SCHEDULE 1 REQUIREMENTS FOR RENDERING PLANTS
Article 7 and 8

1 General requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6 Clean and unclean areas
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11 Cleansing and disinfection facilities
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

12 Equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
13 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
14 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
15 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

16 Laboratories
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Order revoked: (E.) (1.7.2003) by The Animal By-Products Regulations 2003 (S.I. 2003/1482), regs. 1, 51(2); (S.) (1.10.2003) by The Animal By-Products (Scotland) Regulations 2003 (S.S.I. 2003/411), reg. 1(1), sch. 6 (with reg. 50, sch. 4); and (W.) (31.10.2003) by The Animal By-Products (Wales) Regulations 2003 (S.I. 2003/2756), regs. 1, 51(2)