1995 No. 1629
CONSUMER PROTECTION
The Gas Appliances (Safety) Regulations 1995 (revoked)
Regulations revoked (21.4.2018) by The Gas Appliances (Enforcement) and Miscellaneous Amendments Regulations 2018 (S.I. 2018/389), regs. 1(1), 2(5) (with reg. 2(4)(4A) (as amended (31.12.2020) by S.I. 2019/696, Sch. 36 para. 1(3); 2020 c. 1, Sch. 5 para. 1(1)))
Made 23rd June 1995
Laid before Parliament 27th June 1995
Coming into force
(except regulation 1(3)) 18th July 1995
regulation 1(3) 1st January 1996

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Preliminary

1 Citation, commencement, revocation and consequential amendment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2 Interpretation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3 Essential requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4 Application of Regulations
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5 Appointment and functions of notified bodies
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6 Fees
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (21.4.2018) by The Gas Appliances (Enforcement) and Miscellaneous Amendments Regulations 2018 (S.I. 2018/389), regs. 1(1), 2(5) (with reg. 2)

Supply of gas appliances and fittings

7 Appliances and fittings to satisfy the essential requirements and to be safe
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

8 Obligation on suppliers of appliances and fittings
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

9 Application of regulations 7 and 8
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Certification and attestation

10 EC type-examination
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11 Application to be made to a single notified body
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

12 Refusal of EC type-examination certificate
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

13 Withdrawal of EC type-examination certificate
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

14 Quality system approval
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

15 Withdrawal of quality system approval
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

16 EC declaration of conformity (guarantee of product or production quality)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

17 EC declaration of conformity (EC verification)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

18 EC declaration of conformity (EC unit verification)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

19 EC verification (individual appliances and fittings)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

20 EC verification by batch (statistical method)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

21 EC unit verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

22 Refusal to issue certificate of conformity
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

23 EC declaration of conformity to type (type-examination)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

24 Surveillance by notified bodies
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Affixing of ce marking etc

25 CE Marking to be affixed to appliances and fitting certificate to be supplied with fittings
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

26 Conformity with other Directives
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Enforcement

27 Compliance notices
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

28 Duties of enforcement authorities
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

29 Offences relating to domestic animals and to property
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

30 Proceedings
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

General

31 Requirement to give information about appliance which does not bear the CE Marking
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

32 Regulations to be treated as safety regulations within the meaning of the 1987 Act
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 1 ANNEX IV OF COUNCIL DIRECTIVE OF 29TH JUNE 1990 ON THE APPROXIMATION OF THE LAWS OF MEMBER STATES RELATING TO APPLIANCES BURNING GASEOUS FUELS
Regulation 2(1)

DESIGN DOCUMENTATION
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 2 SPECIMEN FORM OF CE MARKING TO BE PLACED ON OR TO ACCOMPANY APPLIANCES
Regulation 2(1)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 3 ANNEX 1 OF COUNCIL DIRECTIVE OF 29TH JUNE 1990 ON THE APPROXI MATION OF THE LAWS OF MEMBER STATES RELATING TO APPLIANCES BURNING GASEOUS FUELS
Regulation 2(1)

ESSENTIAL REQUIREMENTS

Preliminary remark
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 4 SPECIMEN FORM OF COMPLIANCE NOTICE
Regulation 27
1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .