APPLICATIONS FOR PATENTS

23 Late filed drawings
The period prescribed for the purposes of section 15(2) and (3) shall be one month calculated from the date on which the comptroller sends out notification to the applicant that the drawing has been filed later than the date which is, by virtue of section 15(1), to be treated as the date of filing the application or, as the case may be, that it has not been filed.