2 Amendment of the Social Security (Incapacity for Work) (General) Regulations 1995
In regulation 17 of the Social Security (Incapacity for Work) (General) Regulations 1995, in sub-paragraph (a) of paragraph (2), for “£44” there is substituted “£45.50”.
S.I.1995/311. The relevant amending instrument is S.I.1995/987.