SCHEDULE 8 HYGIENE REQUIREMENTS FOR SLAUGHTER AND THE HANDLING OF FRESH MEAT
9 After inspection and evisceration, fresh meat shall immediately be cleaned and chilled hygienically to ensure compliance with the temperature laid down in Schedule 12 as soon as possible.