SCHEDULE 5

PART I SAMPLING OF SEED LOTS

14 Methods of use
The methods of using these instruments shall be as follows:—
(a) Riffle Divider
(a) The divider shall be placed on a firm level surface.
(b) The divider and pans shall be clean.