1999 No. 1515
CLEAN AIR
The Smoke Control Areas (Exempted Fireplaces) Order 1999
Made 28th May 1999
Laid before Parliament 7th June 1999
Coming into force 28th June 1999

The Secretary of State for the Environment, Transport and the Regions, in exercise of the powers conferred upon him by section 21 of the Clean Air Act 1993 and of all other powers enabling him in that behalf, being satisfied that the classes of fireplace exempted by this Order can be used for burning fuel other than authorised fuels without producing any smoke or a substantial quantity of smoke, hereby makes the following Order:–
1993 c. 11.

1 Citation, commencement and extent
1 This Order may be cited as the Smoke Control Areas (Exempted Fireplaces) Order 1999 and shall come into force on 28th June 1999.
2 This Order applies to England and Wales only.

2 Classes of fireplace exempted from section 20 of the Clean Air Act 1993
The classes of fireplace described in the Schedule shall, upon the conditions there specified, be exempted from the provisions of section 20 of the Clean Air Act 1993 (which prohibits smoke emissions in smoke control areas).

3 Amendment of earlier Order
In the Schedule to the Smoke Control Areas (Exempted Fireplaces) Order 1996, in the entry relating to the Dovre woodstove fireplaces, for the description “The Dovre woodstove models 500G and 700G manufactured by Dovre Castings Limited” there shall be substituted “The Dovre woodstove models 500CBW and 700CBW manufactured by Dovre Castings Limited, including those models when referred to by their former reference numbers, 500G and 700G respectively.”
S.I.1996/1108.
Signed by authority of the Secretary of State for the Environment, Transport and the Regions
Michael Meacher Minister of State, Department of the Environment, Transport and the Regions 28th May 1999
SCHEDULE
Class of fireplace	Conditions
The Dunsley Yorkshire Stove manufactured by Dunsley Heat Limited.	1 The fireplaces shall be installed, maintained and operated in accordance with the manufacturer’s instructions dated 5th August 1998 and bearing the reference “A/22160”. 2 No fuel shall be used other than– (a) untreated dry wood; (b) peat or peat briquettes with, in either case, less than 25 per cent moisture; (c) Union Coal Briketts, manufactured by Rheinbraun AG of Germany and comprising lignite compressed into briquettes of approximately 15 centimetres in length with square ends and with a sulphur content not exceeding 1 per cent of the total weight; (d) CPL Wildfire, manufactured by Coal Products Limited, Coventry, which comprise bituminous coal with a volatile content of 32 per cent to 36 per cent (as to approximately 96 per cent of the total weight) and a cold cure resin binder (as to the remaining weight); are manufactured from those constituents by a process involving roll-pressing; have an average weight of between 80 and 90 grammes or between 160 and 170 grammes; and have a sulphur content not exceeding 1.8 per cent of the total weight.
The I.D.L, M and H incinerators, manufactured by the Incinerator Doctor.	1 The fireplaces shall be installed, maintained and operated in accordance with the manufacturer’s instructions dated February 1999 and bearing the reference “I.D.E.I”. 2 No fuel shall be used other than paper, cardboard, untreated dry wood, foliage, floor sweepings, and other waste containing no more than 20 per cent by weight of restaurant and cafeteria waste and less than 5 per cent by weight of coated paper, plastic or rubber waste.
The Osier wood burning stove, manufactured by Reinhart von Zschock.	1 The fireplaces shall be installed, maintained and operated in accordance with the manufacturer’s instructions dated 30th September 1997 and bearing the reference “CSC/OS/001”. 2 No fuel shall be used other than untreated dry wood.
The Trash X Incinerator, models TX25, TX35, TX50, TX35L and TX50L, manufactured by Roscoe Fabrications Limited.	1 The fireplaces shall be installed, maintained and operated in accordance with the manufacturer’s instructions dated 1998 and bearing the reference “TX/1998”. 2 No fuel shall be used other than paper, card, untreated dry wood and cotton waste.
The Wood Stone Ovens, models WS-MS-4-W (Mt. Chuckanut), WS-MS-5-W (Mt. Adams), WS-MS-6-W (Mt. Baker) and WS-MS-7-W (Mt. Rainier), manufactured by the Wood Stone Corporation, USA.	1 The fireplaces shall be installed, maintained and operated in accordance with the manufacturer’s instructions dated 8 September 1998 and bearing the reference “BPWS version 1”. 2 No fuel shall be used other than untreated dry wood.
Article 2

(This note is not part of the Order)
Section 20 of the Clean Air Act 1993 generally prohibits the emission of smoke in smoke control areas. The Secretary of State may by order made under section 21 of the Act exempt specified classes of fireplace from the provisions of section 20 if he is satisfied that they can be used for burning fuel other than authorised fuels without producing any smoke or a substantial quantity of smoke.
Article 2 of this Order exempts the classes of fireplaces listed in the first column of the Schedule to the Order from the provisions of section 20, subject to the conditions listed in the second column of that Schedule. Article 3 amends an earlier order under section 21 to take account of a change in the reference numbers of exempted fireplaces manufactured by Dovre Castings Limited.