SCHEDULE 3 WORK OTHER THAN WORK TO WHICH SCHEDULES 1 AND 2 APPLY

4 Regularisation fee
The amount of the regularisation fee for any work shall be 120 per cent. of the building notice fee which would by virtue of paragraph 1 be payable in respect of that work.

TABLE CALCULATION OF FEES
Where the estimated cost is £2,000 or less
the sum of…	£60.00
Where the estimated cost exceeds £2,000 but does not exceed £5,000
the sum of…	£150.00
Where the estimated cost exceeds £5,000 but does not exceed £20,000
(a) the sum of…	£150.00
together with
(b) for every £1,000 (or part thereof) by which the cost exceeds £5,000, the sum of…	£10.00
Where the estimated cost exceeds £20,000 but does not exceed £100,000
(a) the sum of…	£300.00
together with
(b) for every £1,000 (or part thereof) by which the cost exceeds £20,000, the sum	£8.00
Where the estimated cost exceeds £100,000 but does not exceed £1,000,000
(a) the sum of…	£940.00
together with
(b) for every £1,000 (or part thereof) by which the cost exceeds £100,000, the sum of…	£5.00
Where the estimated cost exceeds £1,000,000 but does not exceed £10,000,000
(a) the sum of…	£5,440.00
together with
(b) for every £1,000 (or part thereof) by which the cost exceeds £1,000,000, the sum of…	£3.50
Where the estimated cost exceeds £10,000,000
(a) the sum of…	£36,940.00
together with
(b) for every £1,000 (or part thereof) by which the cost exceeds £10,000,000, the sum of…	£3.00