2 Dissolution of NHS trust
The Fosse Health, Leicestershire Community National Health Service Trust established by the Fosse Health, Leicestershire Community National Health Service Trust (Establishment) Order 1992 is hereby dissolved, and accordingly that Order is hereby revoked.
S.I.1992/2484.