PART I PRELIMINARY

1 Citation, commencement, extent and revocation
1 These Regulations, which extend to Great Britain, may be cited as the Equipment and Protective Systems Intended for Use in Potentially Explosive Atmospheres Regulations 1996 and shall come into force on 1st March 1996.
2 The Regulations specified in the first column of Schedule 1 hereto are hereby revoked with effect from the date specified in the second column of that Schedule.