SCHEDULE 8 APPROVAL OF ESTABLISHMENTS USED FOR THE MANUFACTURE OFEGG PRODUCTS

PART I GENERAL CONDITIONS FOR ESTABLISHMENTS
18 The establishment shall possess a separate room for the storage of cleaning and disinfection products.