SCHEDULE 8 FEES FOR APPLICATIONS FOR APPROVAL OR REASSESSMENT OF APPROVAL OF DOSIMETRY SERVICES AND FOR TYPE APPROVAL OF RADIATION GENERATORS OR APPARATUS CONTAINING RADIOACTIVE SUBSTANCES UNDER THE IONISING RADIATIONS REGULATIONS 1985
Regulation 9
1	2	3
Description	Fee	Fee for work by Nuclear or Specialist Inspector
Approval or reassessment of approval of Dosimetry Services granted under regulation 15 of the Ionising Radiations Regulations 1985		
Group 1		
Dose record keeping		
(a) Where the application is solely in respect of Group 1 functions	£59.40£38.15 per hour worked
(b) Where the application for Group 1 functions is linked to an application in respect of functions in another group		£38.15 per hour worked
Group II		
External dosimetry	£59.40	£38.15 per hour worked
(a) Whole body (beta,, gamma, thermal neutrons) film		
(b) Whole body (beta, gamma, thermal neutrons)thermoluminescent dosimeter (TLD)		
(c) Whole body (neutron), other than sub-groups (a) or (b)		
(d) Whole body, other than sub-groups (a), (b) or (c)		
(e) Extremity monitoring		
(f) Accident dosimetry, other than in the previous sub-groups		
Group III		
Internal Dosimetry		
(a) Bio-assay, in-vivo monitoring or air sampling	£59.40	£38.15 per hour worked
(b) for each additional one of the above techniques		£38.15 per hour worked
Type approval of a radiation generator or an apparatus containing a radioactive substance under sub-paragraph (f) or (g)respectively of Schedule 3 to the Ionising Radiations Regulations 1985 (which excepts such type approved radiation generators or apparatus containing radioactive substances from the notification requirements of regulation 5 of those Regulations)	£95	