PART VI ADMINISTRATION, PENALTIES AND ENFORCEMENT

18 Duties of occupier
1 The occupier of any licensed premises shall—
(a) keep, and retain for a period of at least one year from its date, a record adequate to show the number of birds, rabbits, or both, as appropriate, identified by species, received into, and the amounts of fresh meat despatched from, the premises during each week;
(b) take all practicable steps to secure compliance by any person employed by him or by any person invited on to the premises with the provisions of these Regulations;
(c) ensure that the official veterinary surgeon, inspector or veterinary officer is provided with adequate facilities to enable him to carry out his duties under these Regulations and that he is given such reasonable assistance and access to the premises and records as he may from time to time require for such purposes;
(d) take all necessary measures to ensure that, at all stages of production, the requirements of these Regulations are complied with and carry out checks (including any microbiological checks the Minister may require) on the general hygiene of conditions of production in his establishment to ensure that all equipment, machinery, instruments, fittings and facilities and, if necessary, fresh meat, comply with the requirements of these Regulations;
(e) take all necessary measures to ensure—
(i) that a record in permanent form, which shall be made available to the official veterinary surgeon or inspector upon request, is kept in respect of the matters specified in sub-paragraph (d) above for a period of at least two years from the date of such record;
(ii) the proper application of the health mark, as provided for in regulation 12(3), including the use of any labels or wrapping on which the health mark is printed;
(iii) that the official veterinary surgeon or inspector and the Minister are notified immediately when any information at the occupier’s disposal reveals a serious health risk; and
(iv) in the event of a serious health risk, the withdrawal of fresh meat which has been obtained under or stored in similar conditions (as the case may be) and is likely to present the same risk.
2 The occupier of licensed premises shall in consultation with the official veterinary surgeon arrange or establish a staff training programme to train staff to comply with hygiene requirements appropriate to their operations on those premises.
3 Where the occupier of any licensed premises has informed the food authority that a specified number of plant inspection assistants are or will be made available at those premises, he shall ensure that such plant inspection assistants—
(a) are present at the times as notified to him by the official veterinary surgeon appointed in respect of those premises, and
(b) carry out the function specified in paragraph 1 of Part I of Schedule 9, as directed by such official veterinary surgeon.
4 The occupier shall comply with any notice given under regulation 10(1).