3 Amendment of the scheme
In paragraph 5 of the scheme (membership of controlling body), after sub-paragraph (2) there shall be inserted—

“3 Each member of the controlling body shall have one vote.
4 The appointment of a member of the controlling body of the Board by the Secretary of State under sub-paragraph (1) shall terminate 28 days after the date of the first general meeting of the Board.”

.