1994 No. 449
INSURANCE
The Auditors (Insurance Companies Act 1982) Regulations 1994
Made 22nd February 1994
Coming into force 1st July 1994

Whereas it appears to the Secretary of State that auditors to whom section 21A(1) of the Insurance Companies Act 1982 and the following Regulations apply are not subject to satisfactory rules made or guidance issued by a professional body specifying circumstances in which matters are to be communicated to the Secretary of State as mentioned in that subsection,
1982 c. 50; section 21A was introduced by section 135(1) of the Financial Services Act 1986 (c. 60).
Whereas a draft of these regulations has been approved by a resolution of each House of Parliament pursuant to section 21A(4) of that Act;
The Secretary of State, in exercise of the powers conferred on him by section 21A(2) and (3) of the Insurance Companies Act 1982 and of all other powers enabling him in that behalf, hereby makes the following Regulations:—

1 Citation and commencement
These Regulations may be cited as the Auditors (Insurance Companies Act 1982) Regulations 1994 and shall come into force on 1st July 1994.

2 Interpretation
In these Regulations—
“the Act” means the Insurance Companies Act 1982;
“auditor” means auditor of an insurance company to which Part II of the Act applies;
“matters” means any matters which an auditor has become aware of in his capacity as auditor of an insurance company to which Part II of the Act applies and which are relevant to any functions of the Secretary of State under the Act.

3 Duty of auditors to report to the Secretary of State
1 Matters are to be communicated to the Secretary of State by an auditor in the circumstances specified in paragraph (2) below.
2 The circumstances referred to in paragraph (1) above are circumstances in which the matters are such as to give an auditor reasonable cause to believe that they are or may be of material significance for determining whether any of the powers of intervention conferred on the Secretary of State by sections 38 to 45 of the Act should be exercised.
Neil Hamilton Parliamentary Under-Secretary of State for Corporate Affairs, Department of Trade and Industry 22nd February 1994

(This note is not part of the Regulations)
These Regulations impose a duty on an auditor of an insurance company to which Part II of the Insurance Companies Act 1982 (“the Act”) applies to report to the Secretary of State any matters which are relevant to any of the functions of the Secretary of State under the Act of which he becomes aware in his capacity as auditor of that company if those matters are or may be of material significance to the Secretary of State in deciding whether to use any of his powers of intervention under sections 38 to 45 of the Act.