SCHEDULE 3 CLASSIFICATION PROVISIONS FOR PREPARATIONS DANGEROUS FOR SUPPLY

PART II CONCENTRATION LIMITS TO BE USED IN APPLYING THE CONVENTIONAL METHOD OF ASSESSING HEALTH EFFECTS IN ACCORDANCE WITH PART I OF THIS SCHEDULE WHERE NO SUCH LIMITS ARE GIVEN IN THE APPROVED SUPPLY LIST

4 Corrosive and irritant effects including serious damage to eye