2 Section 2(1) of the Supreme Court Act 1981, prescribing the maximum number of ordinary judges of the Court of Appeal, shall be amended so as further to increase the maximum number to 35.
Section 2(1) was amended by S.I.1983/1705, 1987/2059, 1993/605 and 1994/3217.