.1988	L200, 26.7.88, p.30.
88/412/EEC	74/152/EEC (CL)	4.3.1974	L84, 28.3.74, p.33.
	88/412/EEC (CM)	22.6.1988	L200, 26.7.88, p.31.
88/413/EEC	79/622/EEC (CL)	25.6.1979	L179, 17.7.79, p.1.
	82/953/EEC (CM)	15.12.1982	L386, 31.12.82, p.31.
	88/413/EEC (CM)	22.6.1988	L200, 26.7.88, p.32
88/414/EEC	80/720/EEC (CL)	24.6.1980	L194, 28.7.80, p.1.
	88/414/EEC (CM)	22.6.1988	L200, 26.7.88, p.34.
88/436/EEC	{	see … 91/441/EEC	}
88/465/EEC	78/764/EEC (CL)	25.7.1978	L255, 18.9.78, p.1.
	83/190/EEC (CM)	28.3.1983	L109, 26.4.83, p.13.
	87/354/EEC (CL)	25.6.1987	L192, 11.7.87, p.43.
	88/465/EEC (CM)	30.6.1988	L228, 17.8.88, p.31.
89/173/EEC	89/173/EEC (CL)	21.12.1989	L67, 10.3.89, p.1.
89/235/EEC	78/1015/EEC (CL)	23.11.1978	L349 13.12.78, p.21.
	87/56/EEC (CL)	18.12.1987	L24, 27.1.87, p.42
	89/235/EEC (CL)	13.3.1989	L98, 11.4.89, p.1.
89/277/EEC	76/759/EEC (CL)	27.7.1976	L262, 27.9.76, p.71.
	89/277/EEC (CM)	28.3.1989	L109, 27.4.89, p.25.
89/278/EEC	76/756/EEC (CL)	27.7.1976	L262, 27.9.76, p.1.
	80/233/EEC (CM)	21.11.1979	L51, 25.2.80, p.8.
	82/244/EEC (CM)	17.3.1982	L109, 22.4.82, p.31
	83/276/EEC (CL)	26.5.1983	L151, 9.6.83, p.47.
	84/8/EEC (CM)	14.12.1983	L9, 12.1.84, p.24.
	89/278/EEC (CM)	28.3.1989	L109, 20.4.89, p.38.
89/297/EEC	89/297/EEC (CL)	13.4.1989	L124, 5.5.89, p.1.
89/458/EEC	{	see … 91/441/EEC	}
89/491/EEC	89/491/EEC (CM)	17.8.1989	L238, 15.8.89, p.43.
89/516/EEC	76/758/EEC(CL)	27.7.1976	L262, 27.9.76, p.54.
	89/516/EEC (CM)	1.8.1989	L265, 12.9.89, p.1.
89/517/EEC	76/761/EEC (CL)	27.7.1976	L262, 27.9.76, p.96.
	89/517/EEC (CM)	1.8.1989	L265, 12.9.89, p.15.
89/518/EEC	77/538/EEC (CL)	28.6.1977	L220, 29.8.77, p.60.
	89/518/EEC (CM)	1.8.1989	L265, 12.9.89, p.24.
89/681/EEC	87/402/EEC (CL)	25.6.1987	L220, 8.8.87, p.1.
	89/681/EEC (CL)	21.12.1989	L398, 30.12.89, p.27.
89/682/EEC	86/298/EEC (CL)	26.5.1986	L186, 8.7.86, p.26.
	89/682/EEC (CL)	21.12.1989	L398, 30.12.89, p.29.
90/628/EEC	77/541/EEC (CL)	28.6.1977	L220, 29.8.77, p.95.
	81/576/EEC (CL)	20.7.1981	L209, 29.7.81, p.32.
	82/319/EEC (CM)	2.4.1982	L139, 19.5.82, p.17.
	90/628/EEC (CM)	30.10.1990	L341, 6.12.90, p.1.
90/629/EEC	76/115/EEC (CL)	18.12.1975	L24, 30.1.76, p.6.
	81/575/EEC (CL)	20.7.1981	L209, 29.7.81, p.30.
	82/318/EEC (CM)	2.4.1982	L139, 19.5.82, p.9.
	90/629/EEC (CM)	30.10.1990	L341, 6.12.90, p.14.
90/630/EEC	77/649/EEC (CL)	27.9.1977	L267, 19.10.77, p.1.
	81/643/EEC (CM)	29.7.1981	L231, 15.8.81, p.41.
	88/366/EEC (CM)	17.5.1988	L181, 12.7.88, p.40.
	90/630/EEC (CM)	30.10.1990	L341, 6.12.90, p.20
91/441/EEC	70/220/EEC (CL)	20.3.1970	L76, 6.4.70, p.1.
	74/290/EEC (CL)	28.5.1974	L159, 15.6.74 p.61.
	77/120/EEC (CM)	30.11.1976	L32, 3.2.77, p.32.
	78/665/EEC (CM)	14.7.1978	L223, 14.8.78, p.48.
	83/351/EEC (CL)	16.6.1983	L197, 20.7.83, p.1.
	88/76/EEC (CL)	3.12.1987	L36, 9.2.88, p.1.
	88/436/EEC (CL)	16.6.1988	L214, 6.8.88, p.1.
	89/458/EEC (CL)	18.8.1989	L226, 3.8.89, p.1.
	91/441/EEC (CL)	26.6.1991	L242, 30.8.91, p.1.
91/542/EEC	88/77/EEC (CL)	3.12.1987	L36, 9.2.88, p.33.
	91/542/EEC (CL)	1.10.1991	L295, 25.10.91, p.1.

PART III REFERENCES TO COMMUNITY INSTRUMENTS
(1)	(2)	(3)	(4)
Expression	Council Regulations	Date	Official Journal Reference
Community Regulation 3821/185	1463/70	20.7.1970	L164, 27.7.70, p.1.
	1787/73	25.6.1973	L181, 4.7.73, p.1.
	2828/77	12.12.1977	L334, 24.12.77, p.5.
	3821/85	20.12.1985	L370, 31.12.85, p.8.

PART IV REFERENCES TO ECE REGULATIONS
(1)	(2)
ECE Regulation and Amending Series	Date
1	24 Mar 60
1.01	28 Apr 86
2	24 Mar 60
2.02	27 Nov 78
2.03	28 Apr 86
3	1 Nov 63
3.01	18 Aug 82
3.02	11 Jul 85
4	23 Sep 64
4.01	29 Oct 75
5	22 May 67
5.01	2 Mar 83
5.02	2 Jun 89
6	22 May 67
6.01	7 Oct 87
7	22 May 67
7.01	18 Sep 85
8	12 Jun 67
8.01	28 May 71
8.02	23 Apr 75
8.03	21 Jun 78
8.04	23 Jun 86
10	17 Dec 68
10.01	23 Jun 78
11	8 Jan 69
11.01	29 Oct 75
11.02	7 May 81
12	14 Apr 69
12.01	3 Nov 75
12.02	23 Mar 83
13	29 May 69
13.01	5 Dec 73
13.02	5 Dec 73
13.03	5 Feb 79
13.04	24 Aug 81
13.05	15 Feb 85
14	30 Jan 70
14.01	19 Aug 76
14.02	25 Feb 85
15	11 Mar 70
15.01	11 Mar 70
15.02	8 Mar 77
15.03	20 Feb 78
15.04	31 Dec 85
16	14 Aug 70
16.01	7 May 73
16.02	7 May 73
16.03	25 Jan 80
16.04	31 Dec 85
17	14 Aug 70
17.01	2 Jan 76
17.02	7 Apr 81
17.03	12 May 86
17.04	20 Mar 90
18	14 Sep 70
18.01	8 Dec 80
19	14 Sep 70
19.01	22 Aug 74
19.02	15 Sep 88
20	1 Mar 71
20.01	1 Sept 76
20.02	14 Aug 86
21	2 Jun 71
21.01	24 Oct 80
23	20 Aug 71
23.01	11 Mar 77
24	23 Aug 71
24.01	12 Mar 74
24.02	28 May 80
24.03	25 Apr 86
25	30 Dec 71
25.01	30 Jul 81
25.02	2 Jun 86
25.03	26 Apr 90
26	28 Apr 72
26.01	12 Mar 74
27	7 Jun 72
27.01	12 Mar 74
27.02	20 Jun 77
27.03	30 Apr 85
30	1 Apr 75
30.01	10 Oct 77
30.02	21 Apr 81
31	2 Jun 75
31.01	18 Apr 83
31.02	17 May 89
32	14 Jul 75
33	25 Jul 75
34	25 Jul 75
34.01	29 Jan 79
35	18 Sep 75
36	12 Nov 75
36.01	19 Apr 82
36.02	3 Sept 86
37	4 Oct 77
37.01	27 Apr 82
37.02	20 Jun 84
37.03	20 Jun 84
38	7 Jul 78
39	11 Jul 78
43	24 Oct 80
44	22 Jan 81
44.01	16 Nov 82
44.02	18 Apr 86
45	15 May 81
45.01	16 May 88
46	29 Sep 81
48	23 Nov 81
49	10 May 83
49.01	5 Oct 90
50	11 Jan 83
54	13 Jun 83
55	6 Jul 83
56	31 May 83
57	31 May 83
57.01	24 Apr 89
62	23 Oct 84
64	1 Aug 85
65	4 Sep 86
66	30 Jan 87
69	27 Jul 87
70	27 Jul 87
72	19 May 88
75	19 May 88
76	20 May 88
77	6 Oct 88
80	25 May 89
83	5 Nov 89
84	23 Aug 91
85	9 Sep 91

(This note is not part of the Regulations)
1. These Regulations re-enact with modifications the provisions of the Motor Vehicles (Type Approval and Approval Marks) (Fees) Regulations 1991 and enact provisions which replace the Agricultural and Forestry Tractors and Tractor Components (Type Approval) (Fees) (Amendment) Regulations 1992.
2. The Regulations prescribe the fees payable for the examination of vehicles and vehicle parts, the examination of complete vehicles and the issue of documents in connection with—
(1) the type approval of vehicles and vehicle parts and the authorisation of the application of approval marks to vehicles and vehicle parts for the purposes of Community Instruments or ECE Regulations; and
(2) the national scheme for the type approval of vehicles and vehicle parts established under sections 54 to 66 of the Road Traffic Act 1988, the Motor Vehicles (Type Approval) (Great Britain) Regulations 1984 (S.I. 1984/981) and the Motor Vehicles (Type Approval for Goods Vehicles) (Great Britain) Regulations 1982 (S.I.1982/1271).
3. In addition to minor drafting changes, the Regulations make the following changes of substance.
4. The principal changes relate to the fee amounts and to the inclusion in Schedule 1 of items relating to the type approval testing of agricultural or forestry tractor components. The overall change to the fees contained in these Regulations is an increase of approximately 13%, but this is applied in different ways with the result that some fees are increased, some are reduced and some remain in same.
5. In addition to changes to fee amounts, the introduction of new or amended ECE Regulations and new Community Instruments means that—
(1) certain new fees relating to headlamps, strength of seats and anchorages for public service vehicles, and mechanical couplings have been added to Schedule 1; and
(2) reference to those, as alternatives to existing ECE Regulations or Community Instruments—in relation to seat belts, seat belt anchorages, seat belt installation, rear view mirrors, engine power, fuel consumption, steering, forward field of vision, seats and anchorages and head restraints—appear for the first time.
6. Copies of the ECE Regulations and Community Instruments referred to in these Regulations may be obtained from Her Majesty’s Stationery Office.