PART VIII BOILERS AND MACHINERY

78 Spare gear
Every ship shall be provided with sufficient spare gear relating to the boilers and machinery referred to in this Part having regard to the intended service of the ship.
Reg. 78 in force at 12.11.1998, see reg. 1(1)