THE SCHEDULE AMENDMENTS TO THE CONTROL OF ASBESTOS AT WORK REGULATIONS 1987
8 In paragraph (2) of regulation 8, for the words “to a concentration which is below those control limits” substitute “(after taking into account the effect of that respiratory protective equipment) to a concentration which is as low as is reasonably practicable and in any event below those control limits”.