SCHEDULE 3

PART II Particulars of the Barriers and Other Protective Equipment when the Road is Open to the Public
29. A telephone mounted in a cabinet and connected to the Norchard Control Office shall be provided on or adjacent to the right hand side traffic light signal post on each side of the railway. A traffic sign of the size, colour and type shown in Diagram 854 in the Regulations shall be provided on the door and at least two of the other faces of the cabinet. Suitable illuminated notices giving instructions to users shall be provided and maintained in each cabinet.