SCHEDULE 1 RULES FOR THE CONDUCT OF ELECTIONS AND BY-ELECTIONS OF MEMBERS TO THE GENERAL OSTEOPATHIC COUNCIL

General
22. The decision of the Returning Officer shall be final on any matter concerning an election held in conformity with these rules, including any matter concerning the validity of a nomination or voting form.