(This note is not part of the Regulations)
These Regulations further amend the National Health Service (Dental Charges) Regulations 1989 to increase the prescribed maximum charge payable by the patient for dental treatment and appliances from £275 to £300, where the contract or arrangement leading to the provision of such treatment or appliances is made on or after 1st April 1995.