SCHEDULE 4 ENERGY EFFICIENCY CLASSIFICATION
Regulations 4(2) 5(2) and 12(a)
The energy efficiency class of an appliance shall be determined in accordance with the following tables.

TABLE 1— AIR VENTED DRIERS
Energy Efficiency Class	Energy Consumption 'C' in kWh per kg using test procedures of the harmonised standards referred to in regulation 2 with 'dry cotton cycle'.
A	C≤0.51
B	0.51<C≤0.59
C	0.59<C≤0.67
D	0.67<C≤0.75
E	0.75<C≤0.83
F	0.83<C≤0.91
G	C>0.91

TABLE 2— CONDENSING DRIERS
Energy Efficiency Class	Energy Consumption 'C' in kWh per kg using test procedures of the harmonised standards referred to in regulation 2 with 'dry cotton cycle'.
A	C≤0.55
B	0.55<C≤0.64
C	0.64<C≤0.73
D	0.73<C≤0.82
E	0.82<C≤0.91
F	0.91<C≤1.00
G	C>1.00