PART VIII BOILERS AND MACHINERY

76 Communication between navigating bridge and machinery space
1 Subject to paragraph (2) every ship shall be provided with two independent means for communicating orders from the navigating bridge to the position in the machinery space or machinery control room from which the main engines are normally controlled. One of the means shall be an engine room telegraph which provides visual indication of the orders and responses both in the machinery space and on the navigating bridge. Means of communication shall also be provided to any other position from which the main propulsion machinery may be controlled.
2 On ships constructed on or after 1st October 1994 at least two independent means shall be provided for communicating orders from the navigation bridge to the position in the machinery space or in the control room from which the speed and direction of thrust of the propellers are normally controlled; one of these shall be an engine room telegraph which provides visual indication of the orders and responses both in the machinery spaces and on the navigation bridge. Appropriate means of communication shall be provided from the navigation bridge and the engine room to another position from which the speed or direction of thrust of the propellers may be controlled.
Reg. 76 in force at 12.11.1998, see reg. 1(1)